SCHEDULE 5 INFORMATION TO BE DISPLAYED ON CONTAINERS, TANK CONTAINERS, TANK WAGONS AND WAGONS

9 Exceptions
Paragraph 6 shall not apply where the road vehicle being carried displays information concerning the goods being carried in accordance with regulation 18 of the Carriage of Dangerous Goods by Road Regulations 1996 and that information is clearly visible.

Figure 1 Orange-coloured panel displaying the emergency action code and the UN numberThe emergency action code shall be inscribed in the upper half and the UN number shall be inscribed in the lower half.

Figure 2 Hazard warning panelThe emergency action code shall be inscribed in the upper half and the UN number in the lower half of the orange-coloured panel and the telephone number beneath the UN number.