SCHEDULE 6 LAUNCHING APPLIANCES AND EMBARKATION LADDERS

PART IV INFLATED BOAT LAUNCHING APPLIANCES

2.2 General
Each launching appliance shall be so constructed that the minimum amount of routine maintenance is necessary. All parts requiring regular maintenance by the ship’s crew shall be readily accessible and easily maintained.