2 Dissolution of NHS trusts
1 The Royal Brompton National Health Service Trust established by the Royal Brompton Hospital National Health Service Trust (Establishment) Order 1994 is dissolved, and accordingly that Order is revoked.
S.I.1994/402.
2 The Harefield Hospital National Health Service Trust established by the Harefield Hospital National Health Service Trust (Establishment) Order 1991 is dissolved, and accordingly that Order is revoked.
S.I.1991/2353.