SCHEDULE 2 SPECIFIED AIRSPACES
Regulations 3(1), 4(3) and 6(1)
(1)	(2)	(3)	(4)
Country	Publication in which FIRs are described	Unit Rate in ECUs	Established at a Rate of exchange of
Austria	AIP Austria	57.57	1 ECU=13.79612 Sch
Belgium and Luxembourg	AIP Belgique	78.46	1 ECU=40.46577 BF
Bulgaria	AIP Bulgaria	60.32
Croatia	AIP Croatia	47.44	1 ECU=6.896589 HRK
Cyprus	AIP Cyprus	24.25	1 ECU=0.580735 £Cy
Czech Republic	AIP Czech Republic	45.28	1 ECU=36.79034 CZK
Denmark	AIP Denmark	52.08	1 ECU=7.465173 Kr
France	AIP France (France Métro-politaine)	61.61	1 ECU=6.588673 FF
Germany	AIP Germany	66.81	1 ECU=1.960314 DM
Greece	AIP Greece	25.85	1 ECU=309.0668 Dra
Hungary	AIP Hungary	24.84	1 ECU=214.7737 Hf
Ireland, Republic of	AIP Ireland	22.53	1 ECU=0.740373 £Ir
Italy	AIP Italy	65.24	1 ECU=1912.460 L
Malta	AIP Malta	34.56	1 ECU=0.435052 Lm
Netherlands	AIP Netherlands	45.70	1 ECU=2.207741 G
Norway	AIP Norway	49.43	1 ECU=8.011991 KR
Portugal	AIP Portugal	Lisbon FIR-39.82 Santa Maria FIR-14.75	1 ECU=199.1187 Esc
Romania	AIP Romania	36.98
Slovakia	AIP Slovakia	68.06	1 ECU=37.63354 SKK
Slovenia	AIP Slovenia	65.25	1ECU=184.0652 SIT
Spain	AIP Espana	Madrid & Barcelona FIR-48.05 Canaries FIR-46.15	1 ECU=165.3699 Pts
Sweden	AIP Sweden	49.45	1 ECU=8.435991 SKr
Switzerland	AIP Switzerland	74.42	1 ECU=1.613105 SF
Turkey	AIP Turkey	38.32
United Kingdom	United Kingdom Air Pilot	79.52	1 ECU=£0.684627
* Excluding Shanwick FIR.			