1987 No. 201
OFFSHORE INSTALLATIONS
The Offshore Installations (Safety Zones) (No. 17) Order 1987
Made 12th February 1987
Coming into force 14th February 1987

The Secretary of State, in exercise of the powers conferred on him by section 21(1), (2) and (3) of the Oil and Gas (Enterprise) Act 1982 (hereinafter referred as as “the Act”), and of all other powers enabling him in that behalf, hereby makes the following Order:—
1982 c. 23.