SCHEDULE 1

First Table
Age	Males	Females
	£	£
16	4.37	5.34
17	4.42	5.41
18	4.47	5.47
19	4.52	5.53
		
20	4.57	5.59
21	4.62	5.65
22	4.67	5.71
23	4.73	5.78
24	4.78	5.85
25	4.83	5.92
26	4.89	5.98
27	4.95	6.05
28	5.01	6.12
29	5.07	6.18
30	5.12	6.25
31	5.18	6.32
32	5.24	6.40
33	5.30	6.47
34	5.37	6.54
35	5.43	6.61
36	5.49	6.69
37	5.56	6.77
38	5.62	6.85
39	5.68	6.93
40	5.75	7.01
41	5.82	7.09
42	5.89	7.18
43	5.96	7.27
44	6.04	7.35
45	6.11	7.44
46	6.19	7.53
47	6.27	7.63
48	6.35	7.7
49	6.44	7.83
50	6.52	7.93
51	6.61	8.04
52	6.70	8.16
53	6.79	8.28
54	6.88	8.40
55	6.98	8.53
56	7.09	8.66
57	7.19	8.80
58	7.30	8.95
59	7.42	9.10
60	7.56	9.94
61	7.69	—
62	7.83	—
63	8.00	—
64	8.18	—
65	8.97	—

Second Table
Age	Males	Females
	£	£
16	5.57	7.01
17	5.64	7.09
19	5.77	7.25
20	5.84	7.33
21	5.91	7.42
22	5.97	7.50
23	6.04	7.5
24	6.11	7.67
25	6.18	7.76
26	6.25	7.85
27	6.32	7.94
28	6.40	8.03
29	6.47	8.12
30	6.55	8.21
31	6.62	8.30
32	6.70	8.39
33	6.77	8.49
34	6.85	8.58
35	6.93	8.68
36	7.01	8.78
37	7.0	8.88
38	7.18	8.98
39	7.26	9.09
40	7.35	9.19
41	7.44	9.30
42	7.53	9.41
43	7.61	9.52
44	7.71	9.64
45	7.80	9.75
46	7.90	9.87
47	8.00	10.00
48	8.10	10.13
49	8.21	10.26
50	8.31	10.39
51	8.42	10.53
52	8.53	10.68
53	8.64	10.84
54	8.76	11.00
55	8.89	11.16
56	9.02	11.33
57	9.15	11.51
58	9.29	11.70
59	9.44	11.90
60	9.60	13.00
61	9.77	—
62	9.95	—
63	10.14	—
64	10.36	—
65	11.37	—
Regulations 3, 4 and 7
SCHEDULE 2

First Table
Age	Males	Females
	£	£
16	1.60	2.13
17	1.66	2.21
18	1.72	2.29
19	1.78	2.37
20	1.84	2.45
21	1.90	2.53
22	1.96	2.61
23	2.03	2.70
24	2.10	2.79
25	2.17	2.88
26	2.24	2.97
27	2.31	3.07
28	2.38	3.17
29	2.46	3.27
30	2.54	3.38
31	2.62	3.49
32	2.71	3.61
33	2.80	3.73
34	2.89	3.85
35	2.99	3.97
36	3.08	4.11
37	3.18	4.25
38	3.29	4.39
39	3.40	4.53
40	3.52	4.68
41	3.64	4.83
42	3.76	5.00
43	3.88	5.17
44	4.01	5.35
45	4.14	5.53
46	4.28	5.71
47	4.43	5.91
48	4.58	6.12
49	4.73	6.33
50	4.89	6.56
51	5.06	6.79
52	5.23	7.03
53	5.41	7.28
54	5.60	7.55
55	5.80	7.83
56	6.01	8.12
57	6.22	8.43
58	6.45	8.76
59	6.69	9.10
60	6.95	9.94
61	7.22	—
62	7.52	—
63	7.83	—
64	8.18	—
65	8.97	—

Second Table
Age	Males	Females
	£	£
16	2.05	2.79
17	2.13	2.90
18	2.20	3.00
19	2.28	3.11
20	2.35	3.21
21	2.43	3.32
22	2.51	3.43
23	2.59	3.54
24	2.67	3.65
25	2.76	3.77
26	2.85	3.90
27	2.95	4.03
28	3.05	4.16
29	3.15	4.29
30	3.25	4.43
31	3.35	4.58
32	3.46	4.73
33	3.57	4.89
34	3.69	5.05
35	3.82	5.21
36	3.94	5.38
37	4.07	5.56
38	4.20	5.75
39	4.34	5.94
40	4.48	6.13
41	4.63	6.33
42	4.79	6.55
43	4.95	6.77
44	5.11	7.00
45	5.28	7.24
46	5.46	7.48
47	5.65	7.74
48	5.84	8.01
49	6.03	8.29
50	6.24	8.58
51	6.46	8.88
52	6.68	9.20
53	6.90	9.53
54	7.14	9.88
55	7.38	10.25
56	7.64	10.63
57	7.91	11.04
58	8.20	11.46
59	8.51	11.90
60	8.83	13.00
61	9.17	—
62	9.54	—
63	9.94	—
64	10.36	—
65	11.37	—
Regulations 3 and 4
SCHEDULE 3

First Table
Age	Males	Females
	£	£
16	2.77	3.21
17	2.76	3.20
18	2.75	3.18
19	2.74	3.16
20	2.73	3.14
21	2.72	3.12
22	2.71	3.10
23	2.70	3.0
24	2.68	3.06
25	2.67	3.04
26	2.66	3.01
27	2.64	2.98
28	2.62	2.95
29	2.60	2.92
30	2.58	2.88
31	2.56	2.83
32	2.53	2.79
33	2.50	2.74
34	2.47	2.69
35	2.44	2.64
36	2.41	2.58
3	2.37	2.52
38	2.33	2.46
39	2.28	2.39
40	2.23	2.33
41	2.18	2.26
42	2.13	2.18
43	2.08	2.10
44	2.03	2.01
45	1.97	1.91
46	1.91	1.82
47	1.84	1.72
48	1.78	1.6
49	1.71	1.50
50	1.63	1.37
51	1.55	1.25
52	1.47	1.13
53	1.38	0.99
54	1.28	0.84
55	1.18	0.69
56	1.08	0.53
57	0.97	0.36
58	0.85	0.19
59	0.73	—
60	0.61	—
61	0.47	—
62	0.32	—
63	0.17	—

Second Table
Age	Males	Females
	£	£
16	3.52	4.22
17	3.51	4.19
18	3.50	4.17
19	3.49	4.14
20	3.48	4.12
21	3.47	4.10
22	3.46	4.07
23	3.45	4.05
24	3.44	4.02
25	3.42	3.99
26	3.40	3.95
27	3.38	3.91
28	3.35	3.87
29	3.32	3.83
30	3.30	3.78
31	3.27	3.73
32	3.24	3.67
33	3.20	3.60
34	3.16	3.53
35	3.12	3.46
36	3.07	3.39
37	3.02	3.31
38	2.97	3.23
39	2.92	3.14
40	2.86	3.05
41	2.80	2.95
42	2.73	2.85
43	2.66	2.75
44	2.59	2.64
45	2.52	2.52
46	2.44	2.39
47	2.36	2.26
48	2.27	2.12
49	2.18	1.97
50	2.07	1.82
51	1.96	1.65
52	1.85	1.48
53	1.74	1.31
54	1.62	1.12
55	1.50	0.91
56	1.37	0.70
57	1.23	0.48
58	1.09	0.25
59	0.93	—
60	0.77	—
61	0.59	—
62	0.40	—
63	0.20	—
Regulation 5
SCHEDULE 4

First Table
Age	Males	Females
	£	£
60	—	9.94
61	—	9.80
62	—	9.65
63	—	9.49
64	—	9.33
65	8.97	9.16
66	8.79	8.99
67	8.61	8.80
68	8.42	8.61
69	8.22	8.41
70	8.02	8.21
71	7.81	8.00
72	7.60	7.78
73	7.38	7.57
74	7.17	7.34
75	6.95	7.11
76	6.73	6.88
77	6.51	6.65
78	6.29	6.42
79	6.07	6.17
80	5.84	—
81	5.62	—
82	5.40	—
83	5.17	—
84	4.96	—

Second Table
Age	Males	Females
	£	£
60	—	13.00
61	—	12.74
62	—	12.48
63	—	12.21
64	—	11.93
65	11.37	11.64
66	11.08	11.35
67	10.78	11.05
68	10.48	10.75
69	10.17	10.43
70	9.86	—
71	9.55	—
72	9.24	—
73	8.92	—
74	8.60	—
Regulations 6 and 7
SCHEDULE 5

First Table
Age	Amount
	£
25 and below	4.12
26	4.37
27	4.60
28	4.83
29	5.04
30	5.25
31	5.48
32	5.72
33	5.98
3	6.24
35	6.49
36	6.72
37	6.94
38	7.15
3	7.35
40	7.55
41	7.76
42	7.96
43	8.15
44	8.31
45	8.45
46	8.56
47	8.66
48	8.76
4	8.86
50	8.95
51	9.04
52	9.11
53	9.17
54	9.20
55	9.22
56	9.22
57	9.20
58	9.17
59	9.12
60	9.05
61	8.96
62	8.85
63	8.73
64	8.60
65	8.47
66	8.32
67	8.17
68	8.01
69	7.85
70	7.67
71	7.48
72	7.28
73	7.08
74	6.86
75	6.64
76	6.41
77	6.19
78	5.96
79	5.74
80	5.51
81	5.29
82	5.07
83	4.86
84	4.66
85	4.46
86	4.27
87	4.09
88	3.91
89	3.73
90	3.55
91	3.37
92	3.20
93	3.03
94	2.86
95 and over	2.68

Second Table
Age	Amount
	£
25 and below	4.92
26	5.28
27	5.63
28	5.96
29	6.27
30	6.59
31	6.93
32	7.29
33	7.68
34	8.07
35	8.44
36	8.80
37	9.12
38	9.43
39	9.73
40	10.03
41	10.33
42	10.63
43	10.89
44	11.12
45	11.31
46	11.46
47	11.58
48	11.7
49	11.82
50	11.93
51	12.02
52	12.09
53	12.13
54	12.13
55	12.12
56	12.08
57	12.01
58	11.92
59	11.81
60	11.66
61	11.49
62	11.29
63	11.07
64	10.85
65	10.62
66	10.38
67	10.13
68	9.88
69	9.62
70	9.34
71	9.06
72	8.77
73	8.47
74	8.16
75	7.85
76	7.54
77	7.23
78	6.93
79	6.63
80	6.33
81	6.05
82	5.77
83	5.50
84	5.24
85	4.99
86	4.76
87	4.53
88	4.31
89	4.09
90	3.88
91	3.67
92	3.46
93	3.25
94	3.05
95 and over	2.84
Regulations 6 and 7
SCHDEULE 6 Table for deriving 15-year index number from 15-year gross redemption yield
Yield per cent	Index number
3.00 and below	202
3.01—3.03	201
3.04—3.09	200
3.10—3.14	199
3.15—3.19	198
3.20—3.25	197
3.26—3.30	196
3.31—3.36	195
3.37—3.42	194
3.43—3.47	193
3.48—3.53	192
3.54—3.59	191
3.60—3.64	190
3.65—3.70	189
3.71—3.76	188
3.77—3.82	187
3.83—3.88	186
3.89—3.94	185
3.95—4.00	184
4.01—4.06	183
4.07—4.12	182
4.13—4.18	181
4.19—4.24	180
4.25—4.31	179
4.32—4.37	178
4.38—4.43	177
4.44—4.50	176
4.51—4.56	175
4.57—4.62	174
4.63—4.69	173
4.70—4.76	172
4.77—4.82	171
4.83—4.89	170
4.90—4.96	169
4.97—5.03	168
5.04—5.09	167
5.10—5.16	166
5.17—5.23	165
5.24—5.30	164
5.31—5.37	163
5.38—5.45	162
5.46—5.52	161
5.53—5.59	160
5.60—5.67	159
5.68—5.74	158
5.75—5.81	157
5.82—5.89	156
5.90—5.97	155
5.98—6.04	154
6.05—6.12	153
6.13—6.20	152
6.21—6.28	151
6.29—6.36	150
6.37—6.44	149
6.45— 6.52	148
6.53— 6.60	147
6.61— 6.69	146
6.70— 6.77	145
6.78— 6.85	144
6.86— 6.94	143
6.95— 7.03	142
7.04— 7.11	141
7.12— 7.20	140
7.21— 7.29	139
7.30— 7.38	138
7.39— 7.47	137
7.48— 7.56	136
7.57— 7.66	135
7.67— 7.75	134
7.76— 7.84	133
7.85— 7.94	132
7.95— 8.04	131
8.05— 8.14	130
8.15— 8.23	129
8.24— 8.33	128
8.34— 8.44	127
8.45— 8.54	126
8.55— 8.64	125
8.65— 8.75	124
8.76— 8.85	123
8.86— 8.96	122
8.97— 9.07	121
9.08— 9.18	120
9.19— 9.29	119
9.30— 9.41	118
9.42— 9.52	117
9.53— 9.64	116
9.65— 9.75	115
9.76— 9.87	114
9.88— 9.99	113
10.00—10.12	112
10.13—10.24	111
10.25—10.37	110
10.38—10.49	109
10.50—10.62	108
10.63—10.75	107
10.76—10.89	106
10.90—11.02	105
11.03—11.16	104
11.17—11.30	103
11.31—11.44	102
11.45—11.58	101
11.59—11.73	100
11.74—11.88	99
11.89—12.03	98
12.04—12.18	97
12.19—12.33	96
12.34—12.49	95
12.50—12.65	94
12.66—12.81	93
12.82—12.98	92
12.99—13.15	91
13.16—13.32	90
13.33—13.50	89
13.51—13.67	88
13.68—13.86	87
13.87—14.04	86
14.05—14.23	85
14.24—14.42	84
14.43—14.62	83
14.63—14.82	82
14.83—15.02	81
15.03—15.23	80
15.24—15.44	79
15.45—15.66	78
15.67—15.88	77
15.89—16.10	76
16.11—16.34	75
16.35—16.57	74
16.58—16.81	73
16.82—17.06	72
17.07—17.32	71
17.33—17.58	70
17.59—17.84	69
17.85—18.11	68
18.12—18.40	67
18.41—18.68	66
18.69—18.98	65
18.99—19.28	64
19.29—19.59	63
19.60—19.91	62
19.92—20.24	61
20.25—20.58	60
20.59—20.93	59
20.94—21.30	58
21.31—21.67	57
21.68—22.05	56
22.06—22.45	55
22.46—22.86	54
22.87—23.29	53
23.30—23.73	52
23.74—24.19	51
24.20—24.66	50
24.67—25.15	49
25.16—25.66	48
25.67—26.20	47
26.21—26.75	46
26.76—27.33	45
27.34—27.94	44
27.95—28.57	43
28.58—29.23	42
29.24—29.92	41
29.93 and above	40
Regulation 1(2)
SCHEDULE 7 Table for deriving 25-year index number from 25-year gross redemption yield
Yield per cent	Index number
3.00 and below	87.0
3.01—3.05	86.5
3.06—3.09	86.0
3.10—3.13	85.5
3.14—3.18	85.0
3.19—3.22	84.5
3.23—3.27	84.0
3.28—3.31	83.5
3.32—3.36	83.0
3.37—3.41	82.5
3.42—3.45	82.0
3.46—3.50	81.5
3.51—3.55	81.0
3.56—3.60	80.5
3.61—3.64	80.0
3.65—3.69	79.5
3.70—3.74	79.0
3.75—3.79	78.5
3.80—3.84	78.0
3.85—3.89	77.5
3.90—3.94	77.0
3.95—3.99	76.5
4.00—4.05	76.0
4.06—4.10	75.5
4.11—4.15	75.0
4.16—4.21	74.5
4.22—4.26	74.0
4.27—4.31	73.5
4.32—4.37	73.0
4.38—4.43	72.5
4.44—4.48	72.0
4.49—4.54	71.5
4.55—4.60	71.0
4.61—4.65	70.5
4.66—4.71	70.0
4.72—4.77	69.5
4.78—4.83	69.0
4.84—4.89	68.5
4.90—4.95	68.0
4.96—5.02	67.5
5.03—5.08	67.0
5.09—5.14	66.5
5.15—5.21	66.0
5.22—5.27	65.5
5.28—5.34	65.0
5.35—5.40	64.5
5.41—5.47	64.0
5.48—5.54	63.5
5.55—5.61	63.0
5.62— 5.68	62.5
5.69— 5.75	62.0
5.76— 5.82	61.5
5.83— 5.89	61.0
5.90— 5.96	60.5
5.97— 6.04	60.0
6.05— 6.11	59.5
6.12— 6.19	59.0
6.20— 6.26	58.5
6.27— 6.34	58.0
6.35— 6.42	57.5
6.43— 6.50	57.0
6.51— 6.58	56.5
6.59— 6.66	56.0
6.67— 6.75	55.5
6.76— 6.83	55.0
6.84— 6.92	54.5
6.93— 7.01	54.0
7.02— 7.09	53.5
7.10— 7.18	53.0
7.19— 7.27	52.5
7.28— 7.37	52.0
7.38— 7.46	51.5
7.47— 7.56	51.0
7.57— 7.65	50.5
7.66— 7.75	50.0
7.76— 7.85	49.5
7.86— 7.95	49.0
7.96— 8.06	48.5
8.07— 8.16	48.0
8.17— 8.27	47.5
8.28— 8.38	47.0
8.39— 8.49	46.5
8.50— 8.60	46.0
8.61— 8.72	45.5
8.73— 8.83	45.0
8.84— 8.95	44.5
8.96— 9.07	44.0
9.08— 9.20	43.5
9.21— 9.32	43.0
9.33— 9.45	42.5
9.46— 9.58	42.0
9.59— 9.71	41.5
9.72— 9.85	41.0
9.86— 9.99	40.5
10.00—10.13	40.0
10.14—10.28	39.5
10.29—10.43	39.0
10.44—10.58	38.5
10.59—10.73	38.0
10.74—10.89	37.5
10.90—11.05	37.0
11.06—11.22	36.5
11.23—11.39	36.0
11.40—11.57	35.5
11.58—11.75	35.0
11.76—11.93	34.5
11.94—12.12	34.0
12.13—12.31	33.5
12.32—12.51	33.0
12.52—12.71	32.5
12.72—12.92	32.0
12.93—13.14	31.5
13.15—13.36	31.0
13.37—13.59	30.5
13.60—13.83	30.0
13.84—14.07	29.5
14.08—14.32	29.0
14.33—14.58	28.5
14.59—14.85	28.0
14.86—15.13	27.5
15.14—15.41	27.0
15.42—15.71	26.5
15.72—16.02	26.0
16.03—16.34	25.5
16.35—16.67	25.0
16.68—17.01	24.5
17.02—17.37	24.0
17.38—17.75	23.5
17.76—18.14	23.0
18.15—18.54	22.5
18.55—18.97	22.0
18.98—19.41	21.5
19.42—19.87	21.0
19.88—20.36	20.5
20.37—20.87	20.0
20.88—21.41	19.5
21.42—21.98	19.0
21.99—22.57	18.5
22.58—23.20	18.0
23.21—23.87	17.5
23.88—24.57	17.0
24.58—25.32	16.5
25.33—26.12	16.0
26.13—26.97	15.5
26.98—27.88	15.0
27.89—28.85	14.5
28.86—29.89	14.0
29.90 and above	13.5
Regulation 1(2)