SCHEDULE AMENDMENTS OF INSTRUMENTS

PART I NEW DEFINITIONS
The new definitions mentioned in Part II of this Schedule are as follows:—
“appointed doctor” means a fully registered medical practitioner appointed by written certificate of the Chief Employment Medical Adviser or of a Deputy Chief Employment Medical Adviser for such of the purposes of these Regulations as are specified in the certificate; and
“employment medical adviser” means an employment medical adviser appointed under the provisions of the Employment Medical Advisory Service Act 1972.