SCHEDULE 4 LIFERAFTS

PART VIII GAS INFLATION SYSTEM

3.7 Gas Cylinders
Charged gas cylinders with a gas capacity of 1.1 kg or greater when check weighed shall not be deficient in gas by more than 56 grams. Charged cylinders with a gas content of less than 1.1 kg shall not be deficient in gas by more than 28 grams.