8 Wards of the parish of Oldland
1 The existing wards of the parish of Oldland shall be abolished.
2 The parish shall be divided into seven wards which shall bear the names Barrs Court, Cadbury Heath, Cock Road Ridge, Greenbank, Longwell Green, Willsbridge and Wraxall and the wards shall comprise the areas designated on sheet 8 by reference to the name of the ward and demarcated by orange lines.
3 The number of councillors to be elected for the Cadbury Heath parish ward shall be seven; for the Longwell parish ward shall be four; for each of the Barrs Court and Wraxall parish wards shall be three and for each of the Cock Road Ridge, Greenbank and Willsbridge parish wards shall be one.