1998 No. 1601 (S.86)
SPORTS GROUNDS AND SPORTING EVENTS
The Safety of Sports Grounds (Designation) (Scotland) Order 1998
Made 30th June 1998
Laid before Parliament 3rd July 1998
Coming into force 24th July 1998

The Secretary of State, in exercise of the powers conferred upon him by sections 1(1) and 18(2) of the Safety of Sports Grounds Act 1975, and of all other powers enabling him in that behalf, and, as required by section 18(4) of that Act, after consultation with such persons or bodies of persons as appear to him requisite, hereby makes the following Order:
1975 c. 52; section 1(1) was amended by Schedule 2 to the Fire Safety and Safety of Places of Sport Act 1987 (c. 27).

1 This Order may be cited as the Safety of Sports Grounds (Designation) (Scotland) Order 1998 and shall come into force on 24th July 1998.
2 Each stadium in Schedule 1 to this Order, being a sports stadium which in the opinion of the Secretary of State has accommodation for more than 10,000 spectators, is hereby designated as a stadium requiring a safety certificate under the Safety of Sports Grounds Act 1975.
3 The Orders specified in Schedule 2 to this Order are hereby revoked.
Sam Galbraith Parliamentary Under Secretary of State, Scottish Office St Andrew’s House, Edinburgh 30th June 1998

SCHEDULE 1 STADIA IN SCOTLAND DESIGNATED AS REQUIRING SAFETY CERTIFICATES UNDER THE SAFETY OF SPORTS GROUNDS ACT 1975
Article 2
Bayview Park, Methil
Boghead Park, Dumbarton
Brockville Park, Falkirk
Cappielow Park, Greenock
Celtic Park, Glasgow
Central Park, Cowdenbeath
Cliftonhill Stadium, Coatbridge
Dens Park, Dundee
East End Park, Dunfermline
Easter Road Stadium, Edinburgh
Excelsior Stadium, Airdrie
Fir Park, Motherwell
Firhill Stadium, Glasgow
Firs Park, Falkirk
Gayfield Park, Arbroath
Hampden Park, Glasgow
Ibrox Stadium, Glasgow
McDiarmid Park, Perth
Meadowbank Stadium, Edinburgh
Murrayfield Stadium, Edinburgh
Ochilview Park, Stenhousemuir
Palmerston Park, Dumfries
Pittodrie Stadium, Aberdeen
Recreation Park, Alloa
Rugby Park, Kilmarnock
Somerset Park, Ayr
St Mirren Park, Paisley
Stark’s Park, Kirkcaldy
Tannadice Park, Dundee
Tynecastle Park, Edinburgh

SCHEDULE 2 REVOCATIONS
Article 3
The Safety of Sports Grounds (Designation) (Scotland) Order 1976.
The Safety of Sports Grounds (Designation) (Scotland) Order 1977.
The Safety of Sports Grounds (Designation) (Scotland) Order 1978.
The Safety of Sports Grounds (Designation) (Scotland) Order 1979.
The Safety of Sports Grounds (Designation) (Scotland) Order 1980.
The Safety of Sports Grounds (Designation) (Scotland) Variation Order 1982.
The Safety of Sports Grounds (Designation) (Scotland) Order 1984.
The Safety of Sports Grounds (Designation) (Scotland) Order 1986.
The Safety of Sports Grounds (Designation) (Scotland) Order 1989.
S.I.1976/1285.
S.I.1977/1345.
S.I.1978/1099.
S.I.1979/1026.
S.I.1980/1034.
S.I.1982/60.
S.I.1984/1014.
S.I.1986/1243.
S.I.1989/2434.

(This note is not part of the Order)
This Order consolidates, with amendments, the terms of previous Orders designating sports grounds in Scotland which require safety certificates under the Safety of Sports Grounds Act 1975 and revokes these Orders. The Order also designates for the first time the stadium at Excelsior Stadium, Airdrie. The stadia previously designated under the names Firhill Park, Glasgow and Love Street Park, Paisley are now designated under the names Firhill Stadium, Glasgow and St Mirren Park, Paisley respectively. The Order does not designate the stadia at Annfield Park, Stirling, Broomfield Park, Airdrie and Douglas Park, Hamilton as these are no longer sports grounds for the purposes of the 1975 Act.