SCHEDULE 5 HYGIENE REQUIREMENTS IN RELATION TO STAFF, PREMISES, EQUIPMENT AND IMPLEMENTS IN EXPORT SLAUGHTERHOUSES, EXPORT CUTTING PREMISES AND EXPORT COLD STORES

PART I requirements applicable in all export slaughterhouses and export cutting premises
6 Smoking shall be prohibited in work rooms and store rooms.