1 Citation, commencement and interpretation
1 These Regulations may be cited as the National Health Service Supplies Authority Regulations 1991 and shall come into force on 1st October 1991.
2 In these Regulations unless the context otherwise requires—
“the Authority” means the National Health Service Supplies Authority established by the National Health Service Supplies Authority (Establishment and Constitution) Order 1991;
“member” means a member of the Authority but does not include the Chairman;
“non-officer member” and “officer member” mean respectively a member who is not, and one who is, an officer of the Authority.
S.I.1991/2001.