1983 No. 426
CLEAN AIR
The Smoke Control Areas (Exempted Fireplaces) (No. 2) Order 1983
Made 16th March 1983
Laid before Parliament 25th March 1983
Coming into Operation 16th April 1983
The Secretary of State for the Environment, in exercise of powers conferred by section 11(4) of the Clean Air Act 1956 and now vested in him, and of all other powers enabling him in that behalf, hereby orders as follows:—
S.I. 1970/1681.