PART 3 EXPRESS CONSENT

5 Applications for hazardous substances consent
1 Subject to paragraph (2) and regulation 26, an application for hazardous substances consent shall—
(a) be made to the hazardous substances authority on Form 1;
(b) include the information specified in the form, a site map, and a substance location plan;
(c) be accompanied by 3 copies of the form, the map and plan submitted with it and the notices and certificates required by regulations 6 and 7.
2 Subject to regulation 26, an application to which section 13 applies (application for hazardous substances consent without a condition subject to which a previous consent was granted) shall—
(a) be made to the hazardous substances authority on Form 2;
(b) include the particulars specified in the form, a change of location plan, if required by paragraph (6), and particulars of the relevant consent;
(c) be accompanied by 3 copies of the form, the relevant consent, any plan submitted with it and the notices and certificates required by regulations 6 and 7.
3 An application under section 17 (application for the continuation of consent following a change of control) shall—
(a) be made to the hazardous substances authority on Form 2;
(b) include the particulars specified in the form, a change of control plan, and particulars of the relevant consent;
(c) be accompanied by 3 copies of the form, the relevant consent, the change of control plan and the notices and certificates required by regulations 6 and 7.
4 The site map required by paragraph (1)(b) shall be a map, reproduced from, or based upon, an Ordnance Survey map with a scale of not less than 1 to 10,000, which identifies the land to which the application relates and shows National Grid lines and reference numbers.
5 The substance location plan required by paragraph (1)(b) shall be a plan of the land to which the application relates, drawn to a scale of not less than 1 to 2,500, which identifies—
(a) any area of the site intended to be used for the storage of the substance;
(b) where the substance is to be used in a manufacturing, treatment or other industrial process, the location of the major items of plant involved in that process in which the substance will be present;
(c) access points to and from the land.
6 A change of location plan shall be required in the case of an application to which section 13 applies which relates to a condition restricting the location of a hazardous substance, and shall be a plan of the land to which the application relates, drawn to a scale of not less than 1 to 2,500, which identifies the location of the hazardous substance at the date of the application and the proposed location requiring the application.
7 The change of control plan required by paragraph (3) shall be a plan of the land to which the application relates, drawn to a scale of not less than 1 to 2,500, which identifies each area of the site under separate control after the proposed change of control.
8 The relevant consent referred to in paragraphs (2)(b) and (3)(b) is the existing hazardous substances consent which applies to the hazardous substance to which the application applies; and the particulars of the relevant consent to be supplied shall be a copy of the consent, in the case of a consent granted on an application under the Act, a copy of the relevant claim, in the case of a consent deemed to be granted under section 11 or a copy of the relevant direction, in the case of a consent deemed to be granted under section 12.
9 Where an application referred to in paragraphs (2) or (3) relates to more than one relevant consent, particulars of each such consent shall be included in the application.
10 Regulations 6 to 13 shall apply to applications made under section 17 as they apply to applications for hazardous substances consent.