SCHEDULE 9 LIFEBUOYS AND ATTACHMENTS

PART III LIFEBUOY SELF-ACTIVATING SMOKE SIGNALS

1.2 Construction
As applicable the materials of a lifebuoy self-activating smoke signal shall be rot-proof, corrosion resistant, and not be unduly affected by sea-water, oil or fungal attack.