PART VI MISCELLANEOUS SAFETY PROVISIONS

68 Air Receivers
1 The provisions of section 31 of the principal Act (which relates to air receivers) shall apply to air receivers used for the purpose of the operations (other than fixed air receivers permanently installed in a ship).
2 In the case of a shipyard, the provisions of this Regulation shall be in substitution for the provisions of section 31 of the principal Act.