PART XI DEAD-WEIGHT MACHINES

Materials and principles of construction
106 Loose balancing material for the adjustment of dead-weight machines shall be contained in a balancing box permanently fixed beneath one platform, and its weight shall not exceed three-quarter per cent. of the capacity of the machine. Any other balancing material shall be in one piece and shall be permanently attached to the machine.