3 Nature and functions of the trust
1 The trust is established for the purpose specified in section 5(1)(a) of the Act.
2 The trust’s functions (which include functions which the Secretary of State considers appropriate in relation to the provision of services by the trust for one or more health authorities) shall be—
(a) to own and manage hospital accommodation and services provided at Management Headquarters, Clock Tower Wing, Burton Distict Hospital Centre, Belvedere Road, Burton upon Trent, Staffs, DE13 0RB and associated hospitals;
(b) to manage community health services provided from Management Headquarters, Clock Tower Wing, Burton District Hospital Centre, Belvedere Road, Burton upon Trent, Staffs, DE13 0RB and to own the associated premises.