PART V PRECAUTIONS AGAINST ASPHYXIATION, INJURIOUS FUMES OR EXPLOSIONS

50 Precautions against shortage of oxygen
No person shall enter or remain in any confined space in a vessel, being a confined space in which there is reason to apprehend that the proportion of oxygen in the air is so low as to involve risk of persons being overcome, unless either—
(a) the space has been and remains adequately ventilated and a responsible person has tested it and certified that it is safe for entry without breathing apparatus, or
(b) he is wearing a breathing apparatus of a type approved for the purpose of this Regulation.