(This note is not part of the Regulations)
These Regulations further amend the Air Navigation (Dangerous Goods) Regulations 1994. The definition of “Technical Instructions” now refers to the 1999–2000 English language edition of the Technical Instructions for the Safe Transport of Dangerous Goods by Air approved and published by decision of the Council of the International Civil Aviation Organisation (Regulation 2).
The 1999–2000 English language edition of the Technical Instructions for the Safe Transport of Dangerous Goods by Air can be purchased from–
Freight Merchandising Services,
Unit 19,
Ashford Industrial Estate,
Shield Road,
Ashford,
Middlesex
TW15 1AU
or
Labeline (Air, Sea and Road),
Holly House,
14 Tenby Road,
Frimley,
Surrey
GU16 5UT
or
Westward Digital Limited,
37 Windsor Street,
Cheltenham,
Gloucestershire
GL52 2DG