1 Citation, commencement and date of effect
1 This Order may be cited as the Electricity Generators (Rateable Values) (Scotland) Order 1994 and shall come into force on the day after the day on which it is made.
2 This Order shall have effect as from 1st April 1994.
In terms of subsection (6) of section 6 of the 1975 Act, an order under that section may provide that the order shall have effect as from the beginning of the financial year in which it is made.