1989 No. 1396
URBAN DEVELOPMENT
The Black Country Development Corporation (Vesting of Land) (Central Electricity Generating Board) Order 1989
Approved by both Houses of Parliament
Made 21st June 1989
Laid before Parliament 22nd June 1989
Coming into force 28th July 1989

The Secretary of State for the Environment and the Secretary of State for Energy, being the appropriate Minister for the purposes of section 141(3) of the Local Government, Planning and Land Act 1980, in exercise of the powers conferred by section 141(1) and (3) of that Act, and of all other powers enabling them in that behalf, hereby make the following Order:
1980 c. 65; as to “appropriate Minister” see section 170(3).

1 Citation and commencement
This Order may be cited as the Black Country Development Corporation (Vesting of Land) (Central Electricity Generating Board) Order 1989 and shall come into force on the day after the day on which it is approved by resolution of each House of Parliament.

2 Interpretation
1 In this Order—
“the Corporation” means the Black Country Development Corporation;
“statutory undertakers” does not include any statutory undertakers in relation to whom neither the Secretary of State for the Environment nor the Secretary of State for Energy is the appropriate Minister;
“urban development area” means the area designated as an urban development area by the Black Country Development Corporation (Area and Constitution) Order 1987.
S.I.1987/922
2 Any reference in this Order to a map followed immediately by a number is a reference to the map so numbered in the set of maps numbered 1 and 2 entitled “Maps referred to in the Black Country Development Corporation (Vesting of Land) (Central Electricity Generating Board) Order 1989”, of which prints, signed by an Under Secretary in the Department of the Environment, are deposited and available for inspection at the offices of the Secretary of State for the Environment, the Secretary of State for Energy, the Central Electricity Generating Board, the council of the borough of Sandwell and the Corporation.
3 Any reference in this Order to a numbered plot is a reference to the plot so numbered and shown bounded externally with a black line and either stippled or edged internally with a stippled band on a numbered map.

3 Vesting of land
The land described in the Schedule hereto, and now vested in the Central Electricity Generating Board or a local authority or other statutory undertakers or public body or in a subsidiary of any of them, being land within the urban development area, is hereby vested in the Corporation.

4 Easements and rights in or over land
All existing easements and rights in or over other land within the urban development area which are vested in an authority or body mentioned in article 3 above, and which are annexed or appurtenant to land vested by that article or any part thereof, are hereby vested in the Corporation.
Nicholas Ridley Secretary of State for the Environment 21st June 1989
Cecil Parkinson Secretary of State for Energy 19th June 1989

THE SCHEDULE LAND VESTED IN THE CORPORATION
Article 3
Plot Number	
1	Approximately 4.750 hectares of land, adjacent to Walsall Canal, Tipton, in the borough of Sandwell, shown on map 1.
2	Approximately 1.570 hectares of land, at Wolverhampton Road, Oldbury, in the borough of Sandwell, shown on map 2.

(This note is not part of the Order)
This Order vests in the Black Country Development Corporation certain land which is at present vested in the Central Electricity Generating Board (or in another body mentioned in section 141(1) of the Local Government, Planning and Land Act 1980), and related easements and similar rights.
The land is shown coloured black on the map forming part of this note. The land and rights are in the area designated by the Black Country Development Corporation (Area and Constitution) Order 1987, which establishes the Black Country Development Corporation.