12 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
S. 12 repealed (Provinces of Canterbury and York except Channel Islands and Isle of Man) (1.6.1992) by Church of England (Miscellaneous Provisions) Measure 1992 (No. 1), s. 17(2), Sch. 4 Pt.I;Instrument dated 27.5.1992 made by Archbishops of Canterbury and York.