1994 No. 3119
MEDICINES
The Medical Devices (Consequential Amendments—Medicines) Regulations 1994
Made 7th December 1994
Laid before Parliament 8th December 1994
Coming into force 1st January 1995
The Secretary of State and the Minister of Agriculture, Fisheries and Food, acting jointly, in exercise of the powers conferred by section 2(2) of the European Communities Act 1972 and of all other powers so enabling them, hereby make the following Regulations:
1972 c. 68; the Secretary of State and the Minister of Agriculture, Fisheries and Food have been designated for the purposes of section 2(2) in relation to medicinal products by S.I.1972/1811; the Secretary of State has also been designated for those purposes in relation to measures relating to medical devices other than active implantable medical devices by S.I.1993/2661.