SCHEDULE 13 BUOYANT APPARATUS

2.1 Construction
The buoyant apparatus shall be so constructed to withstand a minimum drop into the water from a height of 10 metres. If the buoyant apparatus is to be stowed at a height of more than 10 metres above the waterline in the lightest seagoing condition, it shall be of a type which has satisfactorily drop-tested from at least that height.