SCHEDULE 1 Premises in respect of which a condition imposing requirements as respects the seating of spectators at designated football matches shall be imposed
Article 2(2)
(1)	(2)
The Stadium at	The Home Ground of
St Andrews Birmingham B9 4NH (Known as “St Andrews Stadium”)	Birmingham City
Leeds Road Huddersfield HD1 6PX (Known as “The Alfred McAlpine Stadium”)	Huddersfield Town
Vale Park Burslem Stoke-on-Trent ST6 1AW (Known as “Vale Park Stadium”)	Port Vale
Sch. 1 in force at 24.7.1998, see art. 1