3 Certain provisions of Part II of the 1974 Act to apply to radioactive waste
The provisions of the 1974 Act specified in the Schedule to these Regulations shall have effect, without modification, in relation to any radioactive waste as they have effect in relation to effluent or other matter or substance which is not radioactive waste.
Sections 30A to 51 and 53 to 56 were substituted by the Water Act 1989, Schedule 23, paragraphs 4, 5 and 6.