3 1 The Offshore Installations (Managers) Regulations 1972 shall be amended as follows.
S.I.1972/703.
2 The following paragraph shall be added to regulation 2–

“3 The notices referred to in paragraphs (1) and (2) above shall be addressed to the Secretary of State at the offices of the Health and Safety Executive.”

3 In place of the reference to the Secretary of State for Trade and Industry in regulation 4 there shall be substituted a reference to the Health and Safety Executive.
4 The words “To the Secretary of State for Trade and Industry” shall be omitted from the forms set out in Schedule 1 and 2.