SCHEDULE 9 LIFEBUOYS AND ATTACHMENTS

PART I LIFEBUOYS (SOLAS)

2.5 Performance
A lifebuoy shall be capable of supporting not less than 14.5 kg of iron in fresh water for period of 24 hours.