SCHEDULE PARTICULARS REQUIRED IN INFORMATION SHEETS AND DATA SHEETS
1 Each purpose for which the contact lens substance is to be used and in particular, if it is to be used for cleaning, disinfecting, irrigating, lubricating, wetting, soaking or rinsing a contact lens or blank or as a barrier between a contact lens or blank and the human eyeball, for which of those purposes it is to be used.