1 Citation, commencement and interpretation
1 This Order may be cited as the Milton Keynes General National Health Service Trust (Establishment) Order 1991 and shall come into force on 1st November 1991.
2 In this Order unless the context otherwise requires—
“the Act” means the National Health Service and Community Care Act 1990;
“establishment date” means 1st November 1991;
“operational date” has the meaning assigned to it in paragraph 3(1)(e) of Schedule 2 to the Act;
“the trust” means the Milton Keynes General National Health Service Trust established by article 2 of this Order.