SCHEDULE 2 (Amendment of the principal Regulations coming into force on 1st January 1995)

2 General provisions
(1) Except in respect of references to “Schedule 4 machinery”, the words “or a relevant safety component”, “or relevant safety component”, “or a safety component” or “or safety component” shall be inserted, as the context may require, after the words “relevant machinery” or “machinery” wherever they occur in the definitions specified in sub-paragraph (2) below, the regulations specified in sub-paragraph (3) below and, except for paragraph 6 thereof, in Schedule 6 (including the definition of “machinery for use at work” in paragraph 9 thereof).
(2) The definitions referred to in sub-paragraph (1) above are the definitions in regulation 2(2) of “EC type-examination certificate”, “relevant essential health and safety requirements”, “responsible person”, “series manufacture”, “supply”, “technical file” and “technical specification”.
(3) The regulations referred to in sub-paragraph (1) above are regulations 6(1), 10(1)(a), 12 (except in paragraphs (1)(c)(ii) and (1)(d)), 13, 14, 15, 16, 18(4)(a), 20(1) and (4), and 24(1).