SCHEDULE 1 PROVISIONS TO BE SUBSTITUTED FOR SCHEDULE 1
Article 2(a)

“SCHEDULE 1 approved disinfectants
Articles 4 and 5
Disinfectant	Orders in respect of which use is approved; and dilution rates				
Foot-and-Mouth Disease Orders	Swine Vesicular Disease Order	Fowl Pest Orders	Tuberculosis Orders	General Orders
Action Approved Dairy Disinfectant	240	160	91	25	145
Action Approved Disinfectant	240	200	80	25	145
Agri Disinfex	250	300	125	30	180
Agridyne 2	250	300	125	30	180
Agrimar Iodophor Disinfectant	250	300	125	30	180
Agrimar Longstay	–	–	100	100	120
Agrimar White Fluid	–	–	30	90	100
Agrisan Master Approved Disinfectant	120	–	59	–	59
Airsept	–	–	–	–	43
Alodine	240	250	100	15	110
Ani–Odophor GT	240	160	91	25	145
Antec Black Fluid	–	–	41	–	80
Antec Farm Fluid	219	100	39	24	29
Antec Farm Fluid S	700	200	200	50	115
Antec Iodine Active Steriliser	250	300	125	30	180
Antec Long Life	–	–	60	–	60
Antec Long Life 200	–	160	200	–	–
Antec Long Life 250S	500	200	250	48	90
Antec Long Life Extra	–	–	71	75	85
Antec New Formula Black Fluid	–	–	52	–	60
Antec New Formula Farm Fluid	300	110	70	30	65
Antec New Formula White Fluid	–	–	45	83	103
Antec Santec 1000	1000	80	160	30	90
Antec Virkon S	1300	200	280	–	120
Antec White Fluid	–	–	30	90	100
Applied 8–57 White Disinfectant	–	–	–	49	89
Arrow Agricultural Hydroclean Bactericidal
Cleaner Disinfectant	30	–	–	–	–
Aviary Disinfectant	240	200	80	25	145
Basol 99	–	–	20	20	20
Battles Black Disinfectant Fluid	–	–	45	–	60
Battles Iofarm Iodophor Disinfectant and Dairy Detergent Steriliser	250	300	125	30	180
Battles Universal Disinfectant Fluid	300	–	60	37	–
Battles White Disinfectant Fluid	–	–	50	50	60
Betaphors 25	240	180	90	30	160
Biocid 30	250	300	125	30	180
Biokil Plus	40	–	50	–	40
Black Disinfectant	–	–	41	–	80
Capriclense	240	200	80	25	145
Carbo White Disinfectant	–	–	–	49	89
Castrol Solvex ICD 109	50	–	–	–	–
Centaur New Approved Agricultural Disinfectant	250	300	125	30	180
Century Black Disinfectant	–	–	20	–	–
Citric Acid BP	500	–	–	–	–
Clearsol	–	–	–	45	–
Combat 2	250	300	125	30	180
Compass Agricultural Disinfectant	50	–	100	50	100
Convoy Liquid Disinfectant	250	150	80	60	85
Cromessol Animal Health Care Disinfectant	75	75	100	75	200	
Crown Special Detergent Disinfectant	240	200	80	25	145
C S Disinfectant	–	–	65	–	40
Davrisol 76	–	–	30	90	100
Defender	–	–	30	90	100
Delsanex Iodel F.D.	215	234	130	26	147
Dexadyne	240	–	91	–	–
Dexstar Halogiene	20	90	200	20	199
Disteola	240	300	80	25	100
Downland White Disinfectant	–	–	–	49	89
Ely’s Economic Farm Fluid	250	20	100	25	70
Evans White Disinfectant	–	–	–	49	89
FAM	240	250	100	15	110
FAM 30	250	300	125	30	180
FAM 30C	405	485	200	48	290
Famclor	200	500	59	12	70
Famosan	120	200	59	–	59
Farm Aid 200	75	75	100	75	200
Farm Disinfex	–	–	30	90	100
Farmicide	40	–	50	–	40
Fensol	–	–	60	65	70
Ficare Blue Star	–	–	100	85	150
Ficare Gold Star	275	330	141	33	200
Fluocide	75	75	100	75	200
Formalin BP (Containing not less than 34% formaldehyde)	9	9	–	–	–
Formula H	–	–	To be used undiluted	–	–
Gliddons Iodophor Detergent Sanitizer and Disinfectant	250	300	125	30	180	
Gloquat SD Extra	–	–	50	–	–
Glu-Cid	20	25	100	–	9
Gower Agriclor	200	500	59	12	70
Gower Farm Disinfectant	–	–	30	90	100
GPC8	80	–	200	–	–
GR 218	400	200	–	–	–
Halamid	20	90	200	20	199
Hitec Farm Supreme	100	120	50	12	73
Hitec Five Star	405	485	200	48	290
Hitec Hygiene Supreme	–	–	50	–	5
Hullite Disinfectant Fluid	–	–	–	49	89
Hullite Farm Disinfectant Fluid	–	–	30	90	100
Hy-Co AFD	–	–	30	90	100
Hykil X	219	100	39	24	29
Iodet	240	250	100	15	110
Iofarm	240	250	100	15	110
Iosan Farm Disinfectant	240	180	80	15	80
Izal Germicide	–	–	41	75	90
Jeyes Fluid	–	–	30	–	50
Jordan’s White Farm Disinfectant	–	–	30	90	100
Kaylass General farm Disinfectant	250	300	125	30	180
Kilcrobe WO Disinfectant Fluid Special Grade	–	–	–	–	99
Killgerm Black Disinfectant R W Co-efficient 18/22	–	–	41	–	80
Killgerm Iodair	250	260	61	–	–
Killgerm Lysol BP	–	–	50	39	49
Killgerm White Farm Disinfectant	–	–	21	66	100
Kirby Chlor	–	448	271	–	450
Kryptol	60	–	–	–	20
Lifeline	–	50	75	–	–
LPH Disinfectant	175	–	–	–	–
Lysol BP 1968	9	–	39	39	49
Lysol BP Evansol	10	–	50	39	50
Lysovet	–	–	66	45	49
Marstan Dairy Hygiene Iodair	250	260	61	–	–
Master SVD Solution	–	9	–	–	–
Meyton Terminal Farm Disinfectant	–	–	100	100	120
Meyton White Farm Disinfectant	–	–	30	90	100
Micro Chlor	–	100	250	–	210
Microdine	160	140	100	–	110
Microfec	–	–	30	90	100
Microl-Plus	–	–	60	65	70
Microsan	–	–	70	–	–
Microzol	–	–	100	100	120
New Formula Pet Protect	–	300	150	–	60
Newmarket Fluid	75	75	100	75	200
Novagen FP	240	180	80	22	145
Nutosan	250	300	125	30	180
Nutriken Iodophor Disinfectant	250	300	125	30	180
Omnicide	–	300	150	–	60
Orbicide	250	300	125	30	180
Ortho-phosphoric acid (Technical Grade)	330	–	–	–	–
Ovitek Biocidal Solution Concentrate	–	–	200	–	25
Parakil	–	–	50	–	–
Parasept	–	–	100	100	120
Parvodox	75	75	100	75	200
Pennine Iodophor Detergent Steriliser	250	260	61	–	–
Peratol	75	75	100	75	200
Pet Safe	–	–	Use undiluted	–	–
Phiodin	220	180	80	11	90
Phorpass	240	280	90	30	85
Phorpass 75	380	300	180	100	180
Polykil + Disinfectant	–	300	–	–	180
Premiere White Disinfectant	–	–	–	49	89
QC 488 Farm Disinfectant	–	–	100	100	120
Qualitex White Farm Disinfectant	–	–	30	90	100
Ropolik	240	250	100	15	110
Rygenitas Farm Disinfectant	–	–	30	90	100
Ryodac	250	300	125	30	180
Ry-odophor SP	240	160	91	25	145
Safeguard Abattoir Sanitiser	20	–	10	–	3
Safeguard Iodophor Concentrate	100	–	100	–	74
SEP 55	–	–	100	100	120
Sodium Carbonate (Decahydrate)Complying with BS 3674 of 1963	24	–	–	–	–
Sodium Hydroxide	–	100	–	–	–
Sorex White Farm Disinfectant	–	–	21	66	100
Sorgene 5	75	75	100	75	200
Sorgene Clear	–	–	100	100	120
Sorgene White	–	–	30	90	100
Special Ropolik	250	300	125	30	180
Sterilite Farm Disinfectant	–	–	30	90	100
Sterilite WD White Disinfectant	–	–	–	49	89
Sudol	–	–	60	65	70
Sulphamic Acid	500	–	–	–	–
Superblack	–	–	41	–	80
Superdine	250	300	125	30	180
Superfine White Disinfectant	–	–	–	49	89
Superkill	–	50	100	–	–
Superlin Black Disinfectant	–	–	–	70	70
Superlysol	–	–	50	39	49
Superphenol	–	–	100	100	120
Superwhite	–	–	21	66	100
Superwhite Plus Farm Disinfectant	–	–	30	90	100
Surgiclene	250	300	125	30	180
SWC General White	–	–	30	90	100
SWC Iodine	250	300	125	30	180
SWC Poultry Terminal	–	–	100	100	120
Tegodor	–	–	51	–	–
Tegodor 73	–	–	51	–	–
Tekresol	–	–	90	80	135
Total Farm Disinfectant	250	300	125	30	180
Tynedale Dairy Hygiene Disinfectant Plus	240	160	91	25	145
Unidol	–	–	60	65	70
Unilite	–	–	30	90	100
Unisep	–	–	100	100	120
Universal	240	100	100	25	100
Valley White Disinfectant	–	–	–	49	89
Vanodine Farm Disinfectant	–	–	30	90	100
Vanodine Farm Fluid	219	100	39	24	29
Vanodine Farm Fluid Extra	300	110	70	30	65
Vanosan	75	75	100	75	200
Vapulin Black Disinfectant	–	–	41	–	80
Vesphene D39	10	–	50	70	55
VH Parvocide Plus	–	300	150	–	60
VH 150 Avicide	–	300	150	–	60
VH 1000 Virucide	1000	80	160	30	90
VH6 Virucide	219	100	39	24	29
Virbac Iodine Disinfectant	250	300	125	30	180
Virbac Special Disinfectant	80	–	200	–	–
Vykil All Purpose Detergent Disinfectant	240	200	80	25	145
Whelm Powder Disinfectant	450	300	130	30	180
White Cresanol	–	–	30	90	100
Young’s Disinfectant and Dairy DetergentSteriliser	250	300	125	30	180
Young’s Farm Septol	–	–	40	89	99
Young’s Iodophor Farm Disinfectant	215	234	130	26	147
Zenasan Farm Disinfectant	–	–	30	90	100
* Additions to Schedule					”

SCHEDULE 2 PROVISIONS TO BE SUBSTITUTED FOR SCHEDULE 2
Article 2(b)

“SCHEDULE 2
Articles 4 and 6

approved disinfectants subject to transitional provisions
Disinfectant	Orders in respect of which use is approved; and dilution rates				
Foot-and-Mouth Disease Orders	Swine Vesicular Disease Order	Fowl Pest Orders	Tuberculosis Orders	General Orders
Gower Agri 30	250	300	125	30	180”