SCHEDULE 1 PART III OF SCHEDULE 1 TO THE EXPORT OF GOODS (CONTROL) ORDER 1994

PART III Note: The goods in this Part are for convenience specified by reference to the classification system used by the Department of Trade and Industry for export control purposes. For convenience only, defined terms are printed in “quotation marks”.
MILITARY, SECURITY AND PARA-MILITARY GOODS AND ARMS, AMMUNITION AND RELATED MATERIAL

ML14 Technical Note:
Specialised equipment for military training or for simulating military scenarios and specially designed components and accessories therefor.