SCHEDULE 4 LIFERAFTS

PART VIII GAS INFLATION SYSTEM

4.1 Gas Cylinder Valve
The cylinder valve shall be fitted with a safety relief device which will operate between 18 MPa and the test pressure of the cylinder.