SCHEDULE 1
Regulation 4

PART I Index to the table of fees for the examination of vehicles or parts of vehicles set out in Part II.

Section A —Component Tests
Fee Series	Subject Matter
01000	Headlamps
03000	Signal lamps
05000	Other lamps
07000	Filament lamps
09000	Seat belts
11000	Child restraints
13000	Glass
15000	Mirrors
17000	Other components

Section B —Vehicle Tests
Fee Series	Subject Matter
20000	Electronic systems
22000	Engine related tests
	Emissions—light vehicles
	Emissions—heavy vehicles
	Power and fuel consumption
24000	Sound levels
26000	Dynamic testsBrakes—trailers
	Brakes—other vehicle types
	Motorcycle brakes
27000	Steering Temporary spare wheel Speedometers
28000 Body structure
	Latches and hinges
	Protective steering
	Other impacts (ie rear impact, head-on impact)
	Fire risks
	Seat belts and anchorages
29000	Seat tests
	Body and trim (ie interior fittings, external projections)
	Rear and side protection (incl. fuel tanks)
30000	Visibility
	Rear view mirrors
	Forward field of vision
	Defrost and demist systems
31000	Wiper and washer systems
	Heating systems
32000	Lighting installation
	Installation of lighting
	Headlamp cleaners
34000	Tyres
36000	Controls
	Anti-theft devices
	Foot controls
	Identification of controls, tell-tales and indicators
38000	PSV tests
40000	Other vehicle tests
	Statutory plates
	Space for mounting and fitting of rear registration plates
	Towing hooks
	Mechanical couplings
	Measurement of maximum speed
	Speed limiters
	Masses and dimensions
50000	Tests for agricultural and forestry tractors

PART II TABLE OF FEES FOR THE EXAMINATION OF VEHICLES OR PARTS OF VEHICLES
1 Fee No.	2 Approval requirements	3 Particulars of type of examination, or vehicle part where not uniform in relation to each approval requirement	4 Amount of fee for examination
	(a) Subject matter	(b) Document in which requirement is specified	
	(a) £	(b) £	
			

SECTION A —COMPONENT TESTS

01 —HEADLAMPS
01001	Headlamps emitting an asymmetrical passing beam or driving beam or both	Directive 76/761/EEC or	Type C	836	—
01002		ECE Regulation 1 or	Type R	766	—
01003		Item 6 in Schedule 1 to the G.B. Regs	Type CR	936	—
01004	Headlamps emitting an asymmetrical passing	Directive 89/517/EEC	Type C	1856	—
01005	beam or driving beam or both	or	Type R	1786	—
01006		ECE Regulation 1.01	Type CR	1967	—
01201	Sealed-beam headlamps emitting a European asymmetrical passing beam or a	ECE Regulations 5 and 5.01 or	Type SR	1646	—
01202	driving beam or both	Item 6 in Schedule 1 to the G.B. Regs	Type SC	1786	—
01203			Type SCR	2056	—
01204	Sealed-beam headlamps emitting a European asymmetrical passing beam or a	ECE Regulation 5.02 or	Type SR	2666	—
1205	driving beam or both	Item 6 in Schedule 1 to the G.B. Regs	Type SC	2806	—
01206			Type SCR	3076	—
01401	Headlamps emitting an asymmetrical passing	ECE Regulation 8	Type HC	906	—
01402	beam or a driving beam or both and	or	Type HR	846	—
01403	equipped with halogen H1, H2 or H3 filament lamps	Item 6 in Schedule 1 to the G.B. Regs	Type HCR	1027	—
01406	Headlamps emitting an asymmetrical passing	ECE Regulation 8.04	Type HC	1936	—
01407	beam or a driving beam or both and	or	Type HR	1866	—
01408	equipped with halogen H1, H2 or H3 filament lamps	Item 6 in Schedule 1 to the G.B. Regs	Type HCR	2056	—
01601	Headlamps emitting an asymmetrical passing	ECE Regulations 20 and 20.01	Type HC	906	—
01602	beam or a driving beam or both and	or	Type HR	846	—
01603	equipped with halogen filament lamps (H4 lamps)	Items 6 and 6A in Schedule 1 to the G.B. Regs	Type HCR	1027	—
01604	Headlamps emitting an asymmetrical passing	ECE Regulation 20.02	Type HC	1936	—
01605	beam or a driving beam or both and	or	Type HR	1866	—
01606	equipped with halogen filament lamps (H4 lamps)	Item 6A in Schedule 1 to the G.B. Regs	Type HCR	2056	—
01801	Halogen sealed-beam (H4SB) headlamps	ECE Regulations 31 and 31.01	Type HSR	1396	—
01802	emitting an asymmetrical passing beam or	or	Type HSC	1666	—
01803	driving beam or both	Item 6 in Schedule 1 to the G.B. Regs	Type HSCR	1936	—
01804	Halogen sealed-beam (H4SB) headlamps	ECE Regulation 31.02	Type HSR	2415	—
01805	emitting an asymmetrical passing beam or		Type HSC	2696	—
01806	driving beam or both		Type HSCR	2956	—
01901	Headlamps for mopeds	ECE Regulation 56		916	—
01902	Headlamps for motorcycles	ECE Regulation 57.01		2056	—
01903	Headlamps for motorcycles emitting an asymmetrical passing beam and a driving beam and equipped with halogen lamps (HS1)	ECE Regulation 72		2056	—
01904	Headlamps for mopeds emitting a driving beam and passing beam	ECE Regulation 76		1027	—
02001	ADDITIONAL tests for headlamps, carried out at the same time as one of the respective	Respective standards listed in column 2 above, included with the Regulation shown	Addition for COLOUR alternative for R5 or R31	619	—
02002	tests specified above	in column 3 of this item	Addition for COLOUR alternative for R8 or R20	249	—
02003			Addition for STONEGUARD alternative for R1, R5, R8, R20, R31	429	—

03 — SIGNAL LAMPS
03001	Reflex reflecting devices	Directive 76/757/EEC	Universal mounting left and right version	886	—
03002		or ECE Regulation 3 or Item 8 in Schedule 1 to the G.B. Regs		1056	—
03003	Reflex reflecting devices	ECE Regulations 3.01 and 3.02 or	Retroreflector universal	936	—
03004		Item 8A in Schedule 1 to the G.B. Regs	Two orientations	1306	—
03005			Retroreflector left and right	1116	—
03006			Two orientations	1566	—
03007			Clear and amber extension at the same time	259	—
03008			Clear and amber extension at a later date	535	—
03201	Direction indicators	Directive 76/759/EEC or	Single function, single lamp	836	—
03202		ECE Regulation 6 or Item 9 in Schedule 1 to the G.B. Regs	Two orientations	1156	—
03203	Direction indicators	Directive 89/277/EEC or	Single function, single lamp	976	—
03204		ECE Regulation 6.01 or	Two orientations	1366	—
03205		Item 9 in Schedule 1 to the G.B. Regs	Single function, assembly of two lamps	1446	—
03401	Lamps-side, rear or stop	Directive 76/758/EEC or ECE Regulation 7 or	Single function, side, rear or stop	836	—
03402		Item 7 in Schedule 1 to the G.B. Regs	Two orientations	1156	—
03403	Lamps-side, rear or stop	Directive 89/516/EEC or	Single function, single lamp	976	—
03404		ECE Regulations 7.01 and 7.02 or	Two orientations	1366	—
03405		Item 7A in Schedule 1 to the G.B. Regs	Single function, assembly of two lamps	1446	—
03601	ADDITIONAL tests for signal lamps, carried out at the same time as one of the respective tests specified above	Relevant standards listed in column 2 above, included with the Regulation shown in column 3 of this item	EACH additional function as part of a rear group, to Regulations: 6 or 7 or 23	284	—
03602			— two orientations	389	—
03603			6.01 or 7.02 single lamp	359	—
03604			— two orientations	499	—
03605			6.01 or 7.02 assembly of two lamps	829	—
04001	Signal lamps for motorcycles or mopeds	ECE Regulation 50	Any one function, position or stop or indicator	836	—
04002			Each additional function as part of same group	284	—
04201	Advance warning triangles	ECE Regulations 27, 27.01 and 27.02	Full test	2066	—
04202	Advance warning triangles	ECE Regulation 27.03	Full test	2346	—

05 — OTHER LAMPS
05001	Devices for the illumination of rear registration plates	Directive 76/760/EEC or	First examination	836	364
05002		ECE Regulation 4	Each additional examination carried out at the same time	244	—
05201	Front fog lamps	Directive 76/762/EEC or ECE Regulations 19 and 19.01	Full test on standard lamp unit	881	—
05202	Front fog lamps	ECE Regulation 19.02	Full test on standard lamp unit	1896	—
05250	ADDITIONAL tests for fog lamps, carried	ECE Regulations 19, 19.01 and 19.02	Addition of COLOUR alternative	399	—
05251	out at the same time as above		Addition of STONEGUARD alternative	399	—
05401	Reversing lamps	Directive 77/539/EEC or	Single function	836	275
05402		ECE Regulation 23	Two orientations	1156	—
05601	Rear fog lamps	Directives 77/538/EEC and 89/518/EEC or	Single function	1027	—
05602		ECE Regulation 38 or Item 21 in Schedule 1 to the G.B. Regs	Two orientations	1435	—
05801	Parking lamps	Directive 77/540/EEC or	Single function	836	—
05802		ECE Regulation 77	Two functions	1047	—
06001	Special warning lights	ECE Regulation 65	Full test—Class A	2366	—
06002			Full test—Class B	3306	—

07 — FILAMENT LAMPS
07001	Incandescent electric filament lamps for headlamps emitting an asymmetrical passing beam or driving beam or both	Directives 76/761/EEC and 89/517/EEC or ECE Regulation 2 or Item 6 in Schedule 1 to the G.B. Regs	Single bulb type	1366	—
07201	Halogen H1, H2 or H3 filament lamps for headlamps emitting an asymmetrical passing beam or driving beam or both	ECE Regulation 8 or Item 6 in Schedule 1 to the G.B. Regs	Single bulb type	1216	—
07401	Halogen H4 filament lamps for headlamps emitting an asymmetrical passing beam or driving beam or both	ECE Regulation 20 or Item 6A in Schedule 1 to the G.B. Regs	Single bulb type	1576	—
07601	Filament lamps	ECE Regulation 37.01	Type R2	1366	—
07602		or	Type H4	1576	—
07603		Item 6 in Schedule 1 to the G.B. Regs	Types H1, H2 and H3	1216	—
07604			Type P25—2	836	—
07605			Types P25—1, R19, C11, C15, T8—4, W10/5, W10/3, F1, F2 and F3	706	—
07606			Types S1 and S2	1366	—
07607	Filament lamps	ECE Regulations 37.02 and 37.03	Type R2 and S4	1366	—
07608		or	Type H4 and HS1	1576	—
07609		Items 6 and 6A in Schedule 1 to the G.B. Regs	Types H1, H2, H3 and HS2	1216	—
07610			Type P21/5W	836	—
07611			Types P21/W, R5W, R10W, C5W, C21W, T4W, W5W, F1, F2 and F3	706	—
07612			Types S1 and S2	1366	—
07613			Type S3	1216	—
07614			Type P21/4W	936	—
07615			Type PY21W	906	—
07616			Type H1, H2 and H3 selective yellow	1416	—

09 — SEAT BELTS
09004	Seat belts	ECE Regulation 16.04 or	Two or three point static belt assembly	2907	—
09005		Item 12A(1) in Schedule 1 to to G.B. Regs	Two or three point belt with an emergency locking retractor	3447	935
09006		or Directive 90/628/EEC	Addition to above when tested as a restraint system	2108	—
09007			Four point harness belt	2907	—
09008			Harness belt with retractor	3438	—

11 — CHILD RESTRAINTS
11010	Child restraints	ECE Regulation 44.02	CHILD HARNESS—Assembly without retractors	2309	1316
11011			CHILD SEATS—single Mass Group and attachment system:—	3158	—
11012			Forward facing with child harness and seat restraint	4019	—
11020			Rearward facing with child harness and seat restraint	1508	—
11050			BOOSTER seat/cushion with adult belt to restrain child	474	—
11051			ADDITIONAL tests to above for:— Automatically locking retractor, or emergency locking retractor	566	—

13 — GLASS
13001	Safety glass	Item 15 or 15A in Schedule 1 to the G.B. Regs	Glass manufactured under licence issued by the British Standards Institution	255	—
13002	Safety glass	ECE Regulation 43 or Directive 92/22/EEC or Items 15B and 15C in Schedule 1 to the G.B. Regs	Conversion of a BSAU 178 approval to ECE Regulation 43 or Directive 92/22/EEC	255	—
	Safety glass	ECE Regulation 43 or	Windscreens:
13003		Item 15B in Schedule 1 to the G.B. Regs	toughened	2088	—
13004			toughened—slow moving vehicle	1687	—
13010			laminated	2629	893
13011			treated and laminated	2728	—
13020			Windows other than windscreens: toughened	1129	579
13021			laminated	1361	—
13050			Additional test on: plastic coated glass	216	—
13051			double-glazed units	343	—
	Safety glass	Directive 92/22/EEC or	Windscreens:
13060		Item 15C in Schedule 1 to the G.B. Regs	ordinary laminated glass (II)	2629	—
13061			ordinary laminated glass (II/P)	3300	—
13062			treated laminated glass (III)	2732	—
13063			treated laminated glass (III/P)	3400	—
13064			glass plastic (IV)	3145	—
13065			Windows other than windscreens: toughened glass	1129	—
13066			laminated glass	1361	—
13067			glass plastic	2012	—
13068			additional tests on double-glazed units with approved glass	343	—
13100	Safety glass-installation	Directive 92/22/EEC	Examination of installed glass	—	191

15 — MIRRORS
15001	Rear-view mirrors	Directives 79/795/EEC, 85/205/EEC, 86/562/EEC and 88/321/EEC or ECE Regulations 46 and 46.01	Component test, witnessed at manufacturers' premises	—	464
15002	Rear-view mirrors	Directives 79/795/EEC, 85/205/EEC, 86/562/EEC and 88/321/EEC	Component test on single mirror of large dimensions or complex mounting involving two impact tests	1126	—
15003		or ECE Regulations 46 and 46.01	Component test on single mirror of moderate dimensions and simple mounting system involving two impact tests	886	—
15004			Modified mounting	526	—
15005			Additional type	656	—
15006			Reflectivity only	436	—
15201	Rear-view mirrors for motorcycles	Directive 80/780/EEC	Component test (as 15003 above)	886	464

17 — OTHER COMPONENTS
17001	Recording equipment for road transport vehicles	Community Regulations 1463/70, 1787/83, 2828/77, 3821/85 and 3688/92	Instrument and chart	4285	—
17002			Chart only, instrument supplied by applicant	1250	—
17201	Rear marking plates	ECE Regulation 69	Rear marking plate	3756	—
17202	—slow vehicles		Additional model	1736	—
17204	Rear marking plates	ECE Regulation 70	Rear marking plate	3756	—
17205	—heavy and long vehicles		Additional model	1736	—
17300	Spray suppression devices	Directive 91/226/EEC	Installation	284	284
17301			Separate technical unit	363	341

SECTION B — VEHICLE TESTS

20— ELECTRONIC SYSTEMS
	Radio-interference suppression	Directive 72/245/EEC	DOT TEST SITE
20001		or ECE Regulation 10.01	First examination	647
20002		or Item 2A in Schedule 1 to the G.B. Regs or	Each additional examination at the same time	MANUFACTURER'S TEST SITE	488
20003		Item 5A in Schedule 1 to the G.B. Regs for Goods Vehicles	First examination—DOT test equipment		882
20004			Each additional examination at the same time		529
20005			First examination—test equipment supplied by applicant		443
20006			Each additional examination at the same time		319

22 — ENGINE RELATED TESTS EMISSIONS—LIGHT VEHICLES
22003	Exhaust emissions—three wheeled vehicles, petrol or diesel	Item 4J in Schedule 1 to the G.B. Regs or	European cycle Type I, II and III test	1914	608
22004		Item 2J in Schedule 1 to the G.B. Regs for Goods Vehicles	Each additional Type I test	763	100
22020	Exhaust emissions—petrol and diesel	Directive 91/441/EEC and 93/59/EEC or	Type I, III and IV test	2994	791
22022		ECE Regulation 83.01 or	Petrol engine to US Federal Regs	2841	879
22026		Items 4G and 4K in Schedule 1 to the G.B. Regs	Petrol engine Type V test—Durability	90392	1327
22028	or Items 2G and 2I in Schedule 1 to the G.B. Regs for Goods Vehicles	Diesel engine Type V test—Durability	88929	1744
22101	Exhaust emissions—two wheeled vehicles	ECE Regulation 40.01	Motorcycle emissions—full test	—	602
22150		ECE Regulation 47	Moped emissions—full test	—	598

EMISSIONS—HEAVY VEHICLES
22202	Exhaust emissions—diesel	Item 3B in Schedule 1 to the G.B. Regs for Goods Vehicles	BSAU 141 certificate	227	187
22203	Smoke emissions—diesel engines	Directive 72/306/EEC and 89/491/EEC or ECE Regulation 24.03	VEHICLE TEST of smoke emissions to the co-incident requirements of each Regulation or Directive	2918	506
	Diesel engine power and smoke emissions	Directive 72/306/EEC, 80/1269/EEC, 88/195/EEC and 89/491/EEC or	BENCH TESTS carried out on a single engine to the co-incident requirements of respective Regulation or Directive
22210		ECE Regulation 24.03	Power and smoke	7586	714
22211			Power only	7214	593
22212			Smoke only	6984	506
22214	Installation of approved engine	ECE Regulation 24.03 Part II	Verification of installed conditions and check of intake and exhaust pressure	866	380
22401	Diesel gaseous emissions	Directive 91/542/EEC or	Full bench test	9489	857
22402		ECE Regulation 49.02 or Item 4H in Schedule 1 to the G.B. Regs or Item 2H in Schedule 1 to the G.B. Regs for Goods Vehicles	Test as a CONTINUATION of an engine tested for power or smoke on the same bench (carry over power curve)	3209	522

POWER AND FUEL CONSUMPTION
22601	Power to weight ratio	Item 1A in Schedule 1 to the G.B. Regs for Goods Vehicles	Where power to weight ratio is less than 6 kilowatts per tonne	237	179
22602			Where power to weight ratio is 6 kilowatts per tonne or more	209	165
22603	Power to weight ratio	Item 1 in Schedule 1 to the G.B. Regs for Goods Vehicles	Where power to weight ratio is less than 6 kilowatts per tonne	209	161
22604			Where power to weight ratio is 6 kilowatts per tonne or more	177	147
22610	Engine power	Directive 80/1269/EEC, 88/195/EEC and 89/491/EEC or ECE Regulation 85	Full bench test on petrol or light diesel engine	7126	613
	Fuel consumption	Directive 80/1268/EEC and 89/491/EEC or ECE Regulation 84	WITNESS of measurements for urban cycle, plus 90 and 120 km/h constant speed condition, to determine:
22801			consumption—(90 and 120 km/h on TRACK)	—	909
22802			ROAD LOADS for dynamometer settings	—	936
22803			consumption on DYNAMOMETER (known loads) PERFORMANCE measurements as above:	—	684
22804			consumption (90 and 120 km/h on TRACK)	3137	—
22805			ROAD LOAD measurements— all speeds	905	—
22806			consumption on DYNAMOMETER (known loads)	1738	—
22810	Fuel consumption	Directive 93/116/EEC	Determination of the CO2 emissions and fuel consumption on a dynamometer during the test cycle simulating the urban and extra— urban driving patterns as described in Appendix 1 of Annex III of Council Directive 91/441/EEC	1917	536

24 — SOUND LEVELS
	Sound levels	Directives 84/424/EEC and 92/97/EEC or	Drive by and static test on:
24001		Items 14E and 14G in Schedule 1 to the G.B. Regs	category M1 and N1 vehicles	812	410
24002		or	other category vehicles	1097	514
24003		Items 4E and 14F in Schedule 1 to the G.B. Regs for Goods Vehicles	Drive by, static and compressed air-vehicles with a GVW in excess of 2800 kg	1168	568
24010			Drive by measurements on M1 and N1 vehicles for comparison of replacement silencers	1270	534
	Silencer conditioning in preparation for sound level tests by above	Standards in column 2 above for fee numbers 24001, 24002 and 24010	ADDITION to drive by test for silencer conditioning by:
24050			Dynamometer bench method	—	286
24051			Road method (driver supplied by applicant)	178	178
24052			Pulsation method—on vehicle or prepared engine on bench	1164	200
24201	Audible warning devices	Directive 70/388/EEC or	Laboratory tests on pair of horns	3613	715
24202		ECE Regulation 28	Vehicle—installed sound level	443	283
24401	Motorcycle sound levels	Directive 78/1015/EEC or 87/56/EEC (S.I. 1980 No. 765 and S.I. 1988 No. 1640)	Drive by and static test	615	369
24403		Directive 89/235/EEC	Replacement silencer	—	471

26 — DYNAMIC TESTS BRAKES—TRAILERS
26001	Brakes—small trailers	Directives 71/320/EEC, 74/132/EEC, 75/524/EEC, 79/489/EEC, 85/647/EEC, 88/194/EEC and 91/422/EEC (excluding Annexes X, XI and XII)	Trailers of category 01 not fitted with brakes Inertia braked trailers up to category 02:—	262	229
26002		or	System compatibility	968	—
26003			Control device	1164	672
26004		ECE Regulations 13.03, 13.04, 13.05 and 13.06 (excluding Annexes 13, 14 and 15,	Foundation brake	845	—
26005		except where stated in column 3)	Electric braked trailers of category 02, to ECE Reg. 13.05 Annex 14 or 85/647 Annex XI	2242	—
26021	Brakes—larger air braked trailers	Directives 71/320/EEC, 74/132/EEC, 75/524/EEC, 79/489/EEC, 85/647/EEC, 88/194/EEC and 91/422/EEC or ECE Regulations 13.03, 13.04, 13.05 and 13.06	Static and LADEN Dynamic tests on air braked trailers, excluding anti-lock and Type I and II fade tests to Annex VII	2388	2310
26022	Brakes—larger air braked trailers	Directives 85/647/EEC and 88/194/EEC and 91/422/EEC or ECE Regulations 13.05 and 13.06	Static, laden and UNLADEN Dynamic tests on air braked trailers, excluding anti-lock and Type I and II fade tests to Annex VII	2601	2471
26024	Brakes—larger air braked trailers	Directive 85/647/EE, 88/194/EEC and 91/422/EEC or	Tests to the ANTI-LOCK requirements of Annex 13 of ECE 13.05 and Annex X of Directive 85/647 (excluding EMI)	1486	1286
26025		ECE Regulations 13.05 and 13.06	Normal brake test	1135	935
	Brakes—larger air braked trailers	Directives 71/320/EEC, 74/132/EEC, 75/524/EEC, 79/489/EEC, 85/647/EEC, 88/194/EEC and 91/422/EEC	Type I & II FADE TESTS on an axle system leading to the issue of an Annex VII report to Directive and Annex II to Regulation
26026		or	—on TRACK	1680	1446
26027		ECE Regulations 13.03, 13.04, 13.05 and 13.06	—on DYNAMOMETER	642	644
26030	Brakes—trailer combination and ABS	Directive 91/422/EEC or ECE Regulation 13.06	Air braked trailers tri-axle or tandem	—	1517

BRAKES—OTHER VEHICLE TYPES
26201	Brakes—other vehicle types	Item 6E in Schedule 1 to the G.B. Regs for Goods Vehicles	Tests for slow vehicles and public works vehicles	835	684
26202	Brakes—other vehicle types	ECE Regulations 13.03, 13.04 & 13.05 or Items 13D and 13F in Schedule 1 to the G.B. Regs	Tests for category L5 three wheel vehicles	1566	930
	Brakes—other vehicle types	Directives 85/647/EEC, 88/194/EEC and 91/422/EEC (excluding Annexes X, XI and XII)	Brakes—hydraulic and hydraulic assisted, (excluding anti-lock) for:
26203		or ECE Regulations 13.03, 13.04 and 13.05	M1 passenger cars and other M1 or N1 vehicles <=2500 kg	2650	1421
26204		and 13.06 (excluding Annexes 13, 14 and 15) or	Other M1 and N1 vehicles >2500 kg or M2 & N2 vehicles	2886	1581
		Items 13E and 13G in Schedule 1 to the G.B. Regs or	Brakes—full air and air over hydraulic (excluding anti-lock) for vehicles less than 50 tonnes:
26205		Items 6F, 6H, 6I and 6J in Schedule 1 to the G.B. Regs for Goods Vehicles	N3 and M3,3—4 axle, designed to draw a trailer	6294	2410
26206			N3 and M3, 3—4 axle, NOT designed or 2 axle designed, to draw trailer	6022	2197
26207			N3 and M3, 2 axle, NOT designed to draw a trailer	5508	1991
26208			N2 & M2 vehicles	4675	1774
26209			Mobile cranes over 50 tonnes, STATICS and LADEN dynamics	6768	—
	Brakes—other vehicle types. Anti-lock tests	Directives 85/647/EEC or 88/194/EEC and 91/422/EEC or ECE Regulation 13.05 and 13.06	Tests of anti-lock brake system only, where no assistant provided by applicant, (excluding electro-magnetic interference) for:
26250			M1 and N1 vehicle	4197	—
26251			M1 and N1 as CONTINUATION of a normal brake test	3709	—
26252			Other vehicles	5351	—
26253			Other vehicles, as a CONTINUATION of a normal brake test Test of anti-lock brake system only, where assistant provided applicant (excluding electro-magnetic interference) for:	4648	—
26254			M1 and N1 vehicle	3555	1746
26255			M1 and N1 as CONTINUATION of a normal brake test	2995	1551
26256			Other vehicles	4423	2106
26257			Other vehicles as a CONTINUATION of a normal brake test	3721	1788
	Brakes (replacement linings)	Directive 85/647/EEC Annex XII or ECE Regulation 13.05 Annex 15	Monitor dynamometer comparison test of replacement brake linings fitted to: Disc brakes	—	682
26270		or	M1 or N1 drum brakes	—	682
26271		ECE Regulation 90	Other category drum brakes	—	789
26272
26280	Brakes (EMI)	Directive 85/647/EEC or 88/194/EEC Annex X or ECE 13.05 Annex 13	Test on anti-lock control units and servo devices to check for electro-magnetic interference	1424	645

MOTORCYCLE BRAKES
	Brakes on motorcycles	ECE Regulation 78.01 or	Tests to the requirements for motorcycle brakes:		
26401		Council Directive 93/14/EEC	L1 & L2 machines	1945	—
26402			L1 & L2 machines, rider supplied by applicant	1320	774
26403			L3 & L4 machines	2285	—
26404			L3 & L4 machines, rider/driver supplied by applicant	1689	1105

27 — STEERING
27001	Steering	Directives 70/311/EEC and 92/62/EEC or ECE Regulation 79	Measurement of steering effort	2427	1680
27003	Steering—trailers	Directive 92/62/EEC	Measurement of steering effort	1586	898

TEMPORARY SPARE WHEEL
27201	Temporary spare wheel	Directive 92/23/EEC or ECE Regulation 64	Test of vehicle stability	712	380

SPEEDOMETERS
27401	Speedometers and reverse gear	Directive 75/443/EEC or ECE Regulation 39 or Item 20 in Schedule 1 to the G.B. Regs	Test of accuracy, marking, visibility and check of gearing	604	352

28 — BODY STRUCTURE LATCHES AND HINGES
28001	Door latches and hinges	Directive 70/387/EEC	Inspection to Annex I of the Directive only	267	211
28002	Door latches and hinges	Directive 70/387/EEC or Items 1 or 1A in Schedule 1 to the G.B. Regs	Laboratory and vehicle test on M1 and N1 4 door vehicles, including 30g by calculation	3999	689
28003		or ECE Regulation 11.02	Laboratory and vehicle test on M1 and N1 4 door vehicles, including 30g by additional DYNAMIC TEST	6173	689
28004			ADDITION each SLIDING DOOR system	2752	71

PROTECTIVE STEERING
28201	Protective steering	Directive 74/297/EEC or	Forward BARRIER impact test	10492	615
28202		ECE Regulations 12.01 and 12.02 or Item 3 or 3A in Schedule 1 to the G.B. Regs	On spoke, off spoke body block test to Directive, or original or non-original equipment to Annex 4 of the Regulation	4855	517
28203	Protective steering	ECE Regulation 12.02 or Item 3A in Schedule 1 to the G.B. Regs	Two HEADFORM impacts on steering control as original or non-original equipment, to Annex 5 of the Regulation	4017	552
28204	Protective steering	Council Directive 91/662/EEC or ECE Regulation 12.03	Linear impactor contact zone and impact point angle determination (3 separate impacts)	—	906

OTHER IMPACTS
28401	Rear impact	ECE Regulation 32	Moving barrier impact to rear of vehicle (R32 only)	11147	686
28410	Head on impact	ECE Regulation 33	Passenger space (R33 only)	10767	643

FIRE RISKS
28601	Fire risks	ECE Regulation 34.01	Front and rear impact (R34 only) —excluding Annex 5 test	20026	1009
28602			Tests to full requirements, Annex 5 only	12458	1265

SEAT BELTS AND ANCHORAGES
28801	Seat belt anchorages	Directive 90/629/EEC or ECE Regulation 14.03	Dimensions and strength requirements for a five seat vehicle (including lap only pulls— front and rear)	9204	928
28802	Installation of seat belts	Directive 90/628/EEC	Examination of seat belt installation requirements on front and rear seats of five seat vehicle	352	354

SEAT TESTS
29001	Seats and anchorages	Directives 74/408/EEC and 81/577/EEC or	Inspection of other vehicles in accordance with Annex III	262	239
29002		ECE Regulation 17.02 or	M1 vehicle—5 seats. Full test, STATIC method (Simple 20g calcs—GB 16)	10383	643
29003		Item 16 in Schedule 1 to the G.B. Regs	M1 vehicle—5 seats, DYNAMIC method (including “H” points, front and rear moment)	14098	536
	Head restraints	Directive 78/932/EEC or	Test of head restraint on one seat (including displacement and two impacts)
29010		ECE Regulation 25.03	FRONT	5967	500
29011			REAR in car	6755	500
29020	Seats and anchorages and head restraints	ECE Regulations 17.03 and 17.04	M1 vehicles—5 seats, full head rest front and rear, two dynamic runs (seats set in adjustment positions)	21952	1026

BODY AND TRIM
29201	Interior fittings	Directives 74/60/EEC and 78/632/EEC or ECE Regulation 21.01 or	Examination of M1 vehicle, including determination of “H” points facia and seat zones and up to 6 impact tests	9692	1432
29202		Item 18 in Schedule 1 to the G.B. Regs	Each additional impact test	411	43
29251	External projections	Directives 74/483/EEC and 79/488/EEC or ECE Regulation 26.01 or	Examination, including radio aerial as original equipment Test on separate technical units:	865	682
29252		Items 19 and 19A in Schedule 1 to the G.B.	Luggage or ski rack	359	261
29253		Regs	Radio aerial	205	189
29255	External projections—goods vehicles	ECE Regulation 61 or Council Directive 92/114/EEC	Examination of vehicle	628	538
29301	Wheel guards	Directive 78/549/EEC	Examination 2 axle vehicle	367	340

REAR AND SIDE PROTECTION
29401	Rear protective devices	Directives 70/221/EEC, 79/490/EEC and 81/333/EEC	Inspection of M1, M2, M3, N1, O1 and O2 vehicles	317	251
29402		or	Installation of separate technical units	317	251
29403		ECE Regulations 58 and 58.01	FORCE TEST, on tech units or on N2, N3, O3 and O4 vehicles	4838	498
29404			Assessment by CALCULATION	605	516
29405	Rear protective devices	ECE Regulation 58.01	Installed unit	—	691
29450	Side guards	Directive 89/297/EEC or ECE Regulation 73	Examination and load—2 points	3062	427
29501	Fuel tanks	Directives 70/221/EEC and 81/333/EEC	Other than M1 & N1 vehicles	4342	523
29502			M1 and N1 vehicles	3915	498

30 — VISIBILITY
30001	Rear-view mirrors	Directives 71/127/EEC, 79/795/EEC, 85/205/EEC, 86/562/EEC and 88/321/EEC	Field of vision, any 2 mirrors of appropriate class	2431	498
30002		or ECE Regulation 46.01 or Items 10, 10A, 10B and 10C in Schedule 1 to the G.B. Regs	EACH additional mirror on the same vehicle	494	86
30401	Forward field of vision	Directives 77/649/EEC, 81/643/EEC, 88/366/EEC and 90/630/EEC	Full determination of “H” and “V” points vision zones and pillar angles	1635	584
30601	Defrost and demisting systems	Directive 78/317/EEC or Item 23 in Schedule 1 to the G.B. Regs	Full determination of “H” and “V” points, zones A and B and defrost/demist cleared area	5036	1179

31 — WIPER AND WASHER SYSTEMS
30801	Wiper and washer systems	Directive 78/318/EEC or Item 22 in Schedule 1 to the G.B. Regs	Vehicle test of WIPER system with APPROVED washer system (including full determination of “H” and “V” points and zones A and B)	3541	822
30802			WASHER system as a separate technical unit	2149	734
30804			WASHER system as a separate technical unit (Government test house)	954	—
30805			Vehicle test of WIPER system with non-approved WASHER system including verification of system	—	1172

HEATING SYSTEMS
31001	Heating systems	Directive 78/548/EEC	Vehicles fitted with a system for heating the passenger compartment using heat from the engine COOLING system	225	211
31002			Vehicles fitted with a system for using heat from the EXHAUST gases or the engine cooling air	682	499

32 — LIGHTING INSTALLATION
32001	Installation of lighting and signalling equipment	Item 24 in Schedule 1 to the GB Regs or	Examination	723	512
32002		Item 24A in Schedule 1 to the G.B. Regs		924	583
32003	Installation of lighting and signalling devices	Directives 76/756/EEC, 80/233/EEC, 82/244/EEC, 83/276/EEC, 84/8/EEC, 89/278/EEC and 91/663/EEC	M1 vehicles up to 5 seats and N1 > 2600kg, M2 and N2	1463	1006
32004		or	M3 vehicles, N3 and M1 > 5 seats	1623	1113
32005		ECE Regulations 48 and 48.01 or	N1 vehicles < = 2600kg	1278	856
32006		Item 24 in Schedule 1 to the G.B. Regs	M1 vehicles with concealed headlamp (including environmental tests)	2628	1166
32007			Trailers	703	458

HEADLAMP CLEANERS
32401	Headlamp cleaners	ECE Regulation 45.01	CLEANING test, M1 vehicles (excluding environmental checks in paragraphs 6.2.3, 4, 5 and 6.2.7 and full lamp photometric measurements)	2384	561
32402			Witness all tests to check	4782	539
32403			ENVIRONMENTAL requirements in paragraphs 6.2.3, 4, 5 and 6.2.7 INSTALLATION of technical unit	263	243

34 — TYRES
34001	Tyres	Directive 92/23/EEC or ECE Regulations 30, 30.01 and 30.02	Witness of test and check of dimensions	—	367
34002		or Items 17, 17A and 17B in Schedule 1 to the G.B. Regs	Examination of report	—	162
34201	Tyres for commercial vehicles	Directive 92/23/EEC or ECE Regulation 54	Examination of a test report and initial documentation from authorised laboratory for issue of initial certificate	—	190
34202			Examination of documents submitted with the same application as initial documentation for issue of certificates covered by the same report	—	61
34203			Test witnessed at non-authorised laboratory	—	1103
34301	Tyres for motorcycles	ECE Regulation 75	Examination of report	—	169
34302			Witness of test and check of dimensions	—	402
34401	Tyres for vehicles with four or more wheels and their trailers	Directive 92/23/EEC	Installation	—	293

36 — CONTROLS ANTI-THEFT DEVICES
36001	Anti-theft devices	Directive 74/61/EEC or ECE Regulation 18 or Item 11 in Schedule 1 to the G.B. Regs	Torque test on steering column lock and check of requirements	549	365
36002	Anti-theft devices	ECE Regulation 18.01 or Item 11A in Schedule 1 to the G.B. Regs	Torque test on lock and key 2500 cycle test and check of requirements	1021	532
36004	Motorcycle anti-theft devices	ECE Regulation 62 or Council Directive 93/33/EEC		1048	558

FOOT CONTROLS
36201	Foot control	ECE Regulation 35	Check including “H” point and detailed geometric measurements	527	426
36202			By obvious direct measurement	330	301

IDENTIFICATION OF CONTROLS
36401	Identification of controls, tell-tales and indicators	Council Directives 78/316/EEC and 93/91/EEC	Full check of requirements	392	358
36501	Identification of controls—two wheeled vehicles	ECE Regulation 60 or Council Directive 93/29/EEC	Full check of requirements	360	360

38 — PSV TESTS
	Public service vehicles	ECE Regulation 36.03	Examination (excluding fuel tank and strength of superstructure) on:		
38001			Rigid vehicles	—	1253
38002			Articulated vehicles	—	1598
38003			Addition, fuel tank test	—	277
38004			Addition, strength superstructure	—	563
38005			Addition, retractable steps	—	125
	Public service vehicles	ECE Regulation 66	Examination and test, leading to the
38201			approval of a SINGLE vehicle type, by:
38202			ROLLOVER of vehicle SECTION	12533	1253
38203			ROLLOVER of complete vehicle	12209	1164
			PENDULUM impact of vehicle SECTION	13797	1224
38204			or EXAMINATION of results produced by an approved CALCULATION method including: verification of data used, witness of two HINGE tests and evaluation of data on up to a further six unwitnessed HINGE tests	—	1553
	Strength of seats and anchorages of public	ECE Regulation 80	Tests to Annex 4
38301	service vehicles		Dynamic test (impact simulation)	4586	708
38302			Static test (2 seat positions) Tests to Annex 5	9168	473
38310			Anchorages of a vehicle	8005	426

40 — OTHER VEHICLE TESTS
40001	Statutory plates	Directives 76/114/EEC and 78/507/EEC	Full examination	309	283
40201	Space for mounting and fitting rear registration plates	Directive 70/222/EEC	Full examination	295	254
40401	Towing hooks	Directive 77/389/EEC	Front and rear—pull and push (excluding ISO)	4022	412
40501	Mechanical coupling components of	ECE Regulation 55	Towing fork test	8402	471
40502	combinations of vehicles		Ring dynamic test	8367	436
40503			5th wheel dynamic test	12216	971
40504			King pin dynamic test	8367	436
40601	Measurement of maximum speed	ECE Regulation 68	Full track test	—	563
40602	Speed limiters	Directive 92/24/EEC or Item 9 in Schedule 1 to the G.B. Regs for Goods Vehicles	Track test—STU or vehicle	609	528
	Speed limiters	Directive 92/24/EEC	Endurance test—STU
40605		or	Annex III, para 2.2.1—ambient	664	—
40606		ECE Regulation 89	para 2.2.2—high temperature	664	—
40607			para 2.2.3—low temperature	664	—
40608			para 2.2.4—salt environment	664	—
40609			para 2.2.5—vibration test	1134	—
40700	Masses and dimensions	Directive 92/21/EEC	Physical inspection	777	710

50 — TESTS FOR AGRICULTURAL AND FORESTRY TRACTORS
50001	Maximum permissible laden weight	Directives 74/151/EEC (Annex I), 82/890/EEC and 88/410/EEC		215	215
50011	Location and fitting of rear registration plate	Directives 74/151/EEC (Annex II), 82/890/EEC and 88/410/EEC		215	215
50021	Tank for liquid fuel	Directives 74/151/EEC (Annex III), 82/890/EEC and 88/410/EEC		215	215
50031	Ballast weights	Directives 74/151/EEC (Annex IV), 82/890/EEC and 88/410/EEC		215	215
50041	Audible warning devices	Directives 74/151/EEC (Annex V), 82/890/EEC and 88/410/EEC		327	215
50051	Permissible sound level and maximum design speed	Directives 74/151/EEC (Annex VI), 82/890/EEC and 88/410/EEC or	Combined test	450	356
50052		75/152/EEC, 82/890/EEC and 88/412/EEC	Maximum speed test	356	356
50061	Load platform	Directives 74/152/EEC, 82/890/EEC and 88/412/EEC		215	215
50071	Rear view mirror	Directives 74/346/EEC and 82/890/EEC		215	215
50081	Field of vision	Directives 74/347/EEC, 79/1013/EEC and 82/890/EEC	Physical inspection	1106	503
50082			Calculation method	515	503
50091	Steering equipment	Directives 75/321/EEC, 82/890/EEC and 88/411/EEC		1855	868
50111	Braking device	Directives 76/432/EEC and 82/890/EEC		2207	1208
50121	Passenger seat	Directives 76/763/EEC and 82/890/EEC		215	215
50131	Driver perceived noise level	Directives 77/311/EEC and 82/890/EEC	Annex I test	2301	1267
50132			Annex II test	1314	891
50141	Roll over protection	Directives 77/536/EEC (Annex II) and 82/890/EEC or	Dynamic test	2207	868
50142		79/622/EEC, 82/953/EEC, 87/354/EEC and 88/413/EEC or	Static test	2207	1208
		86/298/EEC and 89/682/EEC	Protective structure:
50143		or	“narrow track” rear mounted	2395	868
50144		87/402/EEC and 89/681/EEC	“narrow track” front mounted	5380	5027
50151	Emission of pollutants	Directives 77/537/EEC and 82/890/EEC		1341	891
50161	Driver’s seat	Directives 78/764/EEC, 82/890/EEC, 83/190/EEC, 87/354/EEC and 88/465/EEC		2207	868
50171	Lights and light signalling	78/933/EEC and 82/890/EEC	Installation	715	503
50172	Lights and light signalling	79/532/EEC and 82/890/EEC	Components	215	215
50181	Coupling devices	79/533/EEC (Annex I) and 82/890/EEC		215	215
50191	Reverse	79/533/EEC (Annex II) and 82/890/EEC		215	215
50201	Operating space, access to driving space etc.	80/720/EEC, 82/890/EEC and 88/414/EEC		215	215
50211	Power take offs	86/297/EEC (with the exception of item 5.2 of Annex I)		215	215
50221	Controls—installation, operation and identification	86/415/EEC		356	356
50231	Dimensions and towable masses	89/173/EEC (Annex I)		356	356
50241	Speed governors and protection of drive components, projections and wheels	89/173/EEC (Annex II)		868	868
50251	Windscreens	89/173/EEC (Annex III)	Toughened glass (I)	2104	—
50252			Toughened glass (I/P)	2802	—
50253			Ordinary laminated glass (II)	2645	—
50254			Ordinary laminated glass (II/P)	3316	—
50255			Treated laminated glass (III)	2748	—
50256			Treated laminated glass (III/P)	3416	—
50257			Glass plastic (IV)	3161	—
50258			Universally heat treated glass	1703	—
50261	Glass other than windscreens	89/173/EEC (Annex III)	Toughened glass	1145	—
50262			Laminated glass	1377	—
50263			Glass plastic	2028	—
50271			Additional tests on double glazed units with approved glass	406	—
50281	Coupling device	89/173/EEC (Annex IV)	Static test	3030	1208
50282			Dynamic test	4205	1972
50291	Statutory plates and inscriptions to the body of the tractor	89/173/EEC (Annex V)		215	215
50301	Brake control for towed vehicles	89/173/EEC (Annex VI)		215	215
50311	Electrical power connections	75/323/EEC		215	215

SCHEDULE 2 FEES FOR THE EXAMINATION OF A COMPLETE VEHICLE TO WHICH THE GREAT BRITAIN REGULATIONS OR THE EUROPEAN REGULATIONS APPLY WITH A VIEW TO THE ISSUE OF CERTAIN DOCUMENTS
Regulations 7 and 8

PART I THE GREAT BRITAIN REGULATIONS
(1)	(2)	(3)
Description of examination	Fee number	Amount of fee for examination (£)
Examination of a vehicle with a view to the issue of a type approval certificate	60000	1443
Examination of a vehicle with a view to the issue of a Minister’s approval certificate under section 58(1)	60001	1443
Examination of a vehicle where there has been a valid application for a certificate by virtue of section 58(4)	60002	1411

PART II THE GREAT BRITAIN REGULATIONS (LOW VOLUME TYPE APPROVAL)
(1)	(2)	(3)
Description of examination	Fee number	Amount of fee for examination (£)
Examination of a low volume type approval vehicle with a view to the issue of a Minister’s approval certificate under section 58(1)	60010	1441
Examination of a low volume type approval vehicle where there has been a valid application for a certificate by virtue of section 58(4)	60011	501

PART III THE EUROPEAN REGULATIONS
(1)	(2)	(3)
Description of examination or part of examination	Fee number	Amount of fee for examination/part examination (£)
Receipt of application and planning of the examination process	60020	240
Examination of a vehicle	60021	1527
Compilation and administrative checking of documentation in relation to:
(a) each type of vehicle, and	60022	340
(b) for each variant
(i) where less than 5 versions are involved	60023	41
(ii) where 5 or more versions are involved	60024	83
Further compilation and administrative checking of documentation, submitted in place of original documentation, in relation to:
(a) each type of vehicle, and	60025	169
(b) for each variant
(i) where less than 5 versions are involved	60026	21
(ii) where 5 or more versions are involved	60027	41

SCHEDULE 3 FEES FOR THE EXAMINATION OF A COMPLETE VEHICLE TO WHICH THE GREAT BRITAIN REGULATIONS FOR GOODS VEHICLES APPLY WITH A VIEW TO THE ISSUE OF CERTAIN DOCUMENTS
Regulation 7(2) and (3)
(1) Description of examination	(2) Amount of fee for examination Vehicle category									
(a) L2, L5, N1		(b) N2		(c) N3		
2 Axle	3 Axle	4 Axle
	Fee	Fee	Fee	Fee	Fee	Fee	Fee	Fee	Fee	Fee
	No	(£)	No	(£)	No	(£)	No	(£)	No	(£)
Examination of a type vehicle consisting of 50 or less variants with a view to the issue of a type approval certificate	70000	705	70001	1293	70002	2033	70003	2241	70004	2241
Examination of a type vehicle consisting of more than 50 variants with a view to the issue of a type approval certificate	70005	705	70006	1293	70007	2485	70008	2964	70009	2964
Examination of a vehicle with a view to the issue of a Minister’s approval certificate under section 58(1)	70010	705	70011	949	70012	1157	70013	1184	70014	1184
Examination of a vehicle with a view to the issue of a Minister’s approval certificate under section 58(4)	70015	679	70016	923	70017	1131	70018	1131	70019	1131

SCHEDULE 4 FEES FOR THE ISSUE OF DOCUMENTS IN RESPECT OF VEHICLE PARTS
Regulation 10(1)
(1)	(2)	(3)
Description of document	Fee number	Amount of fee for documents (£)
(A) ECE REGULATIONS
Type approval certificate	80000	30
Type approval certificate modifying a type approval certificate	80001	64
(B) COMMUNITY INSTRUMENTS
Type approval certificate	80002	30
Issuing of amended pages and index sheet of an information package in accordance with the first indent of article 5(3) of the Framework Directive, in relation to a previously issued type approval certificate, where an extension to the original approval is deemed unnecessary	80003	30
Issuing of an amended type approval certificate together with amended pages and index sheet of information package in accordance with the second indent of article 5(3) of the Framework Directive, in relation to a previously issued type approval certificate, where an extension to the original approval is deemed necessary	80004	64
(C) NATIONAL TYPE APPROVAL SCHEME
Type approval certificate	80005	30
Minister’s approval certificate under section 58(1)	80006	30
(D) DUPLICATE
Duplicate type approval, Minister’s approval, EEC or ECE type approval certificate	80007	40
(E) LETTERS OF COMPLIANCE OR NO CONCERN
Acknowledgement at the request of the holder:	80008	30
(i) that its type approved products are recognised as being tested and in conformity with the type approval standards and are suitable for use on roads in this country; or (ii) that notwithstanding a departure from the particulars specified in a type approval, Minister’s approval, EEC or ECE type approval certificate, or to a related information document, where an application for an extension, variation or substitution of those documents is considered to be unnecessary		
NB Where both EEC and ECE certificates are issued concurrently in respect of the same vehicle part, the total fee for two certificates shall be one and a half times Nos 80000, 80001, 80002, 80003, or 80004 above as appropriate.		

SCHEDULE 5 FEES FOR THE ISSUE OF DOCUMENTS IN RESPECT OF VEHICLES
Regulation 10(2), (3) and (4)

PART I VEHICLES TO WHICH THE GREAT BRITAIN REGULATIONS APPLY
(1)	(2)	(3)
Description of document	Fee number	Amount of fee for documents (£)
(A) TYPE APPROVAL CERTIFICATES
Type approval certificate in respect of a type vehicle not being issued in replacement of one or more Minister’s approval certificates	80011	440
Type approval certificate in respect of a type vehicle issued in replacement of one or more Minister’s approval certificates	80012	65
Duplicate type approval certificate	80013	40
(B) MINISTER'S APPROVAL CERTIFICATES
Minister’s approval certificate under section 58(1) when issued after a complete examination of a vehicle which is not a low volume type approval vehicle	80014	250
Minister’s approval certificate issued by virtue of section 58(4) in respect of a vehicle which is not a low volume type approval vehicle	80015	0.30
Duplicate Minister’s approval certificate for a vehicle which is not a low volume type approval vehicle	80016	40
(C) LOW VOLUME MINISTER'S APPROVAL CERTIFICATES
Minister’s approval certificate under section 58(1) when issued after a complete examination of a vehicle which is a low volume type approval vehicle	80017	250
Minister’s approval certificate issued by virtue of section 58(4) in respect of a vehicle which is a low volume type approval vehicle	80018	1
Duplicate Minister’s approval certificate for a vehicle which is a low volume type approval vehicle	80019	40

PART II VEHICLES TO WHICH THE GREAT BRITAIN REGULATIONS FOR GOODS VEHICLES APPLY
(1)	(2)	(3)
Description of document	Fee number	Amount of fee for documents (£)
(A) TYPE APPROVAL CERTIFICATES
Type approval certificate in respect of a type vehicle consisting of 50 or less variants	80030	160
Type approval certificate in respect of a type vehicle consisting of more than 50 variants	80031	190
Type approval certificate in respect of a type vehicle issued in replacement of one or more Minister’s approval certificates	80032	65
Further type approval certificate issued in replacement of a certificate issued under section 55(4)	80033	65
Duplicate type approval certificate	80034	40
(B) MINISTER'S APPROVAL CERTIFICATES
Minister’s approval certificate under section 58(1) when issued after a complete examination of a vehicle	80035	95
Minister’s approval certificate under section 58(1) when issued after a partial examination of a vehicle	80036	65
Minister’s approval certificate issued by virtue of section 58(4) in respect of a vehicle	80037	0.60
Duplicate Minister’s approval certificate for a vehicle	80038	40

PART III VEHICLES TO WHICH THE EUROPEAN REGULATIONS APPLY
(1)	(2)	(3)
Description of documentation	Fee number	Amount of fee for documentation (£)
Type approval certificate issued in accordance with article 4(1)(a) of the Framework Directive	80050	60
Duplicate of a type approval certificate which was issued in accordance with article 4(1)(a) of the Framework Directive	80051	40
Issue of amended pages and index sheet of an information package in accordance with the first indent of article 5(4) of the Framework Directive, in relation to a previously issued type approval certificate, where an extension to the original approval is deemed unnecessary	80052	30
Issue of an amended type approval certificate together with amended pages and index sheet of an information package in accordance with the second indent of article 5(4) of the Framework Directive, in relation to a previously issued type approval certificate, where an extension to the original approval is deemed necessary	80053	60

SCHEDULE 6 DEFINITIONS OF EXPRESSIONS USED IN SCHEDULE 1
Regulation 4(7)
PART I

References to Community Instruments
1 (1) A reference in Schedule 1 to an expression shown in column 1 of Part II of this Schedule (all of which begin with the word “Directive”) shall be read as follows.
(2) If a single Council or Commission Directive is shown in column 2 of that Part against the expression, the reference shall be read as a reference to that Directive, details of which are shown in columns 3 and 4.
(3) If more than one Council or Commission Directive is shown in column 2 of that Part against the expression, the reference shall be read as a reference to the first Directive as amended by the other Directive or Directives so shown.
(4) “(CL)” after a Directive shown in column 2 indicates that the Directive is a Council Directive and “(CM)” after the Directive indicates that the Directive is a Commission Directive.
2 A reference in Schedule 1 to the expression shown in column 1 of Part III of this Schedule shall be read as a reference to the first Council Regulation shown in column 2, as amended by the other Council Regulations, details of which are shown in columns 3 and 4.

3 References to ECE Regulations
(1) A reference in Schedule 1 to an ECE Regulation followed by a number which is not itself followed by a full stop and two digits (for example “ECE Regulation 8”) shall be read as a reference to the ECE Regulation of that number.
(2) A reference in Schedule 1 to an ECE Regulation followed by a number which is itself followed by a full stop and two digits (for example “ECE Regulation 8.04”) shall be read as a reference to the ECE Regulation of that number with the amendments in force on the date shown against the number in column (2) of Part IV of this Schedule.

4 Other expressions
In Schedule 1—
“G.B. Regs” is an abbreviation for the Great Britain Regulations as defined in regulation 3; and
“G.B. Regs for Goods Vehicles” is an abbreviation for Great Britain Regulations for Goods Vehicles as defined in regulation 3.

PART II REFERENCES TO COUNCIL AND COMMISSION INSTRUMENTS
(1)	(2)	(3)	(4)
Expression	Directives	Date	Official Journal Reference
70/157/EEC	{	see … 92/97/EEC	}
70/221/EEC	{	see … 81/333/EEC	}
70/222/EEC	70/222/EEC (CL)	20.3.1970	L76, 6.4.70, p.25
70/311/EEC	{	see … 92/62/EEC	}
70/387/EEC	70/387/EEC (CL)	27.7.1970	L176, 10.8.70, p.5
70/388/EEC	70/388/EEC (CL)	27.7.1970	L176, 10.8.70, p.12
71/127/EEC	{	see … 88/321/EEC	}
71/320/EEC	{	see … 88/194/EEC	}
72/245/EEC	72/245/EEC (CL)	20.6.1972	L152, 6.7.72, p.15
72/306/EEC	72/306/EEC (CL)	2.8.1972	L190, 20.8.72, p.1
73/350/EEC	{	see … 92/97/EEC	}
74/60/EEC	{	see … 78/632/EEC	}
74/61/EEC	74/61/EEC (CL)	17.12.1973	L38, 11.2.74, p.22
74/132/EEC	{	see … 88/194/EEC	}
74/151/EEC	{	see … 88/410/EEC	}
74/152/EEC	{	see … 88/412/EEC	}
74/346/EEC	74/346/EEC (CL)	25.6.1974	L191, 15.7.74, p.1
74/347/EEC	{	see … 79/1073/EEC	}
74/297/EEC	{	see … 91/662/EEC	}
74/408/EEC	{	see … 81/577/EEC	}
74/483/EEC	{	see … 79/488/EEC	}
75/321/EEC	{	see … 88/411/EEC	}
75/323/EEC	75/323/EEC (CL)	20.5.1975	L147, 9.6.75, p.38
75/443/EEC	75/443/EEC (CL)	26.6.1975	L196, 26.7.75, p.1
75/524/EEC	{	see … 88/194/EEC	}
76/114/EEC	{	see … 78/507/EEC	}
76/115/EEC	{	see … 90/629/EEC	}
76/432/EEC	76/432/EEC (CL)	6.4.1976	L122, 8.5.76, p.1
76/756/EEC	{	see … 89/278/EEC	}
76/757/EEC	76/757/EEC (CL)	27.7.1976	L262, 27.9.76, p.32
76/758/EEC	{	see … 89/516/EEC	}
76/759/EEC	{	see … 89/277/EEC	}
76/760/EEC	76/760/EEC (CL)	27.7.1976	L262, 27.9.76, p.85
76/761/EEC	{	see … 89/517/EEC	}
76/762/EEC	76/762/EEC (CL)	27.7.1976	L262, 27.9.76, p.122
76/763/EEC	76/763/EEC (CL)	27.7.1976	L262, 27.9.76, p.135
77/212/EEC	{	see … 92/97/EEC	}
77/311/EEC	77/311/EEC (CL)	29.3.1977	L105, 28.4.77, p.1
77/389/EEC	77/389/EEC (CL)	17.5.1977	L154, 13.6.77, p.41
77/536/EEC	77/536/EEC (CL)	28.6.1977	L220, 29.8.77, p.1
77/537/EEC	77/537/EEC (CL)	28.6.1977	L220, 29.8.77, p.38
77/538/EEC	{	see … 89/518/EEC	}
77/539/EEC	77/539/EEC (CL)	28.6.1977	L200, 29.8.77, p.72
77/540/EEC	77/540/EEC (CL)	28.6.1977	L220, 29.8.77, p.83
77/541/EEC	{	see … 90/628/EEC	}
77/649/EEC	{	see … 90/630/EEC	}
78/316/EEC	{	see .. 93/91/EEC	}
78/317/EEC	78/317/EEC (CL)	21.12.1977	L81, 28.3.78, p.27
78/318/EEC	78/318/EEC (CL)	21.12.1977	L81, 28.3.78, p.49
78/507/EEC	76/114/EEC (CL)	18.12.1975	L24, 30.1.76, p.1
	78/507/EEC (CM)	19.5.1978	L155, 13.6.78, p.31
78/548/EEC	78/548/EEC (CL)	12.6.1978	L168, 26.6.78, p.40
78/549/EEC	78/549/EEC (CL)	12.6.1978	L168, 26.6.78, p.45
78/632/EEC	74/60/EEC (CL)	17.12.1973	L38, 11.2.74, p.2
	78/632/EEC (CM)	19.5.1978	L206, 29.7.78, p.26
78/665/EEC	{	see … 91/441/EEC	}
78/764/EEC	{	see … 88/465/EEC	}
78/932/EEC	78/932/EEC (CL)	16.10.1978	L325, 20.11.78, p.1
78/933/EEC	78/933/EEC (CL)	16.10.1978	L325, 20.11.78, p.16
78/1015/EEC	{	see … 87/56/EEC	}
79/488/EEC	74/483/EEC (CL)	17.9.1974	L266, 2.10.75 p.4
	79/488/EEC (CM)	18.4.1979	L128, 26.5.79, p.1
79/489/EEC	{	see … 88/194/EEC	}
79/490/EEC	{	see … 81/333/EEC	}
79/532/EEC	79/532/EEC (CL)	17.5.1979	L145, 13.6.79, p.16
79/533/EEC	79/533/EEC (CL)	17.5.1979	L145, 13.6.79, p.20
79/622/EEC	{	see … 88/413/EEC	}
79/795/EEC	{	see … 88/321/EEC	}
79/1073/EEC	74/347/EEC (CL)	25.6.1974	L191, 15.7.74, p.1
	79/1073/EEC (CM)	22.11.1979	L331, 27.12.79, p.20
80/233/EEC	{	see … 89/278/EEC	}
80/720/EEC	{	see … 88/414/EEC	}
80/780/EEC	80/780/EEC (CL)	22.7.1980	L229, 30.8.80, p.49
80/1268/EEC	{	see … 93/116/EEC	}
80/1269/EEC	{	see … 88/195/EEC	}
81/333/EEC	70/221/EEC (CL)	20.3.1970	L76, 6.4.70, p.23
	79/490/EEC (CM)	18.4.1979	L128, 26.5.79, p.22
	81/333/EEC (CM)	13.4.1981	L131, 18.5.91, p.4
81/334/EEC	{	see … 92/97/EEC	}
81/575/EEC	{	see … 90/629/EEC	}
81/576/EEC	{	see … 90/628/EEC	}
81/577/EEC	74/408/EEC (CL)	22.7.1974	L221, 12.8.74, p.1
	81/57/EEC (CL)	20.7.1981	L209, 29.7.81, p.34
81/643/EEC	{	see … 90/630/EEC	}
82/244/EEC	{	see … 89/278/EEC	}
82/318/EEC	{	see … 90/629/EEC	}
82/319/EEC	{	see … 90/628/EEC	}
82/890/EEC	82/890/EEC (CL)	17.12.1982	L378, 31.12.82, p.45
82/953/EEC	{	see … 88/413/EEC	}
83/190/EEC	{	see … 88/465/EEC	}
83/276/EEC	{	see … 89/278/EEC	}
83/351/EEC	{	see … 91/441/EEC	}
84/8/EEC	{	see … 89/278/EEC	}
84/372/EEC	{	see … 92/97/EEC	}
84/424/EEC	{	see … 92/97/EEC	}
85/205/EEC	{	see … 88/321/EEC	}
85/647/EEC	{	see … 88/194/EEC	}
86/297/EEC	86/297/EEC (CL)	26.5.1986	L186, 8.7.86, p.19
86/298/EEC	{	see … 89/682/EEC	}
86/415/EEC	86/415/EEC (CL)	24.7.1986	L240, 26.8.86, p.1
86/562/EEC	{	see … 88/321/EEC	}
87/56/EEC	78/1015/EEC (CL)	23.11.1978	L349, 13.12.78, p.21
	87/56/EEC (CL)	18.12.1987	L24, 27.1.87, p.42
87/354/EEC	{	see … 88/465/EEC	}
87/402/EEC	{	see … 89/681/EEC	}
88/76/EEC	{	see … 91/441/EEC	}
88/77/EEC	{	see … 91/542/EEC	}
88/194/EEC	{	see … 91/422/EEC	}
88/195/EEC	80/1269/EEC (CL)	16.12.1980	L375, 31.12.88, p.46
	88/195/EEC (CL)	24.3.1988	L92, 9.4.88, p.50
88/321/EEC	71/127/EEC (CL)	1.3.1971	L68, 22.3.71, p.1
	79/795/EEC (CM)	20.7.1979	L239, 22.9.79, p.1
	85/205/EEC (CM)	18.2.1985	L90, 29.3.85, p.1
	86/562/EEC (CM)	6.11.1986	L327, 22.11.86, p.49
	88/321/EEC (CM)	16.5.1988	L147, 14.6.88, p.77
88/366/EEC	{	see … 90/630/EEC	}
88/410/EEC	74/151/EEC (CL)	4.3.1974	L84, 28.3.74, p.25
	88/410/EEC (CM)	21.6.1988	L200, 26.7.88, p.27
88/411/EEC	75/321/EC (CL)	20.5.1975	L147, 9.6.75, p.24
	88/411/EEC (CM)	21.6.1988	L200, 26.7.88, p.30
88/412/EEC	74/152/EEC (CL)	4.3.1974	L84, 28.3.74, p.33
	88/412/EEC (CM)	22.6.1988	L200, 26.7.88, p.31
88/413/EEC	79/622/EEC (CL)	25.6.1979	L179, 17.7.79, p.1
	82/953/EEC (CM)	15.12.1982	L386, 31.12.82, p.31
	88/413/EEC (CM)	22.6.1988	L200, 26.7.88, p.32
88/414/EEC	80/720/EEC (CL)	24.6.1980	L194, 28.7.80, p.1
	88/414/EEC (CM)	22.6.1988	L200, 26.7.88, p.34
88/436/EEC	{	see … 91/441/EEC	}
88/465/EEC	78/764/EEC (CL)	25.7.1978	L255, 18.9.78, p.1
	83/190/EEC (CM)	28.3.1983	L109, 26.4.83, p.13
	87/354/EEC (CL)	25.6.1987	L192, 11.7.87, p.43
	88/465/EEC (CM)	30.6.1988	L228, 17.8.88, p.31
89/173/EEC	89/173/EEC (CL)	21.12.1989	L67, 10.3.89, p.1
89/235/EEC	78/1015/EEC (CL)	23.11.1978	L349, 13.12.78, p.21
	87/56/EEC (CL)	18.12.1987	L24, 27.1.87, p.42
	89/235/EEC (CL)	13.3.1989	L98, 11.4.89, p.1
89/277/EEC	76/759/EEC (CL)	27.7.1976	L262, 27.9.76, p.71
	89/277/EEC (CM)	28.3.1989	L109, 27.4.89, p.25
89/278/EEC	{	see … 91/663/EEC	}
89/297/EEC	89/297/EEC (CL)	13.4.1989	L124, 5.5.89, p.1
89/458/EEC	{	see … 91/441/EEC	}
89/491/EEC	89/491/EEC (CM)	17.8.1989	L238, 15.8.89, p.43
89/516/EEC	76/758/EEC (CL)	27.7.1976	L262, 27.9.76, p.54
	89/516/EEC (CM)	1.8.1989	L265, 12.9.89, p.1
89/517/EEC	76/761/EEC (CL)	27.7.1976	L262, 27.9.76, p.96
	89/517/EEC (CM)	1.8.1989	L265, 12.9.89, p.15
89/518/EEC	77/538/EEC (CL)	28.6.1977	L220, 29.8.77, p.60
	89/518/EEC (CM)	1.8.1989	L265, 12.9.89, p.24
89/681/EEC	87/402/EEC (CL)	25.6.1987	L220, 8.8.87, p.1
	89/681/EEC (CL)	21.12.1989	L398, 30.12.89, p.27
89/682/EEC	86/298/EEC (CL)	26.5.1986	L186, 8.7.86, p.26
	89/682/EEC (CL)	21.12.1989	L398, 30.12.89, p.29
90/628/EEC	77/541/EEC (CL)	28.6.1977	L220, 29.8.77, p.95
	81/576/EEC (CL)	20.7.1981	L209, 29.7.81, p.32
	82/319/EEC (CM)	2.4.1982	L139, 19.5.82, p.17
	90/628/EEC (CM)	30.10.1990	L341, 6.12.90, p.1
90/629/EEC	76/115/EEC (CL)	18.12.1975	L24, 30.1.76, p.6
	81/575/EEC (CL)	20.7.1981	L209, 29.7.81, p.30
	82/318/EEC (CM)	2.4.1982	L139, 19.5.82, p.9
	90/629/EEC (CM)	30.10.1990	L341, 6.12.90, p.14
90/630/EEC	77/649/EEC (CL)	27.9.1977	L267, 19.10.77, p.1
	81/643/EEC (CM)	29.7.1981	L231, 15.8.81, p.41
	88/366/EEC (CM)	17.5.1988	L181, 12.7.88, p.40
	90/630/EEC (CM)	30.10.1990	L341, 6.12.90, p.20
91/226/EEC	91/226/EEC (CL)	27.3.1991	L103, 23.4.91, p.5
91/422/EEC	71/320/EEC (CL)	26.7.1971	L202, 6.9.71, p.37
	74/132/EEC (CM)	11.2.1974	L74, 19.3.74, p.7
	75/524/EEC (CM)	25.7.1975	L236, 8.9.75, p.3
	79/489/EEC (CM)	18.4.1979	L128, 26.5.79, p.12
	85/647/EEC (CM)	23.12.1985	L380, 31.12.85, p.1
	88/194/EEC (CM)	24.3.1988	L92, 9.4.88, p.47
	91/422/EEC (CM)	15.7.1991	L233, 22.8.91, p.21
91/441/EEC	{	see … 93/59/EEC	}
91/542/EEC	88/77/EEC (CL)	3.12.1987	L36, 9.2.88, p.33
	91/542/EEC (CL)	1.10.1991	L295, 25.10.91, p.1
91/662/EEC	74/297/EEC (CL)	4.6.1974	L165, 20.6.74, p.16
	91/662/EEC (CM)	6.12.1991	L366, 31.12.91, p.1
91/663/EEC	76/756/EEC (CL)	27.7.1976	L262, 27.9.76, p.71
	80/233/EEC (CM)	28.3.1979	L51, 25.2.80, p.8
	82/244/EEC (CM)	17.3.1982	L109, 22.4.82, p.31
	83/276/EEC (CL)	26.5.1983	L151, 9.6.83, p.47
	84/8/EEC (CM)	14.12.1983	L9, 12.1.84, p.24
	89/278/EEC (CM)	28.3.1989	L109, 20.4.89, p.38
	91/663/EEC (CM)	6.12.1991	L366, 31.12.91, p.17
92/21/EEC	92/21/EEC (CL)	31.3.1992	L129, 14.5.92, p.1
92/22/EEC	92/22/EEC (CL)	31.3.1992	L129, 14.5.92, p.11
92/23/EEC	92/23/EEC (CL)	31.3.1992	L129, 14.5.92, p.95
92/24/EEC	92/24/EEC (CL)	31.3.1992	L129, 14.5.92, p.154
92/62/EEC	70/311/EEC (CL)	8.6.1970	L133, 18.6.70, p.10
	92/62/EEC (CM)	2.7.1992	L199, 18.7.91, p.3
92/97/EEC	70/157/EEC (CL)	6.2.1970	L42, 23.2.70, p.16
	73/350/EEC (CM)	7.11.1973	L321, 22.11.73, p.33
	77/212/EEC (CL)	8.3.1977	L66, 12.3.77, p.33
	81/334/EEC (CM)	13.4.1981	L131, 18.5.81, p.6
	84/372/EEC (CM)	3.7.1984	L196, 26.7.84, p.47
	84/424/EEC (CL)	3.9.1984	L238, 6.9.84, p.31
	92/97/EEC (CL)	10.11.1992	L371, 19.12.92, p.1
92/114/EEC	92/114/EEC (CL)	17.12.1992	L409, 31.12.92, p.17
93/14/EEC	93/14/EEC (CL)	5.4.1993	L121, 15.5.93, p.1
93/116/EEC	80/1268/EEC (CL)	16.12.1980	L375, 31.12.80, p.36
	93/116/EEC (CM)	17.12.1993	L329, 30.12.93, p.39
93/29/EEC	93/29/EEC (CL)	14.6.1993	L188, 29.7.93, p.1
93/33/EEC	93/33/EEC (CL)	14.6.1993	L188, 29.7.93, p.32
93/59/EEC	70/220/EEC (CL)	20.3.1970	L76, 6.4.70, p.1
	74/290/EEC (CL)	28.5.1974	L159, 15.6.74, p.61
	77/120/EEC (CM)	30.11.1976	L32, 3.2.77, p.32
	78/665/EEC (CM)	14.7.1978	L223, 14.8.78, p.48
	83/351/EEC (CL)	16.6.1983	L197, 20.7.83, p.1
	88/76/EEC (CL)	3.12.1987	L36, 9.2.88, p.1
	88/436/EEC (CL)	16.6.1988	L214, 6.8.88, p.1
	89/458/EEC (CL)	18.7.1989	L226, 3.8.89, p.1
	91/441/EEC (CL)	26.6.1991	L242, 30.8.91, p.1
	93/59/EEC (CL)	28.6.1993	L186, 28.7.93, p.21
93/91/EEC	78/316/EEC (CL)	21.12.1977	L81, 28.3.78, p.3
	93/91/EEC (CM)	29.10.1993	L284, 19.11.93, p.25

PART III REFERENCES TO COMMUNITY REGULATIONS EEC REGULATIONS
(1)	(2)	(3)	(4)
Expression	Council Regulations	Date	Official Journal Reference
Community Regulation 3688/92	1463/70 1787/73 2828/77 3821/85 3688/92	20.7.1970 25.6.1973 12.12.1977 20.12.1985 21.12.1992	L164, 27.7.70, p.1 L181, 4.7.73, p.1 L334, 24.12.77, p.5 L370, 31.12.85, p.8 L374, 22.12.92, p.12

PART IV REFERENCES TO ECE REGULATIONS
(1)	(2)
ECE Regulation and Amending Series	Date
1	24 Mar 60
1.01	28 Apr 86
2	24 Mar 60
2.02	27 Nov 78
2.03	28 Apr 86
3	1 Nov 63
3.01	18 Aug 82
3.02	11 Jul 85
4	23 Sep 64
5	22 May 67
5.01	2 Mar 83
5.02	2 Jun 89
6	22 May 67
6.01	7 Oct 87
7	22 May 67
7.01	18 Sep 85
7.02	24 Jul 91
8	12 Jun 67
8.01	28 May 71
8.02	23 Apr 75
8.03	21 Jun 78
8.04	23 Jun 86
10	17 Dec 68
10.01	23 Jun 78
11	8 Jan 69
11.01	29 Oct 75
11.02	7 May 81
12	14 Apr 69
12.01	3 Nov 75
12.02	23 Mar 83
12.03	24 Aug 93
13	29 May 69
13.01	5 Dec 73
13.02	5 Dec 73
13.03	5 Feb 79
13.04	24 Aug 81
13.05	15 Feb 85
13.06	28 Jan 91
14	30 Jan 70
14.01	19 Aug 76
14.02	25 Feb 85
14.03	16 Dec 92
15	11 Mar 70
15.01	11 Mar 70
15.02	8 Mar 77
15.03	20 Feb 78
15.04	31 Dec 85
16	14 Aug 70
16.01	7 May 73
16.02	7 May 73
16.03	25 Jan 80
16.04	31 Dec 85
17	14 Aug 70
17.01	2 Jan 76
17.02	7 Apr 81
17.03	12 May 86
17.04	20 Mar 90
18	14 Sep 70
18.01	8 Dec 80
19	14 Sep 70
19.01	22 Aug 74
19.02	15 Sep 88
20	1 Mar 71
20.01	1 Sep 76
20.02	14 Aug 86
21	2 Jun 71
21.01	24 Oct 80
23	20 Aug 71
24	23 Aug 71
24.01	12 Mar 74
24.02	27 May 80
24.03	25 Apr 86
25	30 Dec 71
25.01	30 Jul 81
25.02	2 Jun 86
25.03	26 Apr 90
26	28 Apr 72
26.01	12 Mar 74
27	7 Jun 72
27.01	12 Mar 74
27.02	20 Jun 77
27.03	30 Apr 85
28	31 Oct 72
30	1 Apr 75
30.01	10 Oct 77
30.02	21 Apr 81
31	2 Jun 75
31.01	19 Apr 83
31.02	17 May 89
32	14 Jul 75
33	25 Jul 75
34	25 Jul 75
34.01	29 Jan 79
35	18 Sep 75
36	12 Nov 75
36.01	19 Apr 82
36.02	3 Sep 86
36.03	14 Dec 92
37	4 Oct 77
37.01	27 Apr 82
37.02	20 Jun 84
37.03	20 Jun 84
38	7 Jul 78
39	11 Jul 78
40	7 May 79
40.01	31 May 88
43	24 Oct 80
44	22 Jan 81
44.01	16 Nov 82
44.02	18 Apr 86
45	15 May 81
45.01	16 May 88
46	29 Sep 81
46.01	5 Oct 87
47	28 Aug 81
48	23 Nov 81
49	10 May 83
49.01	5 Oct 90
49.02	30 Dec 92
50	11 Jan 83
54	13 Jun 83
55	6 Jul 83
56	31 May 83
57	31 May 83
57.01	24 Apr 89
58	1 Jul 83
58.01	25 Mar 89
60	18 Jul 84
61	18 Jul 84
62	23 Oct 84
64	1 Aug 85
65	4 Sep 86
66	30 Jan 87
68	15 Apr 87
69	27 Jul 87
70	27 Jul 87
72	19 May 88
75	19 May 88
76	20 May 88
77	6 Oct 88
78	20 Oct 88
78.01	28 Nov 90
80	25 May 89
83	5 Nov 89
83.01	30 Dec 92
84	23 Aug 91
85	9 Sep 91
89	1 Oct 92