2 Termination of transitional exemptions from licences
The 1st July 1983 shall be the day appointed for the purposes of subsections (2) to (5) of section 16 of the Medicines Act 1968 (transitional exemptions) as being the day upon which those subsections shall cease to have effect in relation to anything done on or after that day in so far as it relates to the substances and fluids described in paragraph 2 of Schedule 1 to the Medicines (Specified Articles and Substances) Order 1976 (substances and fluids for use with contact lenses or blanks).