SCHEDULE 1 COMMUNITY PROVISIONS
Regulations 2(1), 5 and 6
Community Provision	Subject Matter
Article 2 (as read with Article 1)	Restrictions on marketing of spreadable fats
Article 3	Requirements relating to the labelling and presentation of spreadable fats
Article 4	Restriction on use of the term “traditional” with the name “butter”
Article 5	Restriction on use of terms relating to fat content
Article 7	Requirements relating to fats imported from third countries

SCHEDULE 2 REVOCATIONS
Regulation 9
Column 1	Column 2	Column 3
Regulations revoked	References	Extent of Revocation
The Butter Regulations 1966	S.I.1966/1074	The whole Regulations
The Butter (Scotland) Regulations 1966	S.I.1966/1252	The whole Regulations
The Margarine Regulations 1967	S.I.1967/1867	The whole Regulations
The Margarine (Scotland) Regulations 1970	S.I.1970/1286	The whole Regulations
The Food (Revision of Penalties) Regulations 1982	S.I.1982/1727	The references to the Butter Regulations 1966 and the Margarine Regulations 1967 in Schedule 1
The Food (Revision of Penalties) Regulations 1985	S.I.1985/67	The references to the Butter Regulations 1966 and the Margarine Regulations 1967 in Part I of the Schedule
The Food (Revision of Penalties and Mode of Trial) (Scotland) Regulations 1985	S.I.1985/1068	The references to the Butter (Scotland) Regulations 1966 and the Margarine (Scotland) Regulations 1970 in Schedule 1
The Food Safety (Exports) Regulations 1991	S.I.1991/1476	The references to the Butter Regulations 1966 and the Margarine Regulations 1967 in Part I of Schedule 1 and the Butter (Scotland) Regulations 1966 and the Margarine (Scotland) Regulations 1970 in Schedule 2
The Food (Forces Exemptions) (Revocations) Regulations 1992	S.I.1992/2596	The references to the Butter Regulations 1966 and the Margarine Regulations 1967 in part I of the Schedule and the Butter (Scotland) Regulations 1966 and the Margarine (Scotland) Regulations 1970 in Part II of the Schedule
The Food Safety (Amendment) (Metrication) Regulations 1992	S.I.1992/2597	Regulation 8