1 Citation, commencement and interpretation
1 This Order may be cited as the Irish Republic (Termination of 1927 Agreement) Order 1979, and shall come into operation on the 30th April 1979.
2 In this Order “the 1927 Agreement” means the Agreement with the Republic of Ireland referred to in section 4 of the Medical Act 1978.