Preliminary

1 Citation, commencement and revocation
1 These Regulations may be cited as the Gas Appliances (Safety) Regulations 1992.
2 These Regulations (except paragraph (3) below) shall come into force on 6th April 1992 and the said paragraph (3) shall come into force on 1st January 1996.
3 The Gas Cooking Appliances (Safety) Regulations 1989 and, to the extent only that they apply to appliances, the Heating Appliances (Fireguards) (Safety) Regulations 1991 are hereby revoked.
S.I. 1989/149.
S.I. 1991/2693.