4 Applications
1 An application for a safety certificate shall be in the form contained in the Schedule to these Regulations or a form to the like effect.
2 An application for the amendment, replacement or transfer of a safety certificate shall be made in writing and any such application shall set out the names and addresses of any persons who to the applicant’s knowledge will or may be concerned in ensuring compliance with the terms and conditions of the safety certificate as amended, replaced or transferred.