This Order supersedes S.I. 1991/577 published on 11th March 1991 and isbeing issued free to all known recipients of that Statutory Instrument.
1991 No. 1236
CHANNEL TUNNEL
The Channel Tunnel (Emergency Medical Services) (No. 2) Order 1991
Made 22nd May 1991
Laid before Parliament 23rd May 1991
Coming into force 23rd May 1991

The Secretary of State for Health, in exercise of the powersconferred by section 11(1) of the Channel Tunnel Act 1987, and all other powers enabling him in that behalf,hereby makes the following Order:
1987 c. 53; see also the meaning of“the appropriate Minister” in section 13(1).