SCHEDULE 1
Article 2

Article 11 Organization of the International Tribunal
The International Tribunal shall consist of the following organs:
(a) The Chambers, comprising three Trial Chambers and an Appeals Chamber,
(b) The Prosecutor, and
(c) A Registry, servicing both the Chambers and the Prosecutor.

Article 12 Composition of the Chambers
The Chambers shall be composed of fourteen independent judges, no two of whom may be nationals of the same State, who shall serve as follows:
(a) Three judges shall serve in each of the Trial Chambers;
(b) Five judges shall serve in the Appeals Chamber.

Article 13 Qualifications and election of judges
1 The judges shall be persons of high moral character, impartiality and integrity who possess the qualifications required in their respective countries for appointment to the highest judicial offices. In the overall composition of the Chambers due account shall be taken of the experience of the judges in criminal law, international law, including international humanitarian law and human rights law.
2 The judges of the International Tribunal shall be elected by the General Assembly from a list submitted by the Security Council, in the following manner:
(a) The Secretary-General shall invite nominations for judges of the International Tribunal from States Members of the United Nations and non-member States maintaining permanent observer missions at United Nations Headquarters;
(b) Within sixty days of the date of the invitation of the Secretary-General, each State may nominate up to two candidates meeting the qualifications set out in paragraph 1 above, no two of whom shall be of the same nationality;
(c) The Secretary-General shall forward the nominations received to the Security Council. From the nominations received the Security Council shall establish a list of not less than twenty-eight and not more than forty-two candidates, taking due account of the adequate representation of the principal legal systems of the world;
(d) The President of the Security Council shall transmit the list of candidates to the President of the General Assembly. From that list the General Assembly shall elect the fourteen judges of the International Tribunal. The candidates who receive an absolute majority of the votes of the States Members of the United Nations and of the non-member States maintaining permanent observer missions at United Nations Headquarters, shall be declared elected. Should two candidates of the same nationality obtain the required majority vote, the one who received the higher number of votes shall be considered elected.
3 In the event of a vacancy in the Chambers, after consultation with the Presidents of the Security Council and of the General Assembly, the Secretary-General shall appoint a person meeting the qualifications of paragraph 1 above, for the remainder of the term of office concerned.
4 The judges shall be elected for a term of four years. The terms and conditions of service shall be those of the judges of the International Court of Justice. They shall be eligible for re-election.