1995 No. 1372 (S.101)
FOODMILK AND DAIRIES
The Dairy Products (Hygiene) (Scotland) Regulations 1995
Made 24th May 1995
Laid before Parliament 25th May 1995
Coming into force 15th June 1995

The Secretary of State, in exercise of the powers conferred on him by sections 6(4), 16(1), (2) and (3), 17(1) and (2), 19, 26, 31 and 48(1) of, and paragraphs 2(1), 5, 6(1)(a) and 7(1) of Schedule 1 to, the Food Safety Act 1990 and of all other powers enabling him in that behalf, after consultation in accordance with section 48(4) of the said Act with such organisations as appear to him to be representative of interests likely to be substantially affected by the Regulations hereby makes the following Regulations
1990 c. 16; “the Ministers” is defined in section 4(1) of the Act.

PART I PRELIMINARY

1 Citation and commencement
1 These Regulations may be cited as the Dairy Products (Hygiene) (Scotland) Regulations 1995 and shall come into force on 15th June 1995.
2 These Regulations shall apply to Scotland.

2 Interpretation
1 In these Regulations, unless the context otherwise requires—
“the Act” means the Food Safety Act 1990;
“animal” means an animal of the following species:— cows, sheep, goats or buffaloes;
“another EEA State” means an EEA State other than the United Kingdom;
“approval” in relation to a dairy establishment means approval in accordance with regulation 6 or 15 and “approved” shall be construed accordingly;
“authorised officer” means an authorised officer of a food authority;
“catering establishment” means a restaurant, canteen, club, public house, school, hospital, institution or similar establishment (including a vehicle or a fixed or mobile stall) where, in the course of a business, food is prepared for delivery to the ultimate consumer for immediate consumption without further preparation;
“collection centre” means an establishment where raw milk is collected and where it may be cooled and filtered;
“complete cold mix” in relation to ice cream means a product which is capable of manufacture into a mixture with the addition of water only, is sent out by the manufacturer in air-tight containers and has been made by evaporating or dehydrating a liquid mixture which has already been submitted to heat-treatment not less effective than that prescribed in paragraph 1 of Part V or paragraph 1 of Part VI of Schedule 6 and to which no substance other than sugar has been added;
“Council Directive 92/46” means Council Directive No.92/46/EEC, laying down the health rules for the production and placing on the market of raw milk, heat-treated milk and milk-based products, as amended by Council Directives 92/118/EEC and 94/71/EC, to be read with Council Directive 92/47;
“Council Directive 92/47” means Council Directive 92/47 EEC on the conditions for granting temporary and limited derogations from specific Community health rules on the production and placing on the market of milk and milk-based products;
“cream” means that part of cows' milk rich in fat which has been separated by skimming or otherwise;
“dairy establishment” means any undertaking handling dairy products and is either—
(a) a standardisation centre; or
any one of the following undertakings operating alone or in combination:—
(a) a treatment establishment;
(b) a processing establishment; or
(c) a collection centre;
“dairy product” means milk or any milk-based product;
“drinking milk” means milk intended for delivery as such to the ultimate consumer and in relation to drinking milk which is cows' milk, has the meaning assigned to it by Article 3(1) of Council Regulation (EEC) No. 1411/71 laying down additional rules on the common market organisation in milk and milk products for drinking milk, as amended;
“EEA Agreement” means the Agreement on the European Economic Area signed at Oporto on 2nd May 1992 as adjusted by the Protocol signed at Brussels on 17th March 1993;
“EEA State” means a State which is a Contracting Party to the EEA Agreement but until the EEA Agreement comes into force in relation to Liechtenstein does not include the State of Liechtenstein;
“establishment” in Part II of Schedule 2 means a treatment establishment or a processing establishment;
“farm premises” means a farm occupied by the occupier of a licensed production holding as a single farm and includes the production holding and any processing establishment or other buildings or buildings situated on that farm and occupied by the same occupier;
“handling” includes preparing, processing, packaging, treating, wrapping or re-wrapping in the course of a business;
“health mark” means a mark applied in accordance with regulation 11(1) and of a kind and in a manner as set out in Part II of Schedule 10;
“heat-treatment” means any treatment of a dairy product involving heating that causes, immediately after such treatment, a negative reaction to the phosphatase test and “heat-treated” shall be construed accordingly;
“heat-treated milk” means milk obtained by heat-treatment;
“heat-treated drinking milk” means either drinking milk intended for sale to the ultimate consumer or to institutions, obtained by heat-treatment and presented as pasteurised, UHT or sterilised milk; or milk treated by pasteurisation at the request of an individual consumer for sale in bulk to that consumer;
“hermetically sealed container” means a container which, when sealed, is impervious and is intended to protect its contents against the entry of micro-organisms during and after heat-treatment;
“ice-cream” means any ice cream which is a milk-based product;
“licensed” in relation to a production holding means licensed in accordance with regulation 4 or 14 and “license” shall be construed accordingly;
“limited production” in relation to the production of heat-treated drinking milk means production by means of a separate circuit within any dairy establishment in which heat-treated drinking milk is manufactured and the annual usage of milk for the production of heat-treated drinking milk by such separate circuit does not exceed 300,000 litres;
“low capacity dairy establishment” means a dairy establishment whose annual usage of milk or milk-based products converted to the equivalent in liquid milk for the manufacture of milk-based products does not exceed 300,000 litres;
“marketing authorisation” means a marketing authorisation to which the Marketing Authorisations for Veterinary Medical Products Regulations 1994 apply;
“milk” means the milk of cows, ewes, goats or buffaloes intended for human consumption;
“milk-based product” means—
(a) a milk product exclusively derived from milk to which other substances necessary for its manufacture may have been added, provided that those substances do not replace in part or in whole any milk constituent, and
(b) a composite milk product of which no part replaces or is intended to replace any milk constituent and of which milk or a milk product is an essential part either in terms of quantity or for characterisation of the product,
intended for human consumption;
“milk for the manufacture of milk-based products” means raw milk for processing or liquid or frozen milk obtained from raw milk, whether or not it has undergone an authorised physical treatment, such as heat-treatment or thermisation, or is modified in its composition, provided that these modifications are restricted to the addition or removal or both, of natural milk constituents;
“mixture” in Parts V and VI of Schedule 6 means any product which is capable of manufacture into ice-cream by freezing only;
“occupier” means any person carrying on the business of a producer or handler of dairy products, or his duly authorised representative;
“packaging” in relation to dairy products means the placing of one or more wrapped or unwrapped dairy products in a container, as well as the container itself;
“pasteurisation” means the process of heat-treating milk in accordance with paragraph 2(a) of Part III of Schedule 4;
“pasteurised milk” means milk obtained by pasteurisation;
“potable water” means water within the meaning of Council Directive 80/778/EEC relating to the quality of water intended for human consumption;
“processing” includes manufacturing and operations such as slicing;
“processing establishment” means an establishment where any dairy product is either treated, processed and wrapped or undergoes one or more of those handling activities;
“product licence” means a product licence granted under the Medicines Act 1968;
“production holding” means premises at which one or more milk-producing cows, ewes, goats or buffaloes are kept;
“raw” in relation to milk means milk produced by the secretion of the mammary glands of one or more cows, ewes, goats or buffaloes, which has not been heated beyond 40°C or undergone any treatment which has an equivalent effect;
“sell” includes offer, expose, advertise or have in possession for sale;
“separate circuit” in relation to production in a dairy establishment means the production of heat-treated drinking milk by means of separate equipment or installations, or in a clearly separated place or at a different time from the production of other dairy products, in that establishment;
“shop premises” means premises (including vehicles) from which any food is sold to the ultimate consumer;
“standardisation centre” means an establishment which is not attached to a collection centre or to a treatment or processing establishment and where raw milk may be skimmed or its natural constituents modified;
“sterilised milk” means milk which has been treated in accordance with paragraph 4 of Part III of Schedule 4;
“sugar” means any soluble carbohydrate sweetening matter and for this purpose “carbohydrate” means a substance containing carbon, hydrogen and oxygen only, in which the hydrogen and oxygen generally although not always occur in the same proportion as in water;
“thermisation” means the process of treating milk in accordance with the requirements specified in paragraph 1(b) of Part II of Schedule 5;
“thermised milk” means milk which has been subjected to thermisation;
“third country” means a country which is not an EEA State;
“treatment” means heat-treatment or thermisation;
“treatment establishment” means an establishment where milk is heat-treated;
“UHT milk” means milk which has been heat-treated in accordance with paragraph 5(a) of Part III of Schedule 4;
“ultimate consumer” means any person who buys otherwise than for—
(a) the purpose of resale;
(b) the purposes of a catering establishment; or
(c) the purposes of a manufacturing business.
“veterinary surgeon” has the meaning assigned to it by the Medicines (Medicated Animal Feeding Stuffs) (No.2) Regulations 1992;
“veterinary written direction” has the meaning assigned to it by the Medicines (Medicated Animal Feeding Stuffs) (No.2) Regulations 1992;
“withdrawal period” in paragraph 1(f) of Part I of Schedule 3 means the period specified in a current product licence or marketing authorisation relating to a product administered to an animal, or (in the absence of any such specification) specified in a prescription or a veterinary written direction given by a veterinary surgeon in respect of the administration of the product, which is required to elapse from the cessation of the administration of the product to the animal before the taking of its milk for human consumption;
“wrapping” in relation to any dairy product means the protection of that dairy product by the use of an initial wrapping or initial container in direct contact with the product as well as the initial wrapper or initial container itself.
OJ No.L268, 14.9.92, p.1.
OJ No.L62, 15.3.93, p.49.
OJ No.L368, 31.12.94, p.33.
OJ No.L268, 14.9.92, p.33.
OJNo. L148, 3.7.71, p.4 (OJ/SE 1971 II, p.412).
The relevant amending instruments are Council Regulation (EEC) No.566/76 (OJNo. L67, 15.3.76, p.23), as read with the corrigendum at OJ No.L107, 24.4.76, p.22, Commission Regulation (EEC) No. 222/88 (OJNo. L28, 1.2.88, p.1) and Council Regulation (EEC) No. 2138/92 (OJNo. L214, 30.7.92, p.6).
S.I.1994/3142.
OJNo. L229, 30.8.80, p.11, to which there are amendments not relevant to these Regulations.
1968 c. 67.
S.I.1992/1520; to which there are amendments not relevant to these Regulations.
2 Other expressions used in these Regulations have, insofar as the context admits, the same meanings as in Council Directive 92/46.
3 Except insofar as the context otherwise requires, any reference in these Regulations to a numbered regulation or Schedule shall be construed as a reference to the regulation or Schedule bearing that number in these Regulations.

3 Exemptions
1 These Regulations shall not apply to—
(a) any production holding or dairy establishment producing or handling dairy products exclusively for the consumption of the occupier of that production holding or dairy establishment;
(b) any dairy establishment handling dairy products exclusively for the supply by the occupier of that dairy establishment otherwise than on sale;
(c) any person engaged in the production or handling of dairy products described in sub-paragraph (a) or (b) above.
2 Subject to paragraph (3) below these Regulations shall not apply to—
(a) the handling of any dairy products in any catering establishment or shop premises;
(b) the sale of any dairy products from any catering establishment or shop premises; or
(c) any person engaged in the selling or handling of dairy products as described in sub-paragraph (a) or (b) above.
3 Notwithstanding the exemption in paragraph (2) above the requirements of—
(a) Parts II to IV of Schedule 6 shall apply in relation to the handling of any heat-treated cream in any catering establishment or shop premises;
(b) Parts V and VI of Schedule 6 shall apply in relation to the handling of any ice-cream in any catering establishment or shop premises;
(c) regulation 12 shall apply in relation to raw drinking milk and raw and thermised cream.
4 Subject to paragraph (5) below—
(a) regulation 6;
(b) regulation 9(1)(a);
(c) regulation 11(1)(b) and (d); and
(d) regulation 13(1)(b)(iii), (iv) and (vi) and (c) to (e),
shall not apply in relation to any processing establishment which comprises part of a farm premises from which establishment is carried on the business of selling or handling—
(i) any raw milk wrapped in that establishment; or
(ii) any milk-based product made from raw milk produced on those farm premises,
where such sales are made direct to the ultimate consumer exclusively.
5 Notwithstanding the exemption in paragraph (4)(a) above the occupier of a processing establishment which comprises part of any farm premises shall ensure that the requirements of regulation 6(1)(a) as read with Part III of Schedule 2 are complied with in that processing establishment.
6 In paragraph (1)(a) above “occupier” includes any person forming part of the occupier’s household.

PART II LICENSING AND USE OF PRODUCTION HOLDINGS

4 Licensing
1 No person shall use any premises as a production holding for the production of raw milk unless those premises—
(a) comply with the appropriate requirements of Schedule 1; and
(b) are licensed in accordance with the provisions of paragraph (3)(a) below, or are deemed to be licensed in accordance with regulation 14.
2 No person shall—
(a) despatch for sale from any licensed production holding any raw milk which does not comply with the provisions of these Regulations; or
(b) despatch any raw milk to another EEA State, or any part of the British Islands, from a production holding to which this regulation applies but which is not licensed under this regulation or deemed to be licensed under regulation 14.
3 The food authority on application made to it under this regulation shall—
(a) license the premises to which the application relates as a production holding if it is satisfied that both the premises and the arrangements at those premises for use as a production holding are adequate to comply with the requirements of Schedule 1 and paragraphs 1 and 2 of Schedule 7; or
(b) refuse to license the premises as a production holding if it is not so satisfied.
4 Each application for a licence under this regulation shall be made in writing to the food authority by the occupier of, or a person proposing to occupy, the production holding to which the application relates.
5 The food authority shall, without unreasonable delay after receipt of the application referred to in paragraph (4) above, notify the applicant in writing of its decision on that application and of the reasons for any refusal to license such production holding.
6 Any licence granted in respect of any production holding under this regulation shall be subject to the condition that any alteration to that production holding shall comply, if appropriate, with the requirements of Schedule 1 and paragraphs 1 and 2 of Schedule 7, if appropriate.
7 Without prejudice to the right of appeal under section 37 of the Act against decision of a food authority not to grant a licence, any person who is aggrieved by the imposition of any condition specified by the food authority, may appeal to the sheriff.
8 Sections 37(4) to (6) of the Act shall have effect in relation to an appeal under paragraph (7) above as they have effect in relation to an appeal under that section but with the omission of—
(a) the reference to appeals for which provision is made by regulations under section 37(2); and
(b) subsection 5(b) and the word “or” immediately preceding it.
9 Without prejudice to sections 9 to 12 of the Act, where the food authority has refused a licence under this regulation, a person who both prior to the commencement of these Regulations and immediately before such refusal had been lawfully using any premises for the production of raw milk, may continue to use such premises for that purpose, subject to any reasonable conditions imposed by the food authority for the protection of public health, until the time for appeal has expired and, if an appeal is lodged, until the appeal is finally disposed of or abandoned.
10 The food authority shall be entitled to inspect any premises in respect of which an application has been made to license such premises as a production holding, prior to licensing such premises.

5 List of production holdings
1 The food authority shall allot a licence number to each licensed production holding including any premises deemed to be licensed in accordance with regulation 14, and keep a list of such production holdings.
2 Any licensed production holding which ceases to be used as a production holding shall be removed from the list kept by the food authority pursuant to paragraph (1) above.

PART III APPROVAL AND USE OF DAIRY ESTABLISHMENTS

6 Approvals
1 No person shall use any premises as a dairy establishment unless those premises—
(a) comply with the appropriate requirements of Schedule 2; and
(b) are approved in accordance with the provisions of paragraph (3)(a) or (9) below.
2 No person shall—
(a) despatch from any approved dairy establishment any dairy products which do not comply with the provisions of these Regulations; or
(b) despatch any dairy products to another EEA State or any part of the British Islands, from a dairy establishment to which this regulation applies but which is not approved under this regulation.
3 Subject to paragraph (9) below, the food authority, on application made to it under this regulation shall—
(a) approve the premises to which the application relates as a dairy establishment, if it is satisfied that—
(i) in the case of a collection centre, both the premises and the arrangements at those premises for use as a collection centre are adequate to comply with the requirements of Parts I and III of Schedule 2 and with the appropriate requirements of section B of Part II of that Schedule;
(ii) in the case of a standardisation centre, both the premises and the arrangements at those premises for use as a standardisation centre are adequate to comply with the requirements of Parts I and III of Schedule 2 and with the appropriate requirements of section C of Part II of that Schedule;
(iii) in the case of a processing establishment, both the premises and the arrangements at those premises for use as a processing establishment are adequate to comply with the requirements of Parts I and III of Schedule 2 and with the appropriate requirements of section A of Part II of that Schedule;
(iv) in the case of a treatment establishment, both the premises and the arrangements at those premises for use as a treatment establishment are adequate to comply with the requirements of Parts I and III of Schedule 2 and with the appropriate requirements of section A of Part II of that Schedule; and
(v) the arrangements at the dairy establishment are adequate to enable the occupier to comply with the requirements of regulation 13(1); or
(b) refuse to approve the premises as a dairy establishment if it is not so satisfied.
4 Each application for an approval under this regulation shall be made in writing to the food authority by the occupier of, or a person proposing to occupy, the dairy establishment to which the application relates.
5 The food authority shall, without unreasonable delay after receipt of the application referred to in paragraph (4) above, notify the applicant in writing of its decision on that application and of the reasons for any refusal to approve such dairy establishment.
6 Any person who is aggrieved by a decision of the food authority not to grant an approval or by the imposition of any condition specified by the food authority, may appeal to the sheriff.
7 Sections 37(4) to (6) of the Act shall have effect in relation to an appeal under this regulation as they have effect in relation to an appeal under that section but with the omission of—
(a) the references to appeals for which provision is made by regulations under section 37(2); and
(b) subsection 5(b) and the word “or” immediately preceding it.
8 Any approval granted in respect of any dairy establishment under this regulation shall be subject to the condition that any alteration to the establishment shall comply with the requirements of Schedule 2, if appropriate.
9 The food authority may approve as a dairy establishment any low capacity dairy establishment which may not comply with any or all of the requirements of Parts I and II of Schedule 2.
10 Without prejudice to sections 9 to 12 of the Act, where the food authority has refused an approval under this regulation, a person who, both prior to the coming into force of these Regulations and immediately before such refusal had been lawfully using any premises for the handling of dairy products, may continue to use such premises for that purpose, subject to any reasonable conditions imposed by the food authority for the protection of public health, until the time for appeal has expired and, if an appeal is lodged, until the appeal is finally disposed of or abandoned.
11 The food authority shall be entitled to inspect any premises in respect of which an application has been made for approval as a dairy establishment prior to approving those premises.

7 List of dairy establishments
1 The food authority shall allot an approval number to each dairy establishment which it has approved and shall keep a list of those dairy establishments.
2 Any approved dairy establishment which ceases to be used as a dairy establishment shall be removed from the list kept by the food authority pursuant to paragraph (1) above.

PART IV REVOCATION OF LICENCES AND APPROVALS

8 Revocation and appeal
1 The food authority may revoke—
(a) a licence granted by it under regulation 4 or deemed to be granted by virtue of regulation 14 in respect of any production holding, or
(b) an approval granted by it under regulation 6 or deemed to be granted by virtue of regulation 15 in respect of any dairy establishment,
if, after an inspection of, or an inquiry into, the method of operation of the production holding or the dairy establishment, it is satisfied that in respect of that production holding or dairy establishment—
(i) there is an obvious failure to comply with these Regulations;
(ii) there are obstacles to an adequate inspection of that production holding or dairy establishment; or
(iii) the business carried on at the premises in respect of which the licence or approval was granted is no longer being carried on there; or
(iv) the premises have become exempt under regulation 3.
2 The food authority shall forthwith give the occupier of the premises notice in writing of—
(a) any decision under paragraph (1) above to revoke the licence of a production holding or to revoke the approval of a dairy establishment;
(b) the date on which the revocation is to take effect; and
(c) the reasons for such revocation.
3 A licence or approval may not be revoked under paragraph (1)(a) or (b) above unless there is in force in relation to the premises—
(a) a prohibition order under section 11 of the Act; or
(b) an emergency prohibition order under section 12,
and in consequence of compliance with the order dairy products may no longer be handled at those premises.
4 Without prejudice to the right of appeal under section 37 of the Act against a revocation of a licence, any person who is aggrieved by the revocation of an approval may appeal to the sheriff.
5 Sections 37(4) to (6) of the Act shall have effect in relation to an appeal under paragraph (4) above as they have effect in relation to an appeal under that section but with the omission of—
(a) the references to appeals for which provision is made by regulations under section 37(2); and
(b) subsection 5(b) and the word “or” immediately preceding it.
6 A revocation under this regulation shall not take effect until the time for appealing against it has expired and, if an appeal is lodged, until the appeal is finally disposed of or abandoned.
7 In paragraph (2) above “occupier” in relation to a proposed revocation by virtue of paragraph (1)(iii) above, where the production holding or dairy establishment is vacant, means the last person known to the food authority to have carried on at the production holding or dairy establishment the business of producing or handling dairy products or his successor in respect of that business.

PART V CONDITIONS FOR THE HANDLING AND MARKETING OF DAIRY PRODUCTS

9 General conditions
1 Subject to paragraphs (8), (9), (10) and (11) below and to regulation 15, no person shall sell for human consumption any raw milk, thermised milk, heat-treated drinking milk, heat-treated milk intended for the manufacture of milk-based products or milk-based products unless—
(a) it originates from a licensed production holding or an approved dairy establishment which complies with the appropriate requirements set out in Schedules 1 and 2;
(b) it complies with the appropriate requirements set out in Schedule 3;
(c) the occupier of the dairy establishment has complied with the provisions of regulation 13 in relation to it;
(d) in particular it complies with the appropriate conditions specified in paragraphs (2), (3), (4), (5) or (6) below;
(e) it complies with paragraphs (7), (8), (9) and (10) below, if applicable; and
(f) it complies with regulation 11.
2 In the case of raw drinking milk which is raw ewes' or goats' milk, the appropriate conditions to be complied with are those specified in paragraph 1 of Part I of Schedule 4 and regulation 12.
3 In the case of thermised milk, the appropriate conditions to be complied with are that—
(a) it shall be manufactured from raw milk which complies with the requirements of paragraph (1) (a) (b) and (c) above; and
(b) where the thermised milk is intended for the manufacture of milk-based products, it complies with the requirements of Part II of Schedule 5.
4 In the case of heat-treated drinking milk, the appropriate conditions to be complied with are that it shall be manufactured from—
(a) raw milk or thermised milk which complies with paragraph (1)(a), (b) and (c) above; or
(b) other heat-treated drinking milk which complies with the appropriate requirements of Part III of Schedule 4; or
(c) a mixture of the milk specified in sub-paragraphs (a) and (b) above.
5 In the case of heat-treated milk intended for the manufacture of milk-based products, the relevant conditions to be complied with are those specified in Parts III and IV of Schedule 5.
6 (a) In the case of milk-based products, other than milk-based drinks made from cows' milk, the appropriate conditions to be complied with are those specified in Schedule 6 and that they shall be manufactured from—
(i) raw milk or thermised milk which complies with paragraphs (1)(a), (b) and (c) and (3)(b) above, as appropriate; or
(ii) heat-treated drinking milk which complies with paragraph (4)(b) above; or
(iii) heat-treated milk (not being heat-treated drinking milk) which complies with paragraph (5) above;
(b) in the case of milk-based drinks made from cows' milk, the appropriate conditions to be complied with are those specified in Schedule 6 and that they shall be manufactured from heat-treated drinking milk which is cows' milk and which complies with paragraph (4)(b) above.
7 No person shall sell any ice-cream unless it is pasteurised ice-cream which complies with Part V of Schedule 6 or it is sterilised ice-cream which complies with Part VI of that Schedule.
8 In the case of any milk which does not satisfy the conditions specified in paragraph 2(a) and (c) of Part I of Schedule 3, it may be sold for human consumption after it has been heat-treated.
9 In the case of any dairy products which have been handled in an infected area, they may be sold for human consumption if the milk used in the production of such dairy products has been heat-treated.
10 In the case of cheese with a period of ageing or ripening of at least sixty days and which complies with Part I of Schedule 6, it shall not be necessary for such cheese to be—
(a) prepared in a dairy establishment which complies with the requirements of Parts I and II of Schedule 2;
(b) made from raw milk complying with paragraphs 2 and 4 of Part II of Schedule 3; or
(c) wrapped and packaged in accordance with the requirements of Schedule 9.
11 In the case of milk-based products with traditional characteristics, it shall not be necessary for such products to—
(a) be prepared in a dairy establishment which complies with the requirements of Parts I and II of Schedule 2;
(b) be made from raw milk which complies with the requirements of Parts II and III of Schedule 3;
(c) satisfy the microbiological criteria specified in Part I of Schedule 6; or
(d) be wrapped and packaged in accordance with the requirements of Schedule 9.
12 In this regulation—
(a) in paragraph (1)(c), “occupier of the dairy establishment” in relation to raw milk purchased by a person for re-sale as described in regulation 13(3) includes the person who purchased that milk for re-sale, and
(b) in paragraph (9), “infected area” has the same meaning as in the Foot-andMouth Disease Order 1983.
S.I.1983/1950, to which there is an amendment not relevant to these Regulations.

10 Methods of analysis
For the purposes of these Regulations the methods of analysis and testing of dairy products specified in Schedule 11 shall be used in relation to the requirements referred to in that Schedule.

11 Storage, transport, wrapping and labelling conditions
1 Dairy products intended for sale shall be—
(a) handled, stored and transported in accordance with Schedules 7 and 8;
(b) in the case of any heat-treated drinking milk or milk-based products transported in bulk, accompanied during such transportation by a commercial document as specified in Part III of Schedule 8;
(c) subject to regulation 9(10) and (11) above, wrapped and packaged in accordance with the requirements of Schedule 9; and
(d) subject to paragraph (4) below and regulation 15, marked with a health mark and labelled in accordance with the appropriate requirements of Schedule 10.
2 Any person who receives a consignment of dairy products together with the commercial document referred to in paragraph (1)(b) above, shall keep that document for a period of at least one year after the date of such receipt and make it available for inspection at the request of an authorised officer.
3 No person shall use on any dairy product which has not been produced in accordance with these Regulations any mark which is not a health mark but which resembles a health mark in such a way as to be likely to suggest that the product has been produced in accordance with these Regulations.
4 An occupier may until 1st January 1996, use on his dairy products any packaging or wrapping which may not comply with the requirements of Part II of Schedule 10.

12 Restrictions on the sale of raw drinking milk and cream
1 No person shall sell drinking milk which is raw cows' milk or thermised cows' milk.
2 No person shall sell raw or thermised cream intended for consumption in that state.
3 No person shall sell milk as drinking milk which is raw ewes' milk, raw goats' milk or raw buffaloes' milk except in accordance with paragraphs (4) and (5) below.
4 An occupier of a licensed production holding may sell the milk referred to in paragraph (3) above direct to the ultimate consumer at the farm premises where the animals from which such milk has been obtained are maintained.
5 Where such milk is sold otherwise than for consumption on the farm premises, it shall be sold in containers filled on the premises, closed and fastened hygienically in a manner satisfactory to the food authority.

PART VI CONDITIONS RELATING TO ALL DAIRY ESTABLISHMENTS

13 Duties of occupier or purchaser of raw milk for re-sale
1 Subject to paragraph (3) below, the occupier of a dairy establishment shall—
(a) take all necessary measures to ensure that, at all stages of handling of dairy products at that dairy establishment, the appropriate requirements of these Regulations are complied with;
(b) carry out his own checks to ensure that—
(i) critical points in the dairy establishment relative to the processes used there are identified;
(ii) methods for monitoring and controlling such critical points are established;
(iii) appropriate tests are carried out to detect any residues of substances having pharmacological or hormonal action, and of antibiotics, pesticides, detergents and other substances which are harmful to human health or which might alter the organoleptic characteristics of dairy products or make their consumption harmful to human health, if those residues exceed permitted tolerance limits;
(iv) appropriate checks are carried out to detect the presence of any added water in raw milk in accordance with Part III of Schedule 3 and in heat-treated drinking milk in compliance with Part III of Schedule 4;
(v) the standards for animal health prescribed in Part I of Schedule 3 are complied with; and
(vi) samples taken for the purpose of checking the cleaning and disinfection methods, or for the purpose of checking compliance with the standards for dairy products prescribed in Part II of Schedule 3, and Schedules 4, 5 and 6, are analysed and examined as appropriate in a laboratory acceptable to the food authority;
(c) ensure that insofar as is reasonable and practicable a record in permanent form is kept of the matters specified in sub-paragraph (b) above and in Schedule 2, Part II, paragraph A7(1)(a)(v)—
(i) in the case of any dairy product which cannot be stored at an ambient temperature, for a period of not less than two months, calculated from the end of the minimum durability indication or “use by” date on the product, and
(ii) in the case of any other dairy product, for a period of not less than two years, calculated from the date to which such record relates;
(d) upon demand by an authorised officer produce or cause to be produced any record the occupier is required to keep by sub-paragraph (c) above for inspection by the authorised officer and allow him to take copies and make extracts from it;
(e) ensure that health marking is controlled and carried out properly;
(f) ensure that the food authority is notified immediately when a laboratory examination of samples or any other information in the occupier’s possession or under his control reveals a serious health risk;
(g) furnish the food authority with such information and assistance as it may reasonably request so as to enable it to take such action as it may consider necessary under these Regulations or the Act; and
(h) ensure, in the event of an immediate human health risk, the withdrawal from the market of the quantity of dairy products obtained under technologically similar conditions and likely to present the same risk; and also ensure that any quantity of the dairy product so withdrawn is held under the supervision and control of the food authority until it is destroyed, or used for purposes other than human consumption, or, with the agreement of the food authority, reprocessed in a manner appropriate to ensure its safety for human consumption.
2 The occupier of any dairy establishment shall ensure that workers at that dairy establishment are given instruction and training with regard to hygiene matters, but the instructions and training given to a worker need only be such as is appropriate to any task undertaken by the worker.
3 Where raw milk is purchased from a production holding by any person other than the occupier of an approved dairy establishment for re-sale as milk intended for processing, such person shall ensure that the following obligations in relation to that milk are complied with:—
(a) the carrying out of appropriate tests to detect any residues of substances as specified in paragraph (1)(b)(iii) above;
(b) the carrying out of appropriate checks to detect the presence of added water in accordance with Part III of Schedule 3;
(c) the taking of samples for the purpose of checking compliance of the milk with the standards for dairy products prescribed in Part II of Schedule 3;
(d) the carrying out of checks to ensure compliance with the standards for animal health prescribed in Part I of Schedule 3;
(e) the requirements specified in paragraph (1)(c) to (h) above, as appropriate; and
(f) the requirements specified in Schedules 7 and 8.

PART VII TRANSITIONAL PROVISIONS RELATING TO DAIRY FARMS AND DAIRY ESTABLISHMENTS

14 Dairy farms
Any production holding which is both licensed as a dairy farm immediately before the coming into force of these Regulations pursuant to the Milk and Dairies (Scotland) Regulations 1990 and is in operation as such on the date before the date these Regulations come into force, shall be deemed to be premises licensed under and subject to the provisions of these Regulations as a production holding.
S.I.1990/2507 to which there are amendments not relevant to these Regulations.

15 Temporary derogations under Directive 92/47
1 Notwithstanding the requirements of regulation 6(3) and until 31st December 1997, the food authority shall approve a dairy establishment which does not comply with any or all of the requirements of Schedule 2, and which is listed in the Annex to Commission Decision 94/695/EC establishing the list of Community establishments for which temporary and limited derogations are granted from Community health rules on the production and placing on the market of raw milk, heat-treated milk and milk-based products, in accordance with Article 2 of Council Directive 92/47.
OJ No.L282, 29.10.94, p.1.
2 Dairy products produced in a dairy establishment approved in accordance with paragraph (1) above shall not—
(a) bear a health mark, or
(b) be intended for export to another EEA State.
3 In this regulation, “dairy establishment” includes a part of a dairy establishment, and “dairy products” mean dairy products in respect of which a derogation has been granted in accordance with Article 2 of Council Directive 92/47.

PART VIII ENFORCEMENT, SUPERVISION AND PENALTIES

16 Enforcement and supervision
1 These Regulations shall be enforced and executed by each food authority within its area.
2 Each food authority shall carry out such inspection and supervision of those production holdings licensed or dairy establishments approved by it and any sampling, analysis and examination of any dairy products as that authority may consider necessary to ensure that the requirements of these Regulations are complied with.

17 Information to be provided by food authorities
Every food authority shall provide the Secretary of State with such information relating to the execution of its duties under these Regulations as he may from time to time require.

18 Offences and penalties
1 If—
(a) any person (other than a food authority) contravenes or fails to comply with any of the provisions of these Regulations; or
(b) the occupier of any production holding or dairy establishment fails to take all reasonable steps to secure the compliance by any person employed by him or any person admitted to that production holding or dairy establishment with any provision of these Regulations,
he shall be guilty of an offence.
2 A person guilty of an offence under paragraph (1) above shall be liable—
(a) on summary conviction, to a fine not exceeding the statutory maximum; or
(b) on conviction on indictment, to a fine or imprisonment for a term not exceeding two years or to both.
3 No prosecution for such an offence shall commence after the expiry of—
(a) three years from the commission of the offence; or
(b) one year from the date on which evidence sufficient in the opinion of the Procurator Fiscal to justify proceedings comes to his knowledge.
4 For the purposes of paragraph (3) above—
(a) proceedings shall be deemed to be commenced on the date on which a warrant to apprehend or cite the accused is granted provided such warrant is executed without undue delay; and
(b) a certificate by the Procurator Fiscal as to the date on which such evidence came to his knowledge shall be conclusive evidence of that fact.

19 Authorisations to derogate
The food authority may authorise derogation from the requirements as to—
(a) automatic sealing in the case of limited production specified in paragraph 2 of section A of Part II of Schedule 2 and paragraph 4 of Schedule 9, in accordance with paragraph (a) of Chapter V of Annex B and paragraph 3 of Chapter III of Annex C of Council Directive 92/46;
(b) equipment specified in paragraph 7(1) of section A of Part II of Schedule 2 in accordance with paragraph (f) of Chapter V of Annex B of Council Directive 92/46;
(c) times and temperatures specified in paragraph 1 of Part I of Schedule 5, in accordance with paragraph B(1) of Chapter I, Annex C of Council Directive 92/46;
(d) temperature for milk-based products specified in paragraph 2 of Schedule 7 and paragraph 1 of Part I of Schedule 8, in accordance with paragraph A(2) of Chapter III of Annex A of Council Directive 92/46.
(e) use of working areas, instruments and equipment specified in paragraph 4 of section A of Part III of Schedule 2, in accordance with paragraph A(3) of Chapter II, Annex B of Council Directive 92/46.

20 Application of various sections of the Act
1 The following provisions of the Act shall apply for the purposes of these Regulations as they apply for the purposes of section 8, 14 or 15 of the Act and unless the context otherwise requires, any reference in them to the Act shall be construed as a reference to these Regulations:—
(a) section 2 (extended meaning of “sale” etc.);
(b) section 3 (presumptions that food intended for human consumption);
(c) section 20 (offences due to fault of another person);
(d) section 21 (defence of due diligence);
(e) section 30(8) (which relates to documentary evidence);
(f) section 33 (obstruction etc. of officers);
(g) section 36 (offences by bodies corporate) subject to the modification that “body corporate” shall include a Scottish partnership and “director” a partner in such a partnership;
(h) section 44 (protection of officers acting in good faith).
2 Section 5(6) (appointment of a person who is not an officer) of the Act shall apply in relation to an appointment by a food authority for the purposes of these Regulations as it applies in relation to matters arising under the Act.
3 Section 8(3) (which makes presumptions in the case of batches of food) of the Act shall apply to food which it is an offence to sell under these Regulations as it applies to food which fails to comply with food safety requirements.
4 Section 9 (inspection and seizure of suspected food) of the Act shall apply to food which it is an offence to sell under these Regulations as it applies to food which fails to comply with food safety requirements.

PART IX MISCELLANEOUS AND SUPPLEMENTARY

21 Dairy products from England and Wales, Northern Ireland, the Isle of Man and the Channel Islands
1 The places to which this regulation applies are England and Wales, Northern Ireland, the Isle of Man and the Channel Islands.
2 No person shall sell for human consumption any dairy products—
(a) from an approved dairy establishment which have been handled in a place to which this regulation applies which are intended for consignment to another EEA State, or
(b) which have been handled after the specified date in a place to which this regulation applies,
unless any handling of those products in that place was in accordance with legislation having effect in that place and corresponding to these Regulations.
3 Subject to regulation 11(4) and paragraph (4) below, no person shall sell for human consumption in Scotland any dairy products which have been handled after the specified date in a place to which this regulation applies unless it carries the relevant EC health mark.
4 The prohibition in paragraph (3) above shall not apply in relation to dairy products produced in a place to which this regulation applies and which do not bear a health mark in accordance with legislation having effect in that place and corresponding to regulation 15 of these Regulations.
5 In this regulation—
(a) the “specified date” means the date on which these Regulations come into force;
(b) the “relevant EC health mark”, in relation to any place to which this regulation applies, means a mark applied in accordance with legislation having effect in that place and corresponding to the provisions of Part II of Schedule 10 relating to the health mark.

22 Imports from third countries and EEA States
1 No person shall import into Scotland for sale for human consumption from a third country any cows' milk or cream.
2 No person shall import into Scotland for sale for human consumption from a third country any other dairy products except in accordance with the following paragraphs of this regulation.
3 In the case of dairy products produced or manufactured in another EEA State, they shall comply with the legislation having effect in that EEA State which implements Council Directive 92/46.
4 In the case of dairy products other than cows' milk or cream manufactured in any third country, they shall be accompanied by a health certificate or certificate as specified by Article 23(2)(b) or 25(1) of Council Directive 92/46.
5 In paragraph (3) above, “the legislation” shall include any administrative provisions enacted in the EEA State referred to in that paragraph to comply with Council Directive 92/46.

23 Revocations
The instruments specified in Schedule 12 are revoked to the extent specified in Column 3 of that Schedule.

24 Consequential amendments
1 In the Ice Cream (Scotland) Regulations 1948, after regulation 1 (interpretation etc) there shall be inserted the following regulation:—

“1A Exemption
1 Regulations 8, 9 and 10 of these Regulations shall not apply in relation to any ice-cream which is a milk-based product.
2 In this regulation “milk-based product” has the same meaning as in the Dairy Products (Hygiene) (Scotland) Regulations 1995.”

.
S.I.1948/960; amended by S.I.1959/413, 1960,2108, 1963/1101, 1983/270, 1985/1068 and 1990/2625.
2 In the Food Hygiene (Scotland) Regulations 1959, for sub-paragraph (c) of regulation 3(1) (interpretation of “food business”) there shall be substituted the following sub-paragraph:—

“(c) at or from any premises comprising a production holding or dairy establishment within the meaning of the Dairy Products (Hygiene) (Scotland) Regulations 1995 being premises from which no food other than cows' milk is sold;”

.
S.I.1959/413, relevant amending instrument is S.I.1990/2625.
3 In the Drinking Milk (Scotland) Regulations 1976, after regulation 5 (alteration in the composition of drinking milk) there shall be inserted the following regulation:—

“5A Reserved names
No person shall use any name specified in Article 3(1) of Council Regulation (EEC) No.1411/71, as amended, except in accordance with paragraph (2) of that Article.
OJ No.L148, 3.7.71, p.4 (OJ/SE 1971 Vol.II, p.412).
The relevant amending instrument is Council Regulation (EEC) No.566/76 (OJ No.L67, 15.3.76, p.23) as read with the corrigendum at OJ No.L107, 24.4.76, p.22.”

.
S.I.1976/1888, to which there are amendments not relevant to these Regulations.
4 In the Milk Labelling (Scotland) Regulations 1983, regulation 5(1) (name of the milk) shall be amended as follows:—
(a) in sub-paragraphs (a) and (c) in each case the words from “in accordance with” to the end of the paragraph shall be omitted, and
(b) after sub-paragraph (c) there shall be added the following sub-paragraph:—

“(d) in sub-paragraphs (a) and (c) above the words “Pasteurised”; “Ultra Heat Treated” (or “UHT”) and “Sterilised” in relation to milk have the same meaning as in the Dairy Products (Hygiene) (Scotland) Regulations 1995.”

.
1983/938, to which there are amendments not relevant to these Regulations.
5 The Milk and Dairies (Scotland) Regulations 1990 shall be amended as follows:—
(a) in regulation 2(1) (interpretation) the definitions of “bactericidal agent”, “dairy premises”, “milk carrier”, “milk processor”, “milk tanker” and “road” shall be omitted;
(b) in regulation 10(4) (precautions against spread of disease) the words “in whose name such premises are licensed under these Regulations” shall be omitted;
(c) in regulation 18 (employees) the words “and every milk carrier” shall be omitted;
(d) in regulation 19 (penalties) for the words “regulations 3(7), 9(1) and 10(1) or (3)” there shall be substituted the words “regulation 10(1) or (3)”.
S.I.1990/2507 to which there are amendments not relevant to these Regulations.
6 In the Food Premises (Registration) Regulations 1991, for sub-paragraph (a) of regulation 3(2) (exceptions) there shall be substituted the following sub-paragraph:—

“(a) as a production holding or as a dairy establishment in each case within the meaning, in relation to Scotland, of the Dairy Products (Hygiene) (Scotland) Regulations 1995;”

.
1991/2825, to which there are amendments not relevant to these Regulations.
Hector Monro Parliamentary Under Secretary of State, Scottish Office St Andrew’s House, Edinburgh 24th May 1995

SCHEDULE 1 CONDITIONS FOR LICENSING OF PRODUCTION HOLDINGS
Regulations 4(1)(a), (3)(a) and (6) and 9(1)(a)
PART I

A. General conditions for hygiene of production holdings
1 All animals shall be clean and well-kept. Individual cows in a herd shall be identifiable by an authorised officer.
2 Production holdings shall have the capability to isolate effectively from the rest of the herd any animals infected, or suspected of being infected, with tuberculosis, brucellosis or any other disease communicable to humans through consumption of milk.
3 Any creature, including any animal of the species referred to in regulation 2(1) shall be kept away from premises and sites where milk is stored, handled or cooled.
4 Pigs and poultry shall not be housed in premises where animals are housed or milked.
5 Access to premises in which animals are housed or milked or any premises on the production holding in which milk is handled, cooled or stored shall be kept free from accumulations of dung, droppings or other offensive matter. Dung channels and droppings on the production holding shall be cleared as regularly as necessary.
6 Adequate measures shall be taken to control insects, rodents and other vermin on the production holding.
7 Store-rooms and cleaning rooms and the equipment in such rooms shall be kept clean, tidy and in good condition.
8 The holding bay for ewes and goats, where it exists, shall be kept in a clean and tidy condition.

B. General conditions of hygiene applicable to staff
1 The highest standards of cleanliness shall be required at all times of staff and persons engaged in milking and handling of raw milk. In particular they shall—
(a) wear suitable clean working clothes;
(b) wash their hands immediately before commencing milking or handling raw milk and shall keep them clean as far as practicable, throughout the milking or handling operation; and
(c) keep any wounds to the skin covered with a waterproof dressing.
2 The occupier shall take all requisite measures to prevent persons liable to contaminate raw milk from handling it, unless there is evidence that such persons can do so without risk of contamination.
3 Before the recruitment of any person for milking or handling raw milk such person shall be required to show that there is no medical impediment to such employment.

PART II CONDITIONS FOR HOUSING OF ANIMALS
1 The premises housing milking animals shall be designed, sited, constructed, maintained and managed so as to ensure good conditions of housing, hygiene, cleanliness and health of the animals.
2 The stalls or lying areas shall be kept dry, if necessary by the use of bedding which is regularly changed.
3 Washing, cleaning and disinfection of the premises housing milking animals or any outhouses attached to such premises shall be carried out in such a way so as to ensure that it does not have an adverse effect on the milk. Any disinfectants used shall be acceptable to the authorised officer.
4 Where one or more rams or male goats are used for breeding, separate accommodation shall be provided for them so as to avoid contamination with odours.

PART III CONDITIONS FOR MILKING, AND THE HANDLING, COOLING AND STORAGE OF RAW MILK ON THE PRODUCTION HOLDING

A. Structure of the premises
1 Premises in which animals are milked or in which raw milk is handled, cooled or stored shall—
(a) be designed, sited, constructed, maintained and managed in such a way as to ensure satisfactory hygiene conditions for milking operations and for the handling, cooling and storing of milk and shall provide adequate separation from all sources of contamination, including lavatories and dung heaps;
(b) have walls and flooring in areas liable to soiling or infection, and fittings and equipment, which are easy to clean and disinfect;
(c) have suitable means of waste disposal, including flooring which allows liquids to drain away;
(d) have adequate ventilation and lighting;
(e) have a sufficient supply of potable water for use in milking operations, and for the cleaning of equipment and utensils intended to come into contact with milk;
(f) have suitable facilities near the place of milking to enable milkers and persons handling milk to wash their hands and arms;
(g) in the case of production holdings where milk-producing animals are kept untethered in the open, have a milking parlour, or a milking area for the milking of animals which is adequately separated from the housing area; and
(h) in the case of milk storage premises, have suitable refrigeration equipment, be adequately protected against vermin and be adequately separated from any premises where any animals are housed or milked.
2 If a processing or treatment establishment is attached to a production holding for ewes and goats, there shall be no direct communication between premises where the ewes and goats are housed or milked, and the processing or treatment establishment.

B. Equipment
1 Equipment and instruments or their surfaces which are intended to come into contact with milk in premises in which animals are milked or in which milk is handled, cooled or stored shall be made of smooth material which is easy to clean and disinfect, which resists corrosion and which will not transfer substances to milk in such quantities as to endanger human health, impair the composition of milk or adversely affect its organoleptic characteristics.
2 Equipment, utensils and all their components used for milking shall be kept clean and maintained in good physical condition at all times.
3 After use, any utensils used for milking, mechanical milking equipment and containers which come into contact with milk shall be cleaned and disinfected and rinsed with potable water which is not liable to cause contamination.
4 Bulk milk tanks when empty shall be left with an open plug hole or, where appropriate, an open outlet valve.
5 Where milking is done by hand, the pails containing the milk shall be covered and brought as quickly as possible to the milk storage premises.

C. Open-air milking and moveable milking bails
1 Where milking is done in the open, the ground where it takes place shall be clean.
2 Where a moveable milking bail is used, it shall—
(a) have a sufficient supply of potable water for use in milking operations and for the cleaning of equipment, utensils and all their components intended to come into contact with milk;
(b) have fittings and equipment which are easy to wash, clean and disinfect;
(c) be sited on ground which is free of any accumulation of excreta or other waste matter;
(d) provide adequate protection for the milk during the whole period in which the bail is in use;
(e) be so constructed and finished as to permit the interior surfaces to be kept clean.

1 D. Feedstuffs
Feedstuffs shall not be stored on a production holding where they can have an adverse effect on milk.

PART IV CONDITIONS FOR MILKING AND FILTERING OPERATIONS
1 Any work including feeding of animals that might have an adverse effect on the milk shall not be carried out immediately before or during the milking.
2 Before the milking is started the teats, udder, flank, hindquarters and adjacent parts of the abdomen of the animal shall be clean.
3 At the start of the milking of an individual animal, the milker shall inspect the appearance of the milk. If any physical abnormality in the milk is detected, milk from that animal shall not be allowed to leave the production holding, nor shall it be used for human consumption on that production holding.
4 Animals with clinical udder diseases shall be milked last, or by a separate machine, or handstripped. Milk from such animals shall not be allowed to leave the production holding, nor shall it be used for human consumption on that production holding.
5 Teat dips or sprays for lactating animals other than those to which the Marketing Authorisations for Veterinary Medicinal Products Regulations 1994 apply shall only be used immediately after milking, unless otherwise permitted by an authorised officer. The components of the teat dips and sprays shall be those acceptable to the authorised officer.
S.I.1994/3142.
6 Where the milk is filtered, the filter used shall, depending on the type, be changed or cleansed before its capacity for absorption is exhausted. In any case, the filter shall be changed or cleansed before each milking. Filtering cloths shall not be used for cow’s milk.

SCHEDULE 2 CONDITIONS FOR APPROVAL OF DAIRY ESTABLISHMENTS
Regulations 3(5), 6(1)(a), (3)(a), (8) and (9), 9(1)(a), (10) and (11) and 19(a), (b) and (e)
PART I

General conditions of hygiene for dairy establishments
1 Dairy establishments shall have the following:—
(a) facilities for the hygienic handling and protection of raw materials and of non-packaged or non-wrapped dairy products during loading and unloading;
(b) appropriate arrangements for protection against pests;
(c) instruments and working equipment intended to come into direct contact with raw materials and dairy products which are made of corrosion-resistant material and which are easy to clean and disinfect;
(d) special watertight, non-corrodible containers in which to put raw materials or dairy products not intended for human consumption. Where such raw materials or dairy products are removed through conduits, these shall be constructed and installed in such a way as to avoid any risk of contamination of other raw materials or dairy products;
(e) appropriate facilities for the cleaning, disinfecting and thereafter rinsing with potable water which is not liable to cause contamination, of equipment and instruments;
(f) an adequate waste water disposal system which is hygienic;
(g) a supply of potable water only. However a supply of non-potable water is also permitted provided that it is intended only for the cooling of equipment, steam production, fire-fighting and refrigeration equipment and, provided further that the pipes installed for this purpose preclude the use of this water for other purposes and present no direct or indirect risk of contamination of the dairy products. Non-potable water pipes shall be clearly distinguished from those used for potable water;
(h) an appropriate number of changing rooms with smooth, waterproof, washable walls and floors and within the room or in the immediate vicinity, wash basins with non hand-operable taps, hygienic hand-drying facilities and flush lavatories. The lavatories shall not open directly on to the work rooms;
(i) a lockable room or a secure place for the storage of detergents, disinfectants and similar substances;
(j) a room or cupboard for storing cleaning and maintenance material;
(k) adequate facilities for cleaning and disinfecting tanks used for transporting dairy products. However such facilities shall not be compulsory if alternative facilities which are acceptable to the food authority are available to the dairy establishment for such purpose;
(l) rooms with adequate capacity for storing raw materials and dairy products.
2 (1) Dairy establishments shall have working areas of sufficient size for work to be carried out under adequate hygienic conditions; their design and layout shall be such as to preclude contamination of the raw materials and the dairy products.
(2) The production of heat-treated milk or the manufacture of milk-based products which might pose a risk of contamination to other dairy products shall be carried out in a clearly separated working area.
(3) In areas where raw materials are handled and dairy products are manufactured, the areas shall have the following:—
(a) solid, waterproof flooring which is easy to clean and disinfect and which allows water to drain away and equipment to remove water;
(b) walls which have smooth surfaces and are easy to clean, are durable and impermeable and which are covered with a light-coloured coating;
(c) ceilings or roof linings which are easy to clean in those areas where exposed or non-packaged raw materials or dairy products are handled;
(d) doors made of non-corrodible materials which are easy to clean;
(e) adequate ventilation and, where necessary, good steam and water-vapour extraction facilities;
(f) adequate natural or artificial lighting;
(g) an adequate number of facilities with hot and cold running water, or water pre-mixed to a suitable temperature, for cleaning and disinfecting hands; taps in work rooms and lavatories for cleaning and disinfecting hands which shall be non hand-operable; these facilities shall be provided with cleaning and disinfecting materials and a hygienic means of drying hands;
(h) facilities for cleaning tools, equipment and installations.
3 (1) Subject to sub-paragraphs (2) and (3) below, the rooms where raw materials and dairy products are stored shall comply with the requirements specified in paragraphs 2(3)(a) to (f) above.
(2) Raw materials and dairy products may be stored in rooms which do not comply with all or any of the requirements of paragraph 2(3)(a) to (f) above, provided that—
(a) in the case of chilling and refrigeration rooms they have a floor which is easy to clean and disinfect and which allows water to drain away; or
(b) in the case of freezing and deep-freezing rooms, they have a floor which is waterproof, rot proof and easy to clean; and
(c) in the cases referred to in sub-paragraphs (a) and (b) above, the rooms shall have a sufficiently powerful refrigeration plant to keep raw materials and dairy products at the temperatures specified by these Regulations.
(3) In freezing and deep freezing rooms referred to in sub-paragraph (2)(b) above the use of wooden walls shall be permitted provided they were built before 1st January 1993.

PART II SPECIAL CONDITIONS FOR APPROVAL

A. Special conditions for approval of treatment and processing establishments
1 In addition to the general requirements laid down in Part I of this Schedule, an establishment shall meet the requirements set out below in this Part.
2 The establishment shall possess equipment for the mechanical filling and proper automatic sealing of containers, (excluding churns, tanks and bulk packaging of more than 4 litres), which are to be used for packaging heat-treated drinking milk and liquid milk-based products, if such operations are carried out at that establishment. However in the case of limited production of liquid milk intended for drinking, alternative non-automatic filling and sealing methods may be used after authorisation by the food authority provided that such methods carry equal assurance with regard to hygiene.
3 The establishment shall possess equipment for the cooling and cold storage of heat-treated milk and liquid milk-based products. Where raw milk is stored, purified or standardised at an establishment, that establishment shall also possess equipment for the cooling and cold storage of raw milk. Cold stores shall be equipped with correctly calibrated temperature-measuring apparatus.
4 The establishment shall possess—
(a) in the case of dairy products wrapped in disposable containers, an area for the storage of such containers and for the storage of raw materials intended for their manufacture; and
(b) in the case of dairy products wrapped in re-usable containers, a special area for their storage and equipment designed to clean and disinfect them mechanically.
5 The establishment shall possess containers for storing raw milk and, if appropriate, standardisation equipment and containers for storing standardised milk.
6 The establishment shall possess centrifuges or any other suitable means for physically purifying milk, if appropriate.
7 (1) Subject to sub-paragraph (2) below a treatment establishment shall possess heat-treatment equipment, approved or authorised by the food authority for the treatment of dairy products, fitted with—
(a) in the case of a continuous heat-treatment system—
(i) an automatic temperature control;
(ii) correctly calibrated indicating and recording thermometers;
(iii) an automatic safety device preventing insufficient heating;
(iv) an adequate safety system preventing the mixture of heat-treated milk with milk which has not been fully heat-treated, and
(v) an automatic recording device which records the operation of the safety system referred to in sub-paragraph (iv) above, including a record of when the cleaning mode is in operation;
(b) in the case of any other heat-treatment system, at least a correctly calibrated recording thermometer.
(2) A treatment establishment may have equipment different to those specified in sub-paragraph (1) above provided that an equivalent performance may be achieved with equal assurances with regard to hygiene and the food authority has authorised the use of such equipment.
8 A processing establishment shall possess equipment for heating, thermisation or heat-treatment which meets hygiene requirements if such operations are carried out in that establishment.
9 The establishment shall possess equipment for the cooling, wrapping and storage of frozen milk-based products if such operations are carried out at that establishment.
10 The establishment shall possess equipment for drying and wrapping powdered milk products, if such operations are carried out at that establishment.

1 B. Special conditions for approval of a collection centre
In addition to the general requirements laid down in Part I of this Schedule, a collection centre shall have—
(a) cooling equipment or appropriate means for cooling milk and, if milk is stored at that collection centre, a cold-storage installation; and
(b) if milk is purified at that collection centre, centrifuges or any other apparatus suitable for the physical purification of milk.

1 C. Special conditions for approval of a standardisation centre
In addition to the general requirements laid down in Part I of this Schedule, a standardisation centre shall have—
(a) containers for the cold storage of raw milk;
(b) standardisation equipment and containers for the storage of standardised milk;
(c) centrifuges or any other apparatus suitable for the physical purification of milk.

PART III GENERAL CONDITIONS OF HYGIENE

A. General conditions of hygiene applicable to dairy establishments, instruments and equipment
1 Rodents, insects and any other vermin shall be systematically destroyed in the dairy establishment and any creature including any animal of the species referred to in regulation 2(1) shall be prevented from entering rooms in which dairy products are manufactured or stored.
2 Instruments and equipment used for working on raw materials and dairy products, floors, ceilings or roof linings, walls and partitions shall be kept in a satisfactory state of cleanliness and repair, so that they do not constitute a source of contamination to raw materials or dairy products.
3 Rodenticides, insecticides, disinfectants and any other potentially toxic substance shall be stored in lockable rooms or a secure place and used in such a way that they do not have an adverse effect on machinery, equipment, instruments, raw materials or dairy products kept in the dairy establishment.
4 Working areas, instruments and working equipment shall be used only for work on dairy products in accordance with these Regulations. However, after authorisation by the food authority, they may be used at the same time or at other times for work on other foodstuffs fit for human consumption, or other milk-based products fit for human consumption but intended for a use other than human consumption, provided that they do not contaminate the dairy products for which approval has been given.
5 Potable water shall be used for all purposes save as permitted by paragraph 1(g) of Part I of this Schedule.
6 Equipment, containers and installations which come into contact with dairy products or perishable raw materials used during production shall be cleaned and if necessary disinfected according to a cleaning programme based on risk analysis principles.
7 Other equipment, containers, instruments and installations which come into contact with microbiologically stable dairy products and the rooms in which they are stored shall be cleaned and disinfected according to a cleaning programme based on risk analysis principles drawn up by the occupier of the dairy establishment.
8 As soon as possible after unloading or after each series of journeys where there is only a very short space of time between unloading and the following loading, but in any event, at least once every working day, any container or tank used for transporting raw milk shall be cleaned and disinfected before re-use.
9 The treatment establishment shall in principle be cleaned according to a cleaning programme based on risk analysis principles.
10 The occupier of the dairy establishment shall take appropriate measures to avoid cross-contamination of dairy products in accordance with the cleaning programme specified in paragraph 7 above.
11 Where appropriate, rooms intended for production processes shall be divided into wet and dry areas, each having its own operating conditions.
12 Disinfectants and similar substances used shall be those acceptable to the food authority and shall be used in such a way that they do not have any adverse effects on the machinery, equipment, raw materials and dairy products kept at the dairy establishment. They shall be in clearly identifiable containers bearing labels with instructions for their use and their use shall be followed by thorough rinsing of such instruments and working equipment with potable water, except in cases where the disinfectant or similar substance is specifically designed not to be rinsed after application.
13 Where a dairy establishment produces foodstuffs containing dairy products, together with other ingredients which have not undergone heat-treatment, or other treatment having an equivalent effect, such dairy products and ingredients shall be stored separately to prevent cross-contamination.

B. General conditions of hygiene applicable to staff
1 The occupier of a dairy establishment shall only employ persons in such an establishment to work directly with and handle raw materials or dairy products if those persons have proved to the occupier’s satisfaction by means of a medical certificate, on recruitment, that there is no medical impediment to their employment in that capacity. This requirement shall not apply to any persons already working in such a capacity before the date on which these Regulations come into force.
2 Persons working directly with and handling raw materials or dairy products shall maintain the highest standards of personal cleanliness at all times. In particular they shall—
(a) wear suitable, clean working clothes and headgear which completely encloses their hair;
(b) not smoke, spit, eat or drink in rooms where raw materials and dairy products are handled or stored;
(c) wash their hands at least each time work is resumed and whenever contamination of their hands has occurred; and
(d) cover wounds to the skin with a suitable waterproof dressing.
3 The occupier shall take all necessary measures to prevent persons liable to contaminate raw materials and dairy products from handling them until the occupier has adequate evidence that such persons can do so without risk of contamination.

SCHEDULE 3 REQUIREMENTS FOR RAW MILK
Regulations 9(1)(b), (8) and (10), 13(1)(b)(iv)(v) and (vi) and (3)(b), (c) and (d)
PART I

Animal health standards
1 Raw milk shall come from animals on a licensed production holding and such animals shall undergo regular veterinary inspections to ensure that the requirements of this paragraph are being complied with and shall—
(a) not show any symptoms of infectious diseases communicable to human beings through milk;
(b) not give the milk any abnormal organoleptic characteristics;
(c) have a general state of health which is not impaired by any visible disorder and which are not suffering from any infection of the genital tract with discharge, enteritis with diarrhoea and fever, or a recognisable inflammation of the udder;
(d) not show any udder wound likely to affect their milk;
(e) not have had substances within the meaning of Council Directive 81/602/EEC concerning the prohibition of certain substances having a hormonal action, and of any substances having a thyrostatic action, as amended, and Council Directive 88/146/EEC prohibiting the use in livestock farming of certain substances having a hormonal action, administered illegally; and
OJNo. L222, 7.8.81, p.32.
 Council Directive 81/602 was supplemented by Council Directive 85/358/EEC (OJNo. L191, 23.7.85, p.46).
 OJNo. L70, 16.3.88, p.16.
(f) not have been treated with substances dangerous or likely to be dangerous to human health that are transmissible to milk, unless any withdrawal period which may apply to it has been observed.
2 In addition to the requirements specified in paragraph 1 above—
(a) raw cows' milk and raw buffaloes' milk shall come from animals belonging to a herd which is officially tuberculosis-free and either brucellosis-free or officially brucellosis-free;
(b) raw cows' milk shall come from animals yielding at least two litres of milk per day;
(c) raw ewes' milk and raw goats' milk shall come from animals belonging to a production holding which is either brucellosis-free or officially brucellosis-free (Brucella melitensis) within the meaning of Article 2(4) and (5) of Council Directive 91/68/EEC.
 OJNo. L46, 19.2.91, p.19.
3 When different animal species are kept together on a production holding, each species shall satisfy the health conditions which would be required if it were alone.
PART II

Raw milk standards
1 Raw milk at the time of its collection from a licensed production holding for its acceptance at a treatment or processing establishment shall not contain—
(a) any added water,
(b) antibiotic residues in excess of the levels authorised in Annexes I and III of Council Regulation (EEC) No. 2377/90 on Community procedure for the establishment of maximum residue limits of veterinary medicinal products in foodstuffs of animal origin, as amended nor contain any combination of such substances in excess of a value to be fixed in accordance with that Council Regulation; or
OJNo. L224, 18.8.90, p.1.
Relevant amending instruments are Commission Regulation (EEC) No. 2701/94 (OJNo. L287, 8.11.94, p.7) which contains consolidated texts of Annexes I, II, III and IV to Council Regulation (EEC) No. 2377/90 and Commission Regulation (EEC) No. 2703/94 (OJNo. L287, 8.11.94, p.19).
(c) residues of substances having a pharmacological or hormonal action, or pesticides, detergents or other substances which are harmful or which might alter the organoleptic characteristics of dairy products or make their consumption dangerous or harmful to human health insofar as those residues exceed permitted tolerance limits.
2 In addition to the requirements specified in paragraph 1 above—
(a) raw cows' milk intended for the production of heat-treated drinking milk, fermented milk, junket, jellied milk, flavoured milk or cream shall meet the following standards:—
Plate count at 30°C (per ml)	≤ 100,000
Somatic cell count (per ml)	≤ 400,000
(b) raw cows' milk intended for the manufacture of any dairy products other than those referred to in sub-paragraph (a) above shall meet the following standards:—
	From 1.1.94	From 1.1.98
Plate count at 30°C (per ml)	≤ 400,000	≤ 100,000
Somatic cell count (per ml)	≤ 500,000	≤ 400,000
(c) raw cows' milk intended for the manufacture of any milk-based product (made with raw milk) which has not undergone any heat-treatment during its manufacture shall meet the following standards:—
Plate count at 30°C (per ml)	≤ 100,000
Somatic cell count (per ml)	≤ 400,000
Staphylococcus aureus (per ml)	n = 5, c = 2, m = 500, M = 2000
(d) raw goats', ewes' or buffaloes' milk intended for the production of heat-treated drinking milk or for the manufacture of heat-treated milk-based products shall meet the following standard:—
	From 1.1.95	From 1.12.99
Plate count at 30°C (per ml)	≤ 3,000,000	≤ 1,500,000
(e) raw goats', ewes' or buffaloes' milk intended for the manufacture of any milk-based product which has not undergone any heat-treatment during its manufacture shall meet the following standards:—
	From 1.1.95	From 1.12.99
Plate count at 30°C (per ml)	≤ 1,000,000	≤ 500,000
Staphylococcus aureus (per ml)	n = 5, c = 2, m = 500, M = 2000	
3 For the purposes of the tables set out in paragraph 2 above, the symbols referred to shall have the following meanings:—
n = number of sample units comprising the sample;
c = number of sample units where the bacteria count may be between ‘m’ and ‘M’, the sample being considered acceptable if the bacterial count of the other sample units is ‘m’ or less;
m = threshold value for the number of bacteria, the result is considered satisfactory if the number of bacteria in all sample units does not exceed ‘m’;
M = maximum value for the number of bacteria, the result is considered unsatisfactory if the number of bacteria in one or more sample units is ‘M’ or more.
4 The occupier shall ensure that—
(a) compliance with the standards for raw cows' milk referred to in paragraph 2(a)(b) and (c) above in relation to somatic cell count is checked by random sampling, either
(i) on a representative sample of the raw milk collected from each production holding; or
(ii) until 1st July 1997, on acceptance of the raw milk at the treatment establishment or processing establishment;
(b) compliance with the standards referred to in paragraph 2 above in relation to plate count and Staphylococcus aureus is checked by random sampling of a representative sample of the raw milk collected from each production holding;
(c) the plate count at 30°C is calculated on the basis of a geometric average over a period of two months, with at least two samples a month; and
(d) the somatic cell count is calculated on the basis of a geometric average over a period of three months, with at least one sample a month.

PART III CHECKS FOR ADDED WATER IN RAW MILK
1 Raw milk shall be subjected to regular checks and sampling to ascertain if water is being added to such milk.
2 Such checks shall include regular checks on the freezing point of raw milk supplied by each production holding and shall be carried out in accordance with the following procedure:—
(a) raw milk supplied by each production holding shall be subjected regularly to random sampling;
(b) where the raw milk of a single production holding is delivered directly to a processing establishment or a treatment establishment, the samples for checking shall be taken—
(i) when the raw milk is collected from the production holding for transport to such establishment, provided that adequate precautions are taken to prevent any fraud during such transport of the raw milk; or
(ii) before unloading the raw milk at the processing establishment or treatment establishment, when the delivery there is made by the occupier of the production holding;
(c) where raw milk delivered to a processing establishment or treatment establishment consists of a mixture of raw milk obtained from more than one production holding, the samples for checking shall be taken—
(i) in accordance with sub-paragraph (b) above, or
(ii) when the raw milk enters the dairy establishment, provided that spot checks are also carried out at the production holdings from which the raw milk was obtained; and
if the results of any of the checks on a sample of such mixture of raw milk lead to a suspicion that water has been added to such milk, samples for checking shall be taken from all the production holdings from which the raw milk was obtained.

SCHEDULE 4 REQUIREMENTS FOR DRINKING MILK
Regulations 9(2) and (4)(b) and 13(1)(b)(iv)

PART I RAW MILK FOR DRINKING

Raw ewes' and goats' milk
1 Drinking milk which is raw ewes' or goats' milk which is sold directly to the ultimate consumer by a producer of raw milk shall meet the following standards:—
Plate count at 30°C (per ml)	≤ 20,000
Coliforms (per ml)	< 100
In addition pathogenic micro-organisms and their toxins shall not be present in quantities such as to affect the health of the consumer.
2 Where raw ewes' or goats' milk has not passed through a milk collection centre it shall be transferred from one tank to another under hygienic conditions.

PART II RAW MILK FOR HEAT-TREATMENT
1 (1) Raw milk, at the time of its acceptance at a treatment establishment, unless treated within 4 hours of acceptance, shall be cooled to a temperature not exceeding 6°C and maintained at that temperature until heat treated.
(2) Where raw cows' milk is not treated within 36 hours of acceptance at a treatment establishment, a further test shall be carried out on such milk before it is heat-treated. If it is found by means of a direct or indirect method that the plate count of that milk at 30°C exceeds 300,000 per ml, then such milk shall not be used for the production of heat-treated drinking milk.

PART III HEAT-TREATED DRINKING MILK
1 Heat-treated drinking milk shall not contain—
(a) any pharmacologically active substance in a quantity higher than the limits laid down in Annexes I and III of Council Regulation (EEC) No. 2377/90 as amended nor contain any combination of such substances in excess of a value to be fixed in accordance with that Council Regulation;
OJNo. L224, 18.8.90, p.1.
Relevant amending instrument is Commission Regulation (EC) No. 2701/94 (OJNo. L287, 8.11.94, p.7) which contains consolidated texts of Annexes I, II, III and IV to Council Regulation (EEC) No. 2377/90.
(b) any added water.
2 In addition to complying with paragraph 1 above, pasteurised milk shall—
(a) have been obtained by means of a heat-treatment involving a high temperature for a short time (at least 71.7°C for 15 seconds or any equivalent combination) or a pasteurisation process using different time and temperature combinations to obtain an equivalent effect;
(b) show a negative reaction to the phosphatase test and a positive reaction to the peroxidase test using the methods of analysis specified in paragraph 2 of Schedule 11 and in the case of high temperature pasteurised milk, show a negative reaction to both tests and be labelled as “high-temperature pasteurised”; and
(c) meet the following microbiological standards in any random sampling checks carried out in the treatment establishment:—
Pathogenic micro-organisms	Absence in 25g n = 5, c = 0
Coliforms (per ml)	n = 5, c = 1, m = 0, M = 5
Plate count at 21°C (per ml) after incubation at 6°C for five days	n = 5, c = 1, m = 5 × 104, M = 5 × 105
3 In addition to complying with paragraph 1 above, sterilised and UHT milk shall, after it has spent fifteen days in a closed container at a temperature of 30°C or where necessary, seven days in a closed container at a temperature of 55°C, meet the following standards:—
(a) be organoleptically normal;
(b) not show any sign of deterioration;
(c) have a plate count at 30°C g 100 per ml.
4 In addition to complying with paragraphs 1 and 3 above, sterilised milk shall have been heated and sterilised either in a hermetically sealed wrapping or container, the seal of which shall remain intact during such heat-treatment, or by the use of the continuous flow process.
5 In addition to complying with paragraphs 1 and 3 above, UHT milk shall—
(a) be obtained by applying heat to a continuous flow of raw milk entailing the application of a high temperature for a short time (not less than 135°C for not less than a second) so that all residual spoilage micro-organisms and their spores are destroyed, but the chemical, physical and organoleptic changes to the milk are minimal;
(b) be placed immediately after completion of the heat-treatment process in aseptic opaque containers, or containers made opaque by the packaging; and
(c) in cases where it is obtained from a heat-treatment process which employs the direct contact of milk and steam, the steam shall be obtained from potable water. Such steam shall not leave deposits of foreign matter in the milk or affect it adversely. The use of this process shall be so as not to cause any change in the water content of the treated milk.
6 Pasteurised milk which has been subjected to high-temperature pasteurisation, UHT or sterilised milk may be produced from raw milk which has undergone thermisation or an initial heat-treatment in another processing or treatment establishment provided that—
(a) the initial treatment shall have had a time-temperature combination which is lower than or equivalent to the pasteurisation process as specified in paragraph 2 above;
(b) milk which has undergone the initial treatment shall have shown a positive reaction to the peroxidase test using the method of analysis specified in paragraph 2 of Schedule 11 before the second heat-treatment; and
(c) such practice is brought to the attention of the food authority.
7 Pasteurised milk may be produced from raw milk which has undergone only initial thermisation in accordance with the same conditions specified in paragraph 6 above.
8 The definition of the symbols specified in paragraph 3 of Part II of Schedule 3 shall apply for the purposes of the tables in paragraph 1 of Part I and paragraph 2 above of this Part.

SCHEDULE 5 REQUIREMENTS FOR MILK USED FOR THE MANUFACTURE OF MILK-BASED PRODUCTS
Regulation 9(3)(b), and (5), 13(1)(b)(vi) and 19(c)

PART I RAW MILK
1 Subject to paragraph 2 below, the occupier of the processing establishment shall take all necessary steps to ensure that the raw milk is treated, or that the production of milk-based products shall commence—
(a) as soon as possible after acceptance of the raw milk at the processing establishment, if the raw milk has not been refrigerated; or
(b) within 36 hours of such acceptance, if the raw milk is kept at a temperature not exceeding 6°C; or
(c) within 48 hours of such acceptance, if the raw milk is kept at a temperature of 4°C or lower; or
(d) within 72 hours, in the case of buffaloes', ewes' or goats' milk.
2 For technological reasons relating to the manufacture of certain milk-based products, the times and temperatures referred to in paragraph 1 above may be exceeded with the authorisation of the food authority.

PART II THERMISED MILK
1 Thermised milk shall—
(a) be obtained from raw milk and where thermisation of such raw milk has not commenced within 36 hours of its acceptance at the processing establishment, it shall have a plate count at 30°C prior to thermisation which does not exceed 300,000 per ml in the case of cows' milk;
(b) be obtained by the heating of raw milk for at least 15 seconds at a temperature between 57°C and 68°C such that after completion of the heating process the milk shows a positive reaction to the phosphatase test using the method of analysis specified in paragraph 2 of Schedule 11; and
(c) have a plate count at 30°C equal to or less than 100,000 per ml before heat-treatment if it is used to produce pasteurised, UHT or sterilised milk.

PART III PASTEURISED MILK
1 Pasteurised milk shall—
(a) be obtained by means of a heat-treatment involving a high temperature for a short time (at least 71.7°C for 15 seconds, or any equivalent combination) or a pasteurisation process using different time and temperature combinations to obtain an equivalent effect; and
(b) show a negative reaction to the phosphatase test and a positive reaction to the peroxidase test using the methods of analysis specified in paragraph 2 of Schedule 11 and in the case of high-temperature pasteurised milk, show a negative reaction to both those tests.

PART IV UHT MILK
1 UHT milk shall be obtained by applying heat to a continuous flow of milk entailing the application of a high temperature for a short time (not less than + 135°C for not less than a second) so that all residual spoilage micro-organisms and their spores are destroyed but the chemical, physical and organoleptic changes to the milk are minimal.

SCHEDULE 6 REQUIREMENTS FOR MILK-BASED PRODUCTS
Regulations 3(3), 9(6) and 13(1)(b)(vi)

PART I MICROBIOLOGICAL CRITERIA
1 On removal from the processing establishment milk-based products shall not contain pathogenic micro-organisms and toxins from pathogenic micro-organisms in such quantity as to affect the health of the ultimate consumer.
2 Sterilised or ultra heat-treated milk-based products which are in liquid or gel form and are intended for conservation at room temperature shall meet the following standards after incubation at 30°C for 15 days:—
(a) have a plate count at 30°C g 100 per ml; and
(b) be organoleptically normal.
3 Subject to paragraph 5 below, milk-based products shall meet the standards referred to in the tables below upon removal from the processing establishment—
TABLE A
Product	Type of micro-organism	Standard (m1,g)
(i) Cheese, other than hard cheese	Listeria monocytogenes	Absence in 25g where n = 5, c = 0
(ii) Milk-based products, other than cheese covered by (i) above	Listeria monocytogenes	Absence in 1g
(iii) Milk powder	Salmonella spp	Absence in 25g where n = 10, c = 0
(iv) Milk-based products, other than milk powder	Salmonella spp	Absence in 25g where n = 5, c = 0
The sample of 25g referred to in paragraph (i) of table A above shall consist of 5 specimens of 5g taken from different parts of the same product.
TABLE B
Product	Type of micro-organism	Standard (m1,g)
(i) Cheese made from raw milk or from thermised milk	Staphylococcus aureus	n = 5, c = 2, m = 1,000, M = 10,000
	Escherichia coli	n = 5, c = 2, m = 10,000, M = 100,000
(ii) Soft cheese made from heat-treated milk	Staphylococcus aureus	} n = 5, c = 2, m = 100, M = 1,000
	Escherichia coli	
(iii) Fresh cheese	Staphylococcus aureus	} n = 5, c = 2, m = 10, M = 100
Powdered milk	Staphylococcus aureus	
Frozen milk-based products including ice-cream	Staphylococcus aureus	
4 The definition of the symbols specified in paragraph 3 of Part II of Schedule 3 shall apply for the purposes of the tables in paragraph 3 above.
5 Testing of the milk-based products referred to in table A of paragraph 3 above shall not be compulsory for sterilised milk, preserved milk-based products and milk-based products where the heat-treatment was applied after wrapping or packaging.
6 Sampling programmes shall be drawn up by the occupier of the dairy establishment in the light of the nature of the dairy products and the principles of risk analysis.
7 In all cases where the standards in table A of paragraph 3 above are exceeded, the dairy products shall be excluded from human consumption and withdrawn from the market.
8 In all cases where the standards in table B of paragraph 3 above are exceeded, there shall be a review of the implementation of the methods for monitoring and checking critical points applied in the processing establishment. The occupier of the processing establishment shall inform the food authority of the corrective procedures included in the production monitoring system to prevent any repetition of the occurrence.
9 Wherever the standard M in table B of paragraph 3 above is exceeded in the case of cheese made from raw milk, thermised milk or soft cheese, testing shall be carried out for—
(a) the possible presence of strains of enterotoxigenic Staphylococcus aureus or Escherichia coli that are presumed to be pathogenic; and
(b) if necessary the possible presence of Staphylococcal toxins in such products,
by a method determined in accordance with Article 31 of Council Directive 92/46, as specified in paragraph 2 of Chapter II of Annex C to that Directive.
10 If the strains referred to in paragraph 9 above are identified or staphylococcus enterotoxins are found, then all the batches of the cheese involved shall be withdrawn from the market. In this case the occupier shall inform the food authority of such findings, of the action taken to withdraw the batches in question and the corrective procedures introduced into the production monitoring system to prevent any repetition of the occurrence.

PART II PASTEURISED CREAM
1 Pasteurised cream shall be heated—
(a) to a temperature of not less than 63°C and retained at that temperature for not less than 30 minutes;
(b) to a temperature of not less than 72°C and retained at that temperature for not less than 15 seconds; or
(c) to such other temperature for such other period of time as has equivalent effect to sub-paragraph (a) or (b) above necessary for the elimination of vegetative pathogenic organisms in the cream.
2 The cream shall—
(a) be cooled as soon as practicable after pasteurisation, and
(b) show a negative reaction to the phosphatase test using the method of analysis specified in paragraph 5 of Schedule 11.

PART III STERILISED CREAM
1 Sterilised cream shall be heated—
(a) to a temperature of not less than 108°C and retained at that temperature for not less than 45 minutes; or
(b) to such other temperature for such other period of time as has equivalent effect to sub-paragraph (a) above necessary for the elimination of vegetative pathogenic organisms.
2 The cream shall be cooled as soon as practicable after sterilisation.
3 Sterilised cream shall meet the standard referred to in paragraph 2(a) of Part I of this Schedule.

PART IV ULTRA HEAT-TREATED CREAM
1 Ultra heat-treated cream shall be heated—
(a) to a temperature of not less than 140°C and retained at that temperature for at least 2 seconds; or
(b) to such other temperature for such other period of time as has equivalent effect to sub-paragraph (a) above necessary for the elimination of vegetative pathogenic organisms.
2 The cream shall be cooled as soon as practicable after being ultra heat-treated.
3 Ultra heat-treated cream shall meet the standard referred to in paragraph 2(a) of Part I of this Schedule.

PART V PASTEURISED ICE-CREAM
1 Pasteurised ice-cream shall be obtained by the mixture being heated—
(a) to a temperature of not less than 65.6°C and retained at that temperature for not less than 30 minutes;
(b) to a temperature of not less than 71.1°C and retained at that temperature for not less than 10 minutes; or
(c) to a temperature of not less than 79.4°C and retained at that temperature for not less than 15 seconds;
and then reduced to a temperature of not more than 7.2°C within 1½ hours and kept at such temperature until the freezing process begins.
2 If the temperature of ice-cream has risen above minus 2.2°C at any time since it was frozen it shall not be sold or offered for sale unless—
(a) it has again been subjected to the heat-treatment to which as a mixture it was required to be subjected under paragraph 1 above; and
(b) after having again been frozen, it has been kept at a temperature not exceeding minus 2.2°C.
3 In the case of a complete cold mix which is reconstituted with the addition of water only, it shall not be necessary for it to be subjected to further heat-treatment by pasteurisation as specified in paragraph 1 above.
4 If a complete cold mix reconstituted with the addition of water only is frozen, it shall comply with paragraph 2 above.

PART VI STERILISED ICE-CREAM
1 Sterilised ice-cream shall be obtained by the mixture being heated to a temperature of not less than 148.9°C for at least 2 seconds.
2 After the mixture has been sterilised as specified in paragraph 1 above, it shall be reduced to a temperature of not more than 7.2°C within 1½ hours and shall be kept at such a temperature until the freezing process begins.
3 Paragraph 2 above shall not apply to a mixture which has been sterilised in accordance with paragraph 1 above if immediately after the mixture has been sterilised it is placed in sterile airtight containers under sterile conditions and the container remains unopened.
4 If the temperature of ice-cream has risen above minus 2.2°C at any time since it was frozen it shall not be sold or offered for sale unless—
(a) it has again been subjected to the heat-treatment to which as a mixture it was required to be subjected to under paragraph 1 above; and
(b) after having again been frozen, it has been kept at a temperature not exceeding minus 2.2°C.
5 In the case of a complete cold mix which is reconstituted with the addition of water only, it shall not be necessary for it to be subjected to further heat-treatment by sterilisation as specified in paragraph 1 above.
6 If a complete cold mix reconstituted with the addition of water only is frozen, it shall comply with paragraph 4 above.

SCHEDULE 7 STORAGE REQUIREMENTS
Regulations 4(3)(a) and (6), 11(1)(a), 13(3)(f) and 19(d)
1 Immediately after milking, raw milk shall be placed in a clean place which is suitably equipped so as to prevent the raw milk suffering from any adverse effects.
2 (1) Where raw milk is—
(a) collected daily from a production holding it shall, if not collected within two hours of milking, be cooled as soon as practicable after milking to a temperature of 8°C or lower and be maintained at that temperature until collected; or
(b) not collected daily from a production holding it shall be cooled as soon as practicable after milking to a temperature of 6°C or lower and be maintained at that temperature until collected.
(2) For technological reasons relating to the manufacture of certain milk-based products and provided the end products meet the microbiological criteria specified in Part I of Schedule 6, the temperatures referred to in sub-paragraph (1) above may be exceeded with the authorisation of the food authority.
3 Upon acceptance at a treatment establishment milk shall, unless heat-treated within four hours of acceptance, be cooled to a temperature of 6°C or lower, if not already at such temperature, and be maintained at that temperature until heat-treated.
4 When the pasteurisation process is completed, pasteurised milk shall be cooled as soon as practicable to a temperature of 6°C or lower.
5 Subject to paragraph 7 below, any dairy product not intended to be stored at ambient temperature shall be cooled as quickly as possible to the temperature established by the manufacturer of the product as suitable to ensure its durability and thereafter stored at that temperature.
6 Where dairy products other than raw milk are stored under cooled conditions, their storage temperatures shall be registered and the cooling rate shall be such that the products reach the required temperature as quickly as possible.
7 The maximum temperature at which pasteurised milk may be stored until it leaves the treatment establishment shall be 6°C.

SCHEDULE 8 TRANSPORT REQUIREMENTS
Regulations 11(1)(a) and (b), 13(3)(f) and 19(d)

PART I TEMPERATURE
1 The temperature of raw milk during transport to a treatment or processing establishment shall not exceed 10°C, unless the milk has been collected within 2 hours of milking. However, for technological reasons relating to the manufacture of certain milk-based products and, provided the end products meet the microbiological criteria specified in Part I of Schedule 6 such requirement as to temperature may be exceeded with the authorisation of the food authority.
2 (1) Subject to sub-paragraphs (2) and (3) below, the temperature of pasteurised milk during transportation in tanks or packed in small containers or in churns shall not exceed 6°C.
(2) Where pasteurised milk is intended for delivery to a retail business, the temperature of such milk during transportation shall not exceed 8°C.
(3) The requirements as to temperature specified in sub-paragraphs (1) and (2) above shall not apply for milk intended for doorstep delivery.
3 Any vehicle or container used for transporting raw or pasteurised milk shall be designed and equipped in such a way that the temperatures specified in paragraphs 1 and 2 above shall be maintained throughout the period of such transport.

PART II HYGIENE
1 Any vehicle used for transporting heat-treated drinking milk and milk in small containers or in churns shall be so designed as to give the containers or churns adequate protection against all contamination and atmospheric influences. It shall be maintained in good condition and shall not be used to transport any animals of any species or any other product or object likely to cause the milk to deteriorate. Those parts of the vehicle intended to come into contact with the small containers or churns shall be smooth and easy to wash, clean and disinfect.
2 Any tank, churn or other container used for transporting raw milk or pasteurised milk shall be so designed that—
(a) any surface which may come into contact with the milk shall be made of a material which is easy to wash, clean and disinfect, resists corrosion, and does not transfer substances to the milk in such quantity as to endanger human health, impair the composition of the milk or adversely affect the organoleptic characteristics of the milk;
(b) the milk can drain away completely;
(c) if they are fitted with taps, these shall be easy to remove, dismantle, wash, clean and disinfect; and
(d) except in the case of a container or tank designed solely for the transport of raw milk, any container or tank in which pasteurised milk is transported shall be hermetically sealed before and during transportation by means of a watertight sealing device.
3 As soon as possible after each journey, or after each series of journeys where there is only a very short period between unloading and the following loading but, in any event, at least once each working day, any container or tank used to transport raw milk or pasteurised milk to a dairy establishment shall be washed, cleaned and disinfected after each use and, as necessary before further use.
4 Any tank used to transport milk shall bear a clear indication that it may be used only for the transport of foodstuffs.
5 Any tank used to transport dairy products may not be used for the transport of other foodstuffs unless adequate measures are taken to prevent contamination or deterioration of these dairy products.
6 Dairy products shall be despatched in such a way that they are protected during transportation from anything liable to contaminate them or cause them to deteriorate. For this purpose account shall be taken of the duration of the journey, the means of transport employed and the weather conditions.

PART III COMMERCIAL DOCUMENT
1 Heat-treated drinking milk and milk-based products shall be accompanied during transport by a commercial document bearing the following particulars:—
(a) the details required on the health mark specified in paragraphs 4 and 5 of Part II of Schedule 10;
(b) an indication of the nature of the heat-treatment used to produce the heat-treated drinking milk or milk-based product;
(c) an indication of the initial heat-treatment in the case of heat-treated drinking milk referred to in paragraphs 6 and 7 of Part III of Schedule 4;
(d) an indication enabling the identification of the food authority responsible for supervising the dairy establishment of origin if such information is not clear from the approval number.

SCHEDULE 9 WRAPPING AND PACKAGING
Regulations 11(1)(c) and 19(a)
The requirements of this Schedule shall apply without prejudice to the Materials and Articles in Contact with Food Regulations 1987.
1 Wrapping and packaging shall be strong enough to protect the dairy products effectively.
2 The wrapping and packaging of dairy products shall take place under satisfactory hygienic conditions and in rooms provided for that purpose.
3 Notwithstanding paragraph 2 above, the manufacture and packaging of dairy products may take place in the same room if the following conditions are satisfied:—
(a) the room shall be sufficiently large and equipped to ensure the hygiene of the operations;
(b) the wrapping and packaging shall have been brought to the treatment or processing establishment in a protective cover in which they were placed immediately after manufacture and which protects the wrapping or packaging from any damage during transport to the dairy establishment, and they shall have been stored there under hygienic conditions in a room intended for that purpose;
(c) the rooms for storing the packaging material shall be free from vermin and from amounts of dust which could constitute an unacceptable risk of contamination of the product and shall be separated from rooms containing substances which might contaminate the products. Packaging shall not be placed directly on the floor;
(d) packaging shall be assembled under hygienic conditions before being brought into the room; except in the case of the automatic assembly of packaging, provided that there is no risk of contamination of the products;
(e) packaging shall be brought into the room under hygienic conditions and used without delay. It shall not be handled by staff handling unwrapped products if there is a risk of cross contamination; and
(f) immediately after packaging, the dairy products shall be placed in the rooms provided for storage.
4 Bottling or filling of containers with heat-treated milk or liquid milk-based products shall be carried out mechanically, and the sealing of the containers shall be carried out automatically. However in the case of limited production non-automatic sealing methods may be used with the authorisation of the food authority, provided that those methods provide equal assurances with regard to hygiene.
5 Wrapping or packaging may not be re-used for dairy products, except where the containers are of a type which may be re-used after thorough cleaning and disinfecting.
6 Sealing shall be carried out in the dairy establishment in which the last heat-treatment of drinking milk or liquid milk-based products has been carried out, immediately after filling, by means of a sealing device which ensures that the milk is protected from any adverse effects of external origin on its characteristics. The sealing device shall be so designed that once the container has been opened, the evidence of opening remains clear and easy to check.
S.I.1987/1523, to which there are amendments not relevant to these Regulations.

SCHEDULE 10 LABELLING AND HEALTH MARKING
Regulation 11(1)(d) and 21(5)(b)

PART I LABELLING
1 In addition to the health mark requirements specified in Part II of this Schedule, the occupier of the dairy establishment shall ensure that the packaging of heat-treated milk and liquid milk-based products shall display visibly and legibly the following particulars for control purposes:—
(a) the nature of the heat-treatment applied to the milk;
(b) an indication, which may be in code, enabling the date of the last heat-treatment referred to in sub-paragraph (a) above, to be established; and
(c) in the case of pasteurised milk, the temperature at which the product shall be stored.
2 The particulars specified in paragraph 1 above need not appear on re-usable glass bottles referred to in regulation 27 of the Food Labelling (Scotland) Regulations 1984.
S.I.1984/1519; relevant amending instrument is 1990/2506.
3 Without prejudice to the Food Labelling (Scotland) Regulations 1984 or the Milk Labelling (Scotland) Regulations 1983 as the case may be, the labelling must show clearly for inspection purposes the following particulars:—
(a) the words “raw milk” for raw drinking milk intended for direct human consumption;
(b) the words “made with raw milk” for raw milk-based products manufactured from raw milk whose manufacturing process does not include thermisation or heat-treatment;
(c) in the case of milk-based products other than those referred to in sub-paragraph (b) above, the nature of any heat-treatment applied at the end of the manufacturing process;
(d) for milk-based products in which the growth of micro-organisms can occur, the use-by or minimum durability date.
S.I.1983/938; the relevant amending instrument is S.I.1990/2508.

PART II HEALTH MARK
1 Dairy products shall carry a health mark in an easily visible place. It shall be legible, indelible and its characters easily distinguishable.
2 Marking shall be carried out during or immediately after manufacture in the dairy establishment. The health mark may be applied to the dairy product, or to the wrapping or to a label affixed to the wrapping. Where small dairy products are individually wrapped and packaged together or where such small individually wrapped portions are supplied to the ultimate consumer, it shall be sufficient for the health mark to be applied to their collective packaging.
3 Where a dairy product marked in accordance with paragraphs 1 and 2 above is subsequently placed in packaging, the health mark shall also be applied to the packaging.
4 Subject to paragraph 5 below, the health mark shall consist of an oval surround containing in legible form and in printed capital letters the following information:—
Either—
(a) (i) in the upper part, the letters “UK”, followed by the approval number of the dairy establishment, and
(ii) in the lower part, the letters “EEC”; or
(b) (i) in the upper part, the words “UNITED KINGDOM”,
(ii) in the centre, the approval number of the establishment, and
(iii) in the lower part, the letters “EEC”; or
(c) (i) in the upper part, the letters “UK”;
(ii) in the centre, a reference to where the approval number of the establishment is shown, and
(iii) in the lower part, the letters “EEC”.
5 In the case of bottles, packaging and receptacles referred to in regulation 27 of the Food Labelling (Scotland) Regulations 1984, the health mark may indicate only the letters “UK” and the approval number of the establishment.
6 The health mark may be applied to the product, wrapping or packaging by an ink stamp or by branding, or it may be printed on or applied to a label.
7 The health mark may also consist of an irremovable plate of resistant material complying with hygiene requirements and bearing the information specified in paragraph 4 above.

SCHEDULE 11 METHODS OF ANALYSIS
Regulation 10
1 The reference methods for the analysis and testing of dairy products in order to ascertain if they meet the requirements specified in Schedules 3, 4, 5 and 6 shall be those specified in the following paragraphs of this Schedule.
2 In relation to raw milk and heat-treated milk, the methods shall be those specified in Commission Decision 91/180/EEC for the following:—
(a) enumeration of micro-organisms — plate count at 30°C;
(b) enumeration of somatic cells in cows' milk;
(c) determination of phosphatase activity in cows' milk;
(d) determination of peroxidase activity in cows' milk;
(e) detection of pathogenic micro-organisms;
(f) enumeration of coliforms — colony count at 30°C;
(g) enumeration of micro-organisms — plate count at 21°C.
OJNo. L93, 13.4.91, p.1.
3 In relation to milk-based products, the test for enumeration of micro-organisms — plate count at 30°C shall be the method specified in IDF Standard 100B: 1991; Milk and milk products — micro-organisms — colony count at 30°C.
4 In relation to milk-based products, the test for enumeration of coliforms shall be the method specified in 1SO 5541 Part 2 1986. Milk and milk products — Part 2; Most probable number technique at 30°C.
5 In relation to the following tests, the methods for the analysis and testing shall be those specified below:—
Test	Method
(a) Detection of Staphylococcus aureus	Provisional IDF Standard 145: 1990. Milk and milk-based products. Enumeration of Staphylococcus aureus in products other than dried milk-Colony count technique at 37°C.
(b) Enumeration of Staphylococcus aureus in powdered milk	Provisional IDF Standard 138: 1986. Dried Milk. Enumeration of Staphylococcus aureus. Colony count technique at 37°C.
(c) Detection of Salmonella spp	ISO 6579: 1993. Microbiology — General guidance on methods for the detection of Salmonella and IDF Standard 93A:1985; sample preparation.
(d) Detection of Listeria monocytogenes	ISO 10560: 1993. Milk and milk products—Detection of Listeria monocytogenes.
(e) Enumeration of Escherichia coli in milk-based products	Provisional IDF Standard 170: 1994. Milk and milk products. Enumeration of presumptive Escherichia Coli content by— (i) most probable number technique (ii) most probable number technique with use of 4—methylumbelliferyl—β—D—glucuronide (MUG) (iii) Colony count technique at 44°C using membranes.
(f) Detection of phosphatase (Residual) in cream	AOAC official method 950.41: Official Methods of Analysis, 16th edition: 1995.
(g) Detection of phosphatase (Reactivated and Residual) in cream	AOAC official method 965.27: Official Methods of Analysis, 16th edition: 1995.
6 Any other internationally accepted analysis and test method as referred to in Article 20(1) of Council Directive 92/46 shall be recognised as a reference method.
7 In this Schedule—
“IDF Standard” means a standard of the International Dairy Federation;
“ISO” means a standard of the International Organisation for Standardisation; and
“AOAC” means the Association of Official Analytical Chemists.

SCHEDULE 12 REVOCATIONS
Regulation 23
Column 1	Column 2	Column 3
The Milk and Dairies (Channel Islands and South Devon Milk) (Scotland) Regulations 1967	S.I.1967/81	All the Regulations
The Milk Bottles (Labelling and Cap Colour) (Scotland) Order 1976	S.I.1976/875	All the Regulations
The Milk-based Drinks (Scotland) Regulations 1983	S.I.1983/1514	All the Regulations
The Cream (Heat Treatment) (Scotland) Regulations 1983	S.I.1983/1515	All the Regulations
The Food (Revision of Penalties and Mode of Trial) (Scotland) Regulations 1985	S.I.1985/1068	The references in Schedule 1 to the Milk and Dairies (Channel Islands and South Devon Milk) (Scotland) Regulations 1967, the Milk-based Drinks (Scotland) Regulations 1983 and the Cream (Heat Treatment) (Scotland) Regulations 1983
The Cream (Heat Treatment) (Scotland) Amendment Regulations 1985	S.I.1985/1222	All the Regulations
The Cream (Heat Treatment) (Scotland) Amendment Regulations 1986	S.I.1986/789	All the Regulations
The Milk-based Drinks (Scotland) Amendment Regulations 1986	S.I.1986/790	All the Regulations
The Importation of Milk (Scotland) Regulations 1988	S.I.1988/1814	All the Regulations
The Milk and Dairies (Semi-skimmed and Skimmed Milk) (Heat Treatment) (Scotland) Regulations 1988	S.I.1988/2190	All the Regulations
The Milk (Special Designations) (Scotland) Order 1988	S.I.1988/2191	The whole Order
The Cream (Heat Treatment) (Scotland) Amendment Regulations 1990	S.I.1990/2392	All the Regulations
The Food Safety (Sampling and Qualifications) Regulations 1990	S.I.1990/2463	The references in Schedule 1 to the Milk-based Drinks (Scotland) Regulations 1983, the Cream (Heat Treatment) (Scotland) Regulations 1983, the Milk and Dairies (Semi-Skimmed and Skimmed Milk) (Heat Treatment) (Scotland) Regulations 1988 and the Milk (Special Designations) (Scotland) Order 1988
The Milk and Dairies (Scotland) Regulations 1990	S.I.1990/2507	All the Regulations except 1, 2, 10, 18, 19 and 20
The Food Safety Act 1990 (Consequential Modifications) (Scotland) Order 1990	S.I.1990/2625	Part VI and the references to the Milk-based Drinks (Scotland) Regulations 1983 in Schedule 1, Part I, Schedule 3, Part I, Schedule 5 and Schedule 8; to the Cream (Heat Treatment) (Scotland) Regulations 1983 in Schedule 1, Part I, Schedule 3, Part I, Schedule 4 and Schedule 8; to the Milk Bottles (Labelling and Cap Colour) (Scotland) Order 1976 in Schedule 1, Part II; to the Milk and Dairies (Channel Islands and South Devon Milk) (Scotland) Regulations 1967 in Schedule 4 and Schedule 8; to the Importation of Milk (Scotland) Regulations 1988 in Schedule 3, Part I; to the Milk and Dairies (Semi-Skimmed and Skimmed Milk) (Heat Treatment) (Scotland) Regulations 1988 in Schedule 1, Part I, Schedule 3, Part I, Schedule 4 and Schedule 8
The Milk and Dairies (Standardisation and Importation) (Scotland) Regulations 1992	S.I.1992/3136	Regulations 2, 5 and 6

(This note is not part of the Regulations)
These Regulations, which apply to Scotland, give effect to the provisions of Council Directive 92/46/EEC as defined in regulation 2(1), laying down the health rules for the production and placing on the market of raw milk, heat-treated milk and milk-based products. They also revoke and replace the Regulations specified in Schedule 12 and re-enact provisions that are compatible with Council Directive 92/46/EEC.
The Regulations also amend the Drinking Milk (Scotland) Regulations 1976 to make it an offence to use a name to describe a food in breach of Article 3(2) of Council Regulation (EEC) No.1411/71 (OJNo. L148, 3.7.71, p.213) (OJ/SE 1971 Vol II, p.412) as amended by Council Regulation (EEC) No. 566/76 (OJNo. L67, 15.3.76, p.23) as read with the corrigendum at OJNo. L 107, 24.4.76, p.22.
The principal changes the Regulations make are—
(a) the provision of detailed requirements for the approval of dairy establishments;
(b) the extension of the health rules applicable for the production of cows' milk, to the milk of sheep, goats and buffaloes;
(c) the provision of microbiological standards for the manufacture of dairy products; and
(d) subject to specified exemptions, a requirement for the health marking of all dairy products.
The Regulations do not apply to a production holding or dairy establishment where dairy products are produced exclusively for the consumption of the occupier and others in his household or in the case of a dairy establishment where products are not sold in the course of a business; neither do they apply to a catering establishment or retail premises selling dairy products, or to persons engaged in the production, handling or sale of such products in a catering establishment or retail premises, (with the exception of specified requirements relating to cream, ice-cream, and raw cows' milk). Farm premises where raw dairy products are sold exclusively direct to the ultimate consumer are also exempt from the approval, labelling and other specified requirements (regulation 3).
The Regulations—
(a) prohibit the use of any premises as a production holding for the production of raw milk unless they are licensed and makes provision for the licensing, on application, by the food authority (regulation 4);
(b) provide for the allotment of a number for each licensed production holding and the keeping of a list of such holdings, by the food authority (regulation 5);
(c) prohibit the use of any premises as a dairy establishment unless they are approved and make provision for the approval, on application, by the food authority; they also make special provision for the approval of low capacity dairy establishments which may not comply with all the requirements applicable to other dairy establishments (regulation 6);
(d) provide for the allotment of an approval number for each approved dairy establishment and make provision for the keeping of a list of such establishments, by the food authority (regulation 7);
(e) provide for the revocation of licences and approvals and for a right of appeal (regulation 8);
(f) specify the conditions to be complied with in relation to the sale for human consumption of raw, thermised or heat-treated drinking milk, or heat-treated milk intended for the manufacture of milk-based products or milk-based products and prohibit the sale of any such dairy products unless those conditions are complied with (regulation 9);
(g) specify the methods of analysis and testing of dairy products (regulation 10);
(h) specify the conditions to be complied with in relation to the handling, storing, transporting, wrapping, packaging, health marking and labelling of dairy products; require the retention and production of specified documents; prohibit the use of a mark resembling a health mark and specify a temporary exemption (regulation 11);
(i) prohibit the sale of raw or thermised cows' milk as drinking milk and the sale of raw cream and regulate the sale of raw milk from ewes, goats and buffaloes as drinking milk (regulation 12);
(j) specify the duties of a occupier of a dairy establishment or any person who buys raw milk for re-sale (regulation 13);
(k) provide for a dairy farm already licensed under the Milk and Dairies (Scotland) Regulations 1990 to be deemed to be a licensed production holding under these Regulations (regulation 14);
(l) provide for a temporary derogation for specified dairy establishments and also enable the food authority to prohibit dairy products prepared in such establishments from bearing a health mark (regulation 15);
(m) make provision for the enforcement and execution of the Regulations and the supervision by the food authority of licensed production holdings and those dairy establishments which it has approved (regulation 16);
(n) require the food authorities to provide specified information to the Secretary of State (regulation 17);
(o) create offences and prescribe penalties (regulation 18);
(p) authorise the food authority to grant derogations in relation to specified requirements (regulation 19);
(q) specify various sections of the Act incorporated into the Regulations (regulation 20);
(r) make provision for the sale of dairy products from England and Wales, Northern Ireland, the Isle of Man and the Channel Islands (regulation 21);
(s) specify import requirements (regulation 22); and
(t) specify revocations (regulation 23) and consequential amendments (regulation 24).
The Contracting Parties to the EEA Agreement are the fifteen Member States of the European Union, Norway, Iceland and Liechtenstein. (See also the definition of “EEA State” in regulation 2(1)).
Information as to International Dairy Federation Standards referred to in these Regulations can be obtained by post from the International Dairy Federation, 41 Square Vergote, B-1040 Brussels, Belgium.
Information as to International Organisation for Standardisation Standards referred to in these Regulations can be obtained by post from the International Organisation for Standardisation, 1 Rue de Varembe, Case Postale 56, CH-1211 Geneva 20, Switzerland.
The AOAC methods referred to in Schedule 11 are used by the International Dairy Federation and the International Organisation for Standardisation and are published by the Association of Official Analytical Chemists. Copies can be obtained by post from the Assistant Business Manager, Publications, Association of Official Analytical Chemists, 1111 N 19th Street (Suite 210), Arlington, VA 22209, USA.
A Compliance Cost Assessment in relation to these Regulations has been placed in the libraries of both Houses of Parliament. Copies may be obtained from the Scottish Office Agriculture and Fisheries Department, Pentland House, 47 Robb’s Loan, Edinburgh EH14 1TY.