SCHEDULE 2 RESCUE BOATS

PART III INFLATED RESCUE BOATS

1.1 General
An inflated rescue boat is a craft combining a flexible lower hull and inflated tubes fitted at the edge of the lower hull together forming a watertight boundary and which relies solely on the buoyancy of the inflated tubes as the inherent buoyancy of the craft.