PART IV DRY CAPACITY MEASURES

Stamping
37 1 Dry capacity measures made of metal shall be stamped near the brim in a vertical line with the indication of the purported value. Where necessary, such measures shall be provided with a plug of soft metal to receive the stamp.
2 Measures made of wood (other than measures made of wicker or other open material) shall be branded on the outside in a line vertical with the indication of the purported value and, in the case of new measures, also in the inside angle at the bottom of the measure.
3 Measures made of wicker or other open material shall be stamped on a tablet, plate or fastening affixed in such a manner that it cannot be removed without defacing the stamp.