11 Enforcement
1 The provisions of these Regulations shall be enforced as if they were health and safety regulations made under section 15 of the Heath and Safety at Work etc Act 1974 and, except as provided in paragraph (2) below, the provisions of that Act, as regards enforcement and offences, shall apply for the purposes of these Regulations.
1974 c. 37.
2 The enforcing authority for the purposes of regulation 4 of these Regulations, and as respects the application of these Regulations to the administration of any radioactive medicinal product, shall be the Secretary of State.