(This note is not part of the Order)
Article 2 of this Order brings into force in Wales the following provisions of the Home Energy Conservation Act 1995—
on 10th January 1997, sections 3(1) and 4(1) and (2), and
on 1st April 1997, the remainder of the Act.
As regards Wales, there remain no further provisions of the Act to be brought into force.
The following provisions of the Act are brought into force by commencement order made before the date of this Order.
Provision	Date of Commencement	S.R. or S.I.No.
Sections 3(1) and 4(1) and (2) as to Northern Ireland	1st January 1996	1995 S.R. No. 455 (C9)
The remainder of the Act as to Northern Ireland	1st April 1996	1995 S.R. No. 455 (C9)
Sections 3(1) and 4(1) and (2) as to England	15th January 1996	1995 S.I.No. 3340 (C79)
The remainder of the act as to England	1st April 1996	1995 S.I.No. 3340 (C79)
The whole Act as to Scotland	1st December 1996	1996 S.I.No. 2797 (C82) (S215)