SCHEDULE 4 GENERAL REQUIREMENTS FOR LIFEBOATS
2 In any lifeboat fitted with a rigid shelter the shelter shall be capable of being readily opened from both inside and outside and shall not impede rapid embarkation and disembarkation or the launching and handling of the lifeboat. Such a shelter where fitted may be accepted as complying with the requirements of sub-paragraph (x) of Rule 90(1).