SCHEDULE

Table 1 BRIM MEASURES
Nominal Capacity
Limits of Error (ml)	Minimum Height ofMarking (mm)
(In Excess Only)
(1)	(2)	(3)
250 ml	20	4.5
500 ml	30	4.5
1000 ml	60	6
2000 ml	120	6
⅓ pint	20	4.5
½ pint	20	4.5
1 pint	34	4.5
2 pint	68	6
4 pint	136	6